GDACS_TC_1001089_11
info-gdacs@gdacs.org
2024-09-01T10:00:00-00:00
Actual
Alert
Public
ASNA-24
Met
Tropical Cyclone
Past
Severe
Unknown
Global Disaster Alert and Coordination System

Orange alert for tropical cyclone ASNA-24. Population affected by Category 1 (120 km/h) wind speeds or higher is 0 (12.791 million in Tropical Storm).
From 30/08/2024 to 01/09/2024, a Tropical Storm (maximum wind speed of 83 km/h) ASNA-24 was active in NorthIndian. The cyclone affects these countries: Pakistan, India (vulnerability High). Estimated population affected by category 1 (120 km/h) wind speeds or higher is 0 (12.791 million in tropical storm).
https://www.gdacs.org/report.aspx?eventtype=TC&eventid=1001089
eventid
1001089
currentepisodeid
11
glide
version
11
fromdate
Fri, 30 Aug 2024 00:00:00 GMT
todate
Sun, 01 Sep 2024 12:00:00 GMT
eventtype
TC
alertlevel
Orange
alerttype
realtime_max
link
https://www.gdacs.org/report.aspx?eventtype=TC&amp;eventid=1001089
country
Pakistan, India
eventname
ASNA-24
severity
Tropical Storm (maximum wind speed of 83 km/h)
population
Population affected by Category 1 (120 km/h) wind speeds or higher is 0 (12.791 million in Tropical Storm)
vulnerability
High
sourceid
JTWC
iso3
IND
hazardcomponents
etrap,SS,calcepisode=completed
datemodified
Wed, 09 Oct 2024 12:54:04 GMT
Polygon
19.98500000000001,61.4 19.985740145171807,61.4454808602314 19.987959678934306,61.4909063090405 19.991655897127508,61.536221002514992 19.996824296479012,61.5813697316812 20.003458580090207,61.6262974897672 20.011550665108402,61.6709495392204 20.021090692574706,61.7152714783966 20.03206703943491,61.7592093078403 20.044466332701408,61.802709496074293 20.05827346574511,61.84571904482 20.073471616701411,61.8881855535673 20.090042268964211,61.9300572834168 20.107965233746508,61.9712832201155 20.127218674676406,62.01181313621 20.147779134401908,62.0515976522405 20.169621563169912,62.0905882969028 20.192719349345605,62.128737566102195 20.217044351834403,62.1659989808308 20.242566934367812,62.202327143794292 20.269256001610408,62.2376777947221 20.297079037045005,62.2720078642914 20.326002142588507,62.305275526600596 20.355990079892305,62.3374402501277 20.387006313274011,62.3684628471115 20.419013054230906,62.3983055212965 20.451971307479312,62.4269319139809 20.485840918464611,62.4543071483148 20.520580622283006,62.480397871792093 21.307064462878508,63.0687954141005 21.348574483317307,63.0978899521089 21.391000000000005,63.1254032111353 21.434289323969612,63.1513016705116 21.478389713853108,63.175553776954509 21.499785513922941,63.18632195517641 21.50829703429531,63.2103923198522 21.528768268078515,63.262745737794091 21.550910136505006,63.314291702142491 21.57469566311871,63.3649674120802 21.60009586891961,63.414711127060393 21.627079807669208,63.4634622420289 21.655614603594913,63.5111613612616 21.685665491443213,63.5577503707293 21.89496856894311,63.873199535493178 21.966000000000019,64.248116882739268 21.966000000000008,64.90000000000002 21.966812636756512,64.9506898710114 21.969249556953411,65.0013179842231 21.973307791578712,65.0518226570779 21.978982396298715,65.1021423574115 21.986266457481705,65.1522157784202 22.058230570270727,65.594086954139811 21.972464169041011,65.89459856090501 21.957146194396611,65.949191407482218 21.943586114859709,66.004333494887618 21.931800451298606,66.059957640981821 21.921803562728705,66.1159960763109 21.913607628818909,66.172380526673621 21.907222635052207,66.22904229630241 21.902656360560009,66.285912351559219 21.899914368644307,66.342921405041821 21.899000000000004,66.40000000000002 21.899914368644307,66.4570785949582 21.902656360560009,66.5140876484408 21.907222635052207,66.5709577036976 21.913607628818909,66.6276194733264 21.921803562728705,66.6840039236891 21.931800451298606,66.7400423590182 21.943586114859709,66.7956665051124 21.957146194396611,66.8508085925178 21.972464169041011,66.905401439095 21.989521376200415,66.9593785318698 22.003832034820057,67.000000000000043 21.989521376200415,67.040621468130212 21.972464169041011,67.094598560905 21.957146194396611,67.1491914074822 21.943586114859709,67.204333494887621 21.931800451298606,67.25995764098181 21.921803562728705,67.31599607631091 21.913607628818909,67.372380526673609 21.907222635052207,67.429042296302413 21.902656360560009,67.4859123515592 21.899914368644307,67.54292140504181 21.899000000000004,67.6 21.899000000000004,68.3 21.899914368644307,68.3570785949582 21.902656360560009,68.4140876484408 21.907222635052207,68.4709577036976 21.913607628818909,68.5276194733264 21.921803562728705,68.5840039236891 21.931800451298606,68.6400423590182 21.943586114859709,68.6956665051124 21.957146194396611,68.7508085925178 21.972464169041011,68.805401439095 21.989521376200415,68.8593785318698 22.008297034295314,68.9126741080692 22.028768268078508,68.965223235243 22.05091013650501,69.0169618903746 22.074695663118714,69.0678270378822 22.100095868919613,69.1177567064188 22.127079807669212,69.1666900643745 22.155614603594906,69.2145674939901 22.185665491443206,69.2613306639925 22.217195858836309,69.3069226006626 22.250167290878409,69.3512877572482 22.284539616958416,69.3943720816401 22.320270959691712,69.4361230822257 22.35731778594101,69.4764898918419 22.395634959855407,69.5154233297492 22.435175797860506,69.5528759615509 22.475892125536213,69.5888021569841 22.517734336309008,69.6231581455139 22.560651451890408,69.6559020696602 22.604591184386003,69.6869940359953 22.649500000000007,69.7163961637476 22.695323184258406,69.7440726309535 22.742004908669607,69.769989718101 22.789488298743215,69.7941158492114 22.837715503282713,69.8164216303105 22.886627764868209,69.83687988524 22.936165491443216,69.8554656887674 22.986268328918715,69.8721563969542 23.036875234704915,69.8869316747435 23.087924552082516,69.8997735207352 23.139354085321916,69.910666289118 23.191101175458908,69.9195967087317 23.243102776635308,69.9265538992356 23.29529553291011,69.9315293843647 23.347615855449508,69.9345171022567 23.400000000000006,69.9355134128377 23.452384144550503,69.9345171022567 23.5047044670899,69.9315293843647 23.556897223364704,69.9265538992356 23.608898824541104,69.9195967087317 23.660645914678096,69.910666289118 23.712075447917496,69.8997735207352 23.763124765295096,69.8869316747435 23.813731671081296,69.8721563969542 23.863834508556796,69.8554656887674 23.913372235131803,69.83687988524 23.9622844967173,69.8164216303105 24.010511701256796,69.7941158492114 24.057995091330405,69.769989718101 24.104676815741595,69.7440726309535 24.150500000000005,69.7163961637476 24.195408815614009,69.6869940359953 24.239348548109604,69.6559020696602 24.282265663691003,69.6231581455139 24.3241078744638,69.5888021569841 24.364824202139495,69.5528759615509 24.404365040144604,69.5154233297492 24.442682214059,69.4764898918419 24.4797290403083,69.4361230822257 24.515460383041596,69.3943720816401 24.549832709121603,69.3512877572482 24.582804141163702,69.3069226006626 24.614334508556805,69.2613306639925 24.644385396405095,69.2145674939901 24.6729201923308,69.1666900643745 24.699904131080398,69.1177567064188 24.7253043368812,69.0678270378822 24.749089863495,69.0169618903746 24.771231731921503,68.965223235243 24.791702965704697,68.9126741080692 24.810478623799597,68.8593785318698 24.827535830959,68.805401439095 24.8428538056034,68.7508085925178 24.856413885140302,68.6956665051124 24.868199548701405,68.6400423590182 24.878196437271306,68.5840039236891 24.886392371181103,68.5276194733264 24.892777364947804,68.4709577036976 24.897343639440003,68.4140876484408 24.900085631355704,68.3570785949582 24.900999999999996,68.3 24.900999999999993,68.105781390708557 25.144385396405095,67.718069364977 25.1729201923308,67.6700086130994 25.199904131080398,67.6208878897414 25.2253043368812,67.5707670409378 25.249089863495,67.5197071312224 25.271231731921503,67.46777036923 25.291702965704697,67.4150200319048 25.310478623799597,67.3615203874073 25.327535830959,67.3073366168134 25.3428538056034,67.252534734701 25.356413885140302,67.1971815087221 25.368199548701405,67.1413443782559 25.378196437271306,67.0850913722449 25.386392371181103,67.0284910263118 25.392777364947804,66.9716122992594 25.397343639440003,66.9145244890552 25.400085631355704,66.8572971484023 25.400999999999996,66.8 25.400085631355704,66.742702851597713 25.397343639440003,66.685475510944812 25.392777364947804,66.628387700740618 25.386392371181103,66.571508973688211 25.378196437271306,66.5149086277551 25.368199548701405,66.4586556217441 25.356413885140302,66.402818491277912 25.3428538056034,66.347465265299007 25.327535830959,66.292663383186621 25.310478623799597,66.238479612592712 25.291702965704697,66.18497996809522 25.271231731921503,66.132229630770013 25.249089863495,66.080292868777619 25.2253043368812,66.029232959062213 25.199904131080398,65.979112110258612 25.1729201923308,65.92999138690061 25.144385396405095,65.881930635023011 25.114334508556805,65.834988409249 25.097520295620541,65.81058248343497 25.1000856313557,65.7571652936774 25.101000000000003,65.7 25.1000856313557,65.642834706322617 25.09734363944,65.585739059749912 25.0927773649478,65.5287826225323 25.0863923711811,65.472034787315209 25.078196437271302,65.415564692594415 25.0681995487014,65.3594411384818 25.056413885140298,65.303732502882809 25.042853805603396,65.248506658188816 25.027535830958996,65.193830888584515 25.010478623799603,65.139771808073121 24.9917029657048,65.086395279317117 24.9712317319215,65.03376633339461 24.949089863495104,64.981949090569515 24.925304336881304,64.931006682170221 24.899904131080405,64.88100117367442 24.872920192330795,64.831993489091417 24.8443853964051,64.7840433367357 24.633999999999997,64.449957480743024 24.634,64.248116882739325 24.7681995487014,63.539786245835195 24.778196437271298,63.483790017547804 24.786392371181098,63.4274480348385 24.7927773649478,63.3708289417345 24.797343639439998,63.3140017198792 24.8000856313557,63.2570356044888 24.801000000000002,63.20000000000001 24.8000856313557,63.142964395511214 24.797343639439998,63.085998280120805 24.7927773649478,63.029171058265504 24.786392371181098,62.972551965161507 24.778196437271298,62.916209982452209 24.7681995487014,62.86021375416481 24.756413885140297,62.804631503078006 24.742853805603396,62.749530947602715 24.727535830958995,62.694979219278416 24.710478623799602,62.641042780982914 24.691702965704703,62.587787345958013 24.671231731921498,62.535277797748016 24.649089863495103,62.483578111148816 24.625304336881303,62.432751274264817 24.599904131080404,62.38285921176751 24.572920192330795,62.333962709449814 24.5443853964051,62.28612134016781 24.5143345085568,62.239393391260606 24.146989136239391,61.690998397322637 23.8025322003498,61.086073222811017 23.7755752778831,61.041110526699811 23.747186098023704,60.997194255110017 23.717399248614296,60.954377913253808 23.6862510203427,60.912713666248408 23.6537793625269,60.872252275560811 23.620023836880204,60.833043037163115 23.5850255693109,60.795133721472517 23.548827199816902,60.758570515150616 23.511472830535503,60.723397964832316 23.4730079720118,60.689658922852317 23.4334794877507,60.657394495035909 23.392935537121502,60.62664399061871 23.351425516682703,60.597444874353407 23.309000000000005,60.569832720865513 23.265710676030398,60.54384117131071 23.221610286146902,60.519501892388313 23.176752559881503,60.496844537760715 23.1311921494638,60.475896711924307 23.084984563235803,60.456683936578109 23.038186098023704,60.439229619529307 22.990853770548497,60.423555026174817 22.943045247960303,60.409679253591904 22.894818777579598,60.397619207272307 22.846233115931696,60.387389580524506 22.346233115931696,60.292807078765307 21.4109825358653,60.116603160457906 21.3690953176665,60.109487302638406 21.327002082870205,60.103943735752516 21.284754115599103,60.099979213782312 21.242402888493498,60.097598566887307 21.200000000000003,60.096804695518905 21.157597111506508,60.097598566887307 21.115245884400903,60.099979213782312 21.072997917129811,60.103943735752516 21.030904682333507,60.109487302638406 20.989017464134712,60.116603160457906 20.947387295656409,60.125282639634307 20.906064896846409,60.135515165559113 20.865100612682308,60.147288271475709 20.824544351834412,60.160587613668014 20.784445525859304,60.175396988936306 20.744852988999703,60.191698354337916 20.705814978662911,60.209471849170207 20.667379056651306,60.228695819167413 20.629592051215109,60.249346842883412 20.592500000000012,60.271399760226814 20.556148093956708,60.294827703114805 20.520580622283006,60.319602128207912 20.485840918464611,60.345692851685207 20.451971307479312,60.37306808601911 20.419013054230906,60.401694478703504 20.387006313274011,60.431537152888517 20.355990079892305,60.462559749872305 20.326002142588507,60.494724473399408 20.297079037045005,60.527992135708608 20.269256001610408,60.562322205277908 20.242566934367812,60.597672856205712 20.217044351834403,60.634001019169204 20.192719349345605,60.671262433897809 20.169621563169912,60.70941170309721 20.147779134401908,60.748402347759516 20.127218674676406,60.78818686379001 20.107965233746508,60.828716779884509 20.090042268964211,60.869942716583218 20.073471616701411,60.911814446432714 20.05827346574511,60.954280955180018 20.044466332701408,60.997290503925711 20.03206703943491,61.04079069215971 20.021090692574706,61.084728521603409 20.011550665108402,61.129050460779617 20.003458580090207,61.173702510232808 19.996824296479012,61.218630268318805 19.991655897127508,61.263778997485012 19.987959678934306,61.309093690959507 19.985740145171807,61.354519139768506 19.98500000000001,61.4