GDACS_TC_1000887_17
info-gdacs@gdacs.org
2022-06-06T19:00:00-00:00
Actual
Alert
Public
ALEX-22
Met
Tropical Cyclone
Past
Moderate
Unknown
Global Disaster Alert and Coordination System

Green alert for tropical cyclone ALEX-22. Population affected by Category 1 (120 km/h) wind speeds or higher is 0 (0 in Tropical Storm).
From 02/06/2022 to 06/06/2022, a Tropical Storm (maximum wind speed of 111 km/h) ALEX-22 was active in Atlantic. The cyclone affects these countries: Bermuda, Bahamas, United States, Cuba, Mexico (vulnerability Medium). Estimated population affected by category 1 (120 km/h) wind speeds or higher is 0 (0 in tropical storm).
https://www.gdacs.org/report.aspx?eventtype=TC&eventid=1000887
eventid
1000887
currentepisodeid
17
glide
version
17
fromdate
Thu, 02 Jun 2022 21:00:00 GMT
todate
Mon, 06 Jun 2022 21:00:00 GMT
eventtype
TC
alertlevel
Green
alerttype
realtime_max
link
https://www.gdacs.org/report.aspx?eventtype=TC&amp;eventid=1000887
country
Bermuda, Bahamas, United States, Cuba, Mexico
eventname
ALEX-22
severity
Tropical Storm (maximum wind speed of 111 km/h)
population
Population affected by Category 1 (120 km/h) wind speeds or higher is 0 (0 in Tropical Storm)
vulnerability
Medium
sourceid
NOAA
iso3
MEX
hazardcomponents
etrap,SS,calcepisode=completed
datemodified
Wed, 08 Jun 2022 00:18:11 GMT
Polygon
20.498000000000012,-85.8 20.499524150798226,-85.7051405971167 20.504094746249912,-85.6103967658039 20.51170621778861,-85.515883936825787 20.52234929200862,-85.4217172595059 20.536011001963526,-85.3280114614354 20.552674702964012,-85.2348807086948 20.572320092857513,-85.1424384667607 20.59492323676232,-85.050797362265314 20.62045659622952,-84.960069045778184 20.648889062793714,-84.8703640557773 20.680185995873916,-84.781791683975 20.714309264978212,-84.6944598421629 20.751217296159517,-84.6084749307376 20.790865122667014,-84.523941709068907 20.833204439731322,-84.440963167865988 20.878183663416618,-84.3596404036994 20.925747993467326,-84.280072495830609 20.975839480073923,-84.2023563854987 21.028397094476016,-84.1265867578129 21.601372561809086,-83.3170145994917 21.598439128615514,-83.25494848622705 21.596000000000039,-83.09999999999998 21.598439128615514,-82.94505151377291 21.605753542759729,-82.7902918084083 21.61793433094542,-82.6359094347683 21.63496665275882,-82.482092483994279 21.656829756939143,-82.329028358347287 21.683497006661828,-82.1769035428865 21.714935911990938,-82.0259033782665 21.751108169463041,-81.876211834928284 21.791969708754216,-81.7280112889591 21.837470746373221,-81.5814822998957 21.887555846314633,-81.4368033907401 21.94216398759902,-81.294150830457014 22.001228638618123,-81.153698419217392 22.064677838192928,-81.015617276649081 22.132434283247139,-80.8800756333547 22.20441542298974,-80.747238625947887 22.280533559489641,-80.6172680958603 22.36069595452274,-80.4903223921624 22.444804942558733,-80.3665561786396 22.532758049751621,-80.2461202453583 22.624448118788528,-80.12916132495171 22.719763439444023,-80.0158219138479 22.818587884682223,-79.9062400986609 22.920801052139126,-79.800549387952714 23.02627841081512,-79.698878549573919 23.134891452796129,-79.601351453779785 23.246507849820937,-79.5080869223138 23.360991614503121,-79.419198583641219 23.478203266010222,-79.33479473451041 23.598000000000042,-79.254978208010215 23.720235862605332,-79.1798462482833 23.844761928256535,-79.1094903920495 24.655744422093733,-78.670054783118346 25.231753224911451,-77.9494767796509 25.61566688473593,-76.921144290199919 26.315666884735922,-75.0125436465353 26.356622990699318,-74.902118370262 26.400921478963625,-74.793396197427313 26.448508378644622,-74.686509589251614 26.499325712435322,-74.58158877060221 26.553311567242318,-74.4787615713349 27.793520770109097,-72.166465000528916 28.816070523906468,-69.917852084995985 29.800921478963627,-67.439125082020709 29.848508378644624,-67.328388187898682 30.642557418594979,-65.486944773849714 31.062622754996426,-63.046887200056005 31.086201933993216,-62.923692970576994 31.113331127097229,-62.801566386228508 31.143977281565718,-62.6806562394416 31.178103059779925,-62.5611098406052 31.215666884735924,-62.443072838591583 31.25662299069932,-62.326689043305606 31.300921478963627,-62.212100250474215 31.348508378644624,-62.099446068890394 31.399325712435324,-61.9888637503214 31.453311567242316,-61.880488022288404 32.890861588103768,-59.142667509079672 34.072169575906415,-54.123207977874706 34.109622585196831,-53.968588673514105 34.151328081715718,-53.815713323362914 34.197235253739919,-53.664768182486405 34.247288170451732,-53.515937154287691 34.301425850082133,-53.369401566448786 34.359582334207737,-53.2253399500114 34.421686768111122,-53.083927821864314 34.487663487105912,-52.9453374709027 34.557432108723035,-52.809737748121016 34.630907630643925,-52.67729386089389 34.708000534263334,-52.548167171696505 34.788616893753421,-52.422515001509311 34.872658490498033,-52.300490438146412 34.960022932757113,-52.18224214974169 35.050603780415528,-52.0679142036199 35.144290674663019,-51.957645890772611 35.240969472450431,-51.8515715561534 35.340522385554827,-51.749820434999506 35.442828124086631,-51.6525164953785 35.547762044262413,-51.559778287152184 35.655196300264123,-51.471718797542287 35.765000000000022,-51.388445313472289 35.877039364575822,-51.310059290855087 35.991177891284117,-51.236656230985 36.107276519911821,-51.168325564183512 36.225193802163624,-51.105150540842487 36.344786073994811,-51.0472081299967 36.465907630643926,-50.994568925548307 36.588410904151615,-50.947297060259487 36.712146643149218,-50.905450127616383 36.836964094698814,-50.869079111660504 36.962711187962427,-50.838228324872205 37.089234719476636,-50.812935354183 37.216380539807723,-50.7932310151815 37.343993741359121,-50.77913931456969 37.471918847101819,-50.77067742091409 37.599999999999994,-50.767855643728609 37.7280811528982,-50.77067742091409 37.856006258640896,-50.77913931456969 37.983619460192287,-50.7932310151815 38.11076528052341,-50.812935354183 38.23728881203759,-50.838228324872205 38.363035905301196,-50.869079111660504 38.4878533568508,-50.905450127616383 38.6115890958484,-50.947297060259487 38.734092369356091,-50.994568925548307 38.8552139260052,-51.0472081299967 38.974806197836394,-51.105150540842487 39.092723480088189,-51.168325564183512 39.208822108715893,-51.236656230985 39.322960635424188,-51.310059290855087 39.434999999999995,-51.388445313472289 39.544803699735894,-51.471718797542287 39.652237955737604,-51.559778287152184 39.757171875913414,-51.6525164953785 39.85947761444519,-51.749820434999506 39.959030527549608,-51.8515715561534 40.055709325337,-51.957645890772611 40.14939621958451,-52.0679142036199 40.2399770672428,-52.18224214974169 40.327341509502006,-52.300490438146412 40.4113831062467,-52.422515001509311 40.491999465736683,-52.548167171696505 40.569092369356092,-52.67729386089389 40.642567891276983,-52.809737748121016 40.712336512894105,-52.9453374709027 40.778313231888895,-53.083927821864314 40.840417665792309,-53.2253399500114 40.898574149917906,-53.369401566448786 40.952711829548306,-53.515937154287691 41.0027647462601,-53.664768182486405 41.048671918284292,-53.815713323362914 41.090377414803207,-53.968588673514105 41.1278304240936,-54.123207977874706 41.160985315432917,-54.2793828566395 41.189801694693116,-54.436923034775717 41.214244453554791,-54.595636573843315 41.234283812281618,-54.755330105842994 41.249895356001609,-54.91580906880499 41.261060064453609,-55.076877943832791 41.267764335160116,-55.238340493312812 41.269999999999996,-55.400000000000013 41.267764335160116,-55.561659506687178 41.261060064453609,-55.723122056167171 41.249895356001609,-55.884190931194972 41.234283812281618,-56.044669894156868 41.214244453554791,-56.204363426156682 41.189801694693116,-56.363076965224273 41.160985315432917,-56.520617143360454 41.1278304240936,-56.676792022125255 41.090377414803207,-56.831411326485757 41.048671918284292,-56.984286676637048 41.0027647462601,-57.135231817513549 40.952711829548306,-57.28406284571227 40.898574149917906,-57.430598433551175 40.840417665792309,-57.574660049988559 40.778313231888895,-57.716072178135683 40.712336512894105,-57.854662529097261 40.642567891276983,-57.990262251878974 40.569092369356092,-58.122706139106072 40.491999465736683,-58.251832828303357 37.914595391515718,-62.451700208241661 36.860605805519249,-64.997714841260091 36.4373772450036,-67.448734168399682 36.413798066006791,-67.571212141111687 36.3866688729028,-67.692628676029685 36.356022718434311,-67.812835845808678 36.3218969402201,-67.93168719652877 36.284333115264104,-68.049037926126672 36.243377009300708,-68.164745060815079 36.199078521036405,-68.278667629273571 36.151491621355405,-68.390666834400761 35.188224814474268,-70.587825419741989 34.199078521036391,-73.043943868519079 34.15149162135539,-73.153479582578683 33.051491621355396,-75.534551605821861 33.000674287564692,-75.640841975733579 32.946688432757696,-75.745011397854071 31.770621227624687,-77.894705769305858 31.184333115264103,-79.478855709800072 31.143377009300707,-79.588543307898775 30.543377009300702,-81.180800823643793 30.499078521036395,-81.288194513212872 30.451491621355398,-81.393775067006374 30.400674287564698,-81.497413851382987 30.346688432757702,-81.598984598448283 30.2895998303828,-81.698363559892684 30.229478034108,-81.795429657759783 30.166396293081004,-81.890064631961366 30.100431462686295,-81.982153184358665 30.031663910908595,-82.071583119235683 29.960177420416993,-82.158245479992473 29.583557262841314,-82.614126512790989 29.594246457240295,-82.7902918084083 29.60156087138451,-82.94505151377291 29.604000000000013,-83.09999999999998 29.60156087138451,-83.25494848622705 29.594246457240295,-83.409708191591662 29.582065669054604,-83.564090565231666 29.565033347241204,-83.717907516005681 29.54317024306091,-83.870971641652673 29.516502993338197,-84.023096457113454 29.485064088009114,-84.174096621733355 29.448891830537011,-84.323788165071676 29.408030291245808,-84.471988711040865 29.362529253626803,-84.618517700104292 29.312444153685391,-84.763196609259865 29.257836012401004,-84.905849169542861 29.1987713613819,-85.046301580782568 29.135322161807096,-85.184382723350879 29.067565716752885,-85.319924366645282 28.995584577010312,-85.452761374052074 28.919466440510412,-85.582731904139692 28.839304045477313,-85.709677607837563 28.755195057441291,-85.833443821360362 28.667241950248403,-85.953879754641662 28.575551881211496,-86.07083867504825 28.480236560556,-86.184178086152059 28.3814121153178,-86.293759901339058 28.2791989478609,-86.399450612047275 28.173721589184904,-86.501121450426083 28.065108547203895,-86.598648546220176 27.953492150179088,-86.691913077686166 27.839008385496903,-86.78080141635877 27.7217967339898,-86.865205265489593 27.602000000000011,-86.945021791989774 27.479764137394692,-87.020153751716663 27.355238071743489,-87.090509607950466 27.2285735188755,-87.156003642917852 27.099924800037297,-87.216556062225777 26.969448653875993,-87.272093092078777 26.83730404547731,-87.322547069160791 26.703651972691297,-87.367856523072462 26.568655269981107,-87.407966251223755 26.432478410034292,-87.442827386089178 26.295287303378416,-87.472397454745973 26.157249096244112,-87.496640430620374 26.018531966923703,-87.515526777380572 25.8793049208715,-87.529033484922266 25.739737584796796,-87.537144097402972 25.600000000000012,-87.539848733290569 25.460262415203228,-87.537144097402972 25.320695079128523,-87.529033484922266 25.181468033076321,-87.515526777380572 25.042750903755913,-87.496640430620374 24.9645293250712,-87.482902756940845 24.916643196683694,-87.547144073606788 24.859348353344398,-87.618746279099668 24.7997881804473,-87.688132622407991 24.738035242888397,-87.755218566960281 24.6741647771099,-87.81992237886719 24.608254599435707,-87.882165226500589 24.540385011264792,-87.941871276538492 24.470638701235806,-87.998967786355792 24.399100644483795,-88.053385192650566 24.325857999111495,-88.105057196195389 24.251000000000012,-88.153920842613573 24.174617850090293,-88.199916599078676 24.096804609266307,-88.242988426846679 24.017655080975704,-88.283083849530087 23.937265696726605,-88.320154017032479 23.8557343986008,-88.354153765065192 23.7731605199261,-88.38504167017237 23.6896446642541,-88.412780100199583 23.605288582790394,-88.437335260142575 23.520195050425993,-88.458677233321481 23.434467740522695,-88.476780017829483 23.348211098602093,-88.491621558211989 23.261530215095704,-88.503183772338389 23.1745306973078,-88.511452573431782 23.087318540749703,-88.516417887231682 23.000000000000011,-88.518073664267988 22.912681459250319,-88.516417887231682 22.82546930269222,-88.511452573431782 22.738469784904318,-88.503183772338389 22.651788901397911,-88.491621558211989 22.565532259477326,-88.476780017829483 22.47980494957401,-88.458677233321481 22.39471141720961,-88.437335260142575 22.310355335745921,-88.412780100199583 22.22683948007392,-88.38504167017237 22.144265601399223,-88.354153765065192 22.062734303273416,-88.320154017032479 21.982344919024317,-88.283083849530087 21.903195390733714,-88.242988426846679 21.825382149909711,-88.199916599078676 21.749000000000009,-88.153920842613573 21.674142000888526,-88.105057196195389 21.600899355516226,-88.053385192650566 21.529361298764215,-87.998967786355792 21.459614988735211,-87.941871276538492 21.391745400564314,-87.882165226500589 21.32583522289012,-87.81992237886719 21.261964757111624,-87.755218566960281 21.20021181955272,-87.688132622407991 21.140651646655623,-87.618746279099668 21.08335680331631,-87.547144073606788 21.028397094476016,-87.473413242187092 20.975839480073923,-87.397643614501291 20.925747993467326,-87.319927504169385 20.878183663416618,-87.240359596300593 20.833204439731322,-87.159036832133992 20.790865122667014,-87.076058290931087 20.751217296159517,-86.991525069262366 20.714309264978212,-86.905540157837081 20.680185995873916,-86.818208316024965 20.648889062793714,-86.729635944222679 20.62045659622952,-86.639930954221782 20.59492323676232,-86.54920263773468 20.572320092857513,-86.457561533239272 20.552674702964012,-86.365119291305191 20.536011001963526,-86.271988538564571 20.52234929200862,-86.178282740494069 20.51170621778861,-86.084116063174193 20.504094746249912,-85.989603234196068 20.499524150798226,-85.894859402883284 20.498000000000012,-85.8