GDACS_TC_1000725_15
info-gdacs@gdacs.org
2020-10-06T01:00:00-00:00
Actual
Alert
Public
GAMMA-20
Met
Tropical Cyclone
Past
Moderate
Unknown
Global Disaster Alert and Coordination System

Green alert for tropical cyclone GAMMA-20. Population affected by Category 1 (120 km/h) wind speeds or higher is 0.
From 02/10/2020 to 06/10/2020, a Tropical Depression (maximum wind speed of 111 km/h) GAMMA-20 was active in Atlantic. The cyclone affects these countries: Mexico, Cuba (vulnerability Medium). Estimated population affected by category 1 (120 km/h) wind speeds or higher is 0.
http://www.gdacs.org/report.aspx?eventtype=TC&eventid=1000725
eventid
1000725
currentepisodeid
15
glide
version
15
fromdate
Fri, 02 Oct 2020 15:00:00 GMT
todate
Tue, 06 Oct 2020 03:00:00 GMT
eventtype
TC
alertlevel
Green
alerttype
realtime_max
link
http://www.gdacs.org/report.aspx?eventtype=TC&amp;eventid=1000725
country
Mexico, Cuba
eventname
GAMMA-20
severity
Tropical Depression (maximum wind speed of 111 km/h)
population
Population affected by Category 1 (120 km/h) wind speeds or higher is 0
vulnerability
Medium
sourceid
NOAA
iso3
MEX
hazardcomponents
etrap,SS,calcepisode=completed
datemodified
Wed, 07 Oct 2020 01:33:11 GMT
Polygon
18.233000000000004,-86.9 18.233710904868708,-86.8568206803466 18.235842753346805,-86.813693968043 18.239392948105206,-86.7706724063449 18.244357163778609,-86.7278084103982 18.250729352234803,-86.6851542033795 18.258501749943612,-86.6427617528694 18.267664887435906,-86.6006827075389 18.278207600840005,-86.5589683342231 18.458838448809104,-85.9054390941515 18.465645303631106,-85.8818778003803 18.473225021935804,-85.8585822549101 18.481568369004002,-85.8355808397748 18.490665179752408,-85.8129015786556 18.500504371118506,-85.7905721027386 18.511073955563102,-85.7686196170508 18.522361055675802,-85.7470708673143 18.534351919863703,-85.7259521073615 18.547031939105807,-85.7052890671482 18.560385664751905,-85.685106921406 18.574396827344305,-85.6654302589707 18.589048356439605,-85.6462830528245 18.604322401406602,-85.6276886308887 18.620200353174102,-85.6096696476022 18.636662866903905,-85.5922480563204 18.653689885558602,-85.5754450825689 18.671260664339105,-85.5592811981827 18.689353795957807,-85.5437760963652 18.707947236720905,-85.5289486676946 18.727018333385004,-85.5148169771087 18.746543850756506,-85.5013982418956 18.766500000000008,-85.4887088107172 18.786862467621802,-85.4767641436908 18.807606445091704,-85.4655787935532 18.828706659068402,-85.4551663879306 18.850137402191603,-85.4455396127352 18.871872564401809,-85.4367101967099 18.893885664751906,-85.4286888971378 18.916149883670109,-85.4214854867371 18.938638095635003,-85.4151087417536 18.961322902224609,-85.4095664312689 18.984176665496204,-85.4048653077346 19.007171541659606,-85.4010110987455 19.030279515000505,-85.3980085000616 19.053472432012704,-85.3958611698868 19.076722035699405,-85.3945717244123 19.1,-85.3941417346287 19.1232779643006,-85.3945717244123 19.1465275679873,-85.3958611698868 19.169720484999505,-85.3980085000616 19.1928284583404,-85.4010110987455 19.2158233345038,-85.4048653077346 19.2386770977754,-85.4095664312689 19.261361904365,-85.4151087417536 19.2838501163299,-85.4214854867371 19.306114335248104,-85.4286888971378 19.328127435598198,-85.4367101967099 19.3498625978084,-85.4455396127352 19.3712933409316,-85.4551663879306 19.3923935549083,-85.4655787935532 19.4131375323782,-85.4767641436908 19.433499999999995,-85.4887088107172 19.983499999999996,-85.8285121199107 20.0184157813601,-85.8507545012033 20.414150748686026,-86.111978109655723 20.459994890328318,-86.0462230386063 20.511286225317207,-85.9777633991602 20.564756832510326,-85.9112802051259 20.620341566209323,-85.8468544560343 20.67797270497822,-85.7845646447367 20.737580034152113,-85.7244866617731 20.799090931381912,-85.666693702911388 20.862430455114609,-85.6112561799697 20.927521435897106,-85.5582416350302 20.99428457039582,-85.5077146581497 21.062638518015518,-85.4597368086663 21.132500000000025,-85.4143665401994 21.159134059210032,-85.398409617348662 21.17797270497821,-85.37797421353 21.237580034152117,-85.31767813422239 21.299090931381919,-85.2596753741587 21.362430455114616,-85.2040366007676 21.427521435897113,-85.1508296013238 21.494284570395809,-85.1001192003603 21.562638518015525,-85.0519671806893 21.632500000000014,-85.0064322081296 21.703783900894923,-84.9635697600311 21.776403372247511,-84.923432057684209 21.850269938418013,-84.8860680026967 21.92529360437381,-84.851523117414 22.00138296533461,-84.8198394894576 22.07844531813452,-84.7910557204477 22.156386774167309,-84.765206878973 22.235112373774825,-84.7423244578651 22.314526201940513,-84.722436335829386 22.394531505147725,-84.7055667434791 22.475030809258211,-84.691736233813884 22.555926038270023,-84.680961657179381 22.637118633807525,-84.673256140737379 22.718509675199723,-84.668629072473 22.799999999999997,-84.6670860897559 22.881490324800303,-84.668629072473 22.962881366192505,-84.673256140737379 23.044073961730007,-84.680961657179381 23.124969190741798,-84.691736233813884 23.205468494852305,-84.7055667434791 23.2854737980595,-84.722436335829386 23.364887626225205,-84.7423244578651 23.443613225832703,-84.765206878973 23.521554681865506,-84.7910557204477 23.598617034665402,-84.8198394894576 23.674706395626202,-84.851523117414 23.749730061581996,-84.8860680026967 23.8235966277525,-84.923432057684209 23.896216099105104,-84.9635697600311 23.967499999999998,-85.0064322081296 24.037361481984505,-85.0519671806893 24.105715429604203,-85.1001192003603 24.1724785641029,-85.1508296013238 24.237569544885396,-85.2040366007676 24.300909068618093,-85.2596753741587 24.362419965847891,-85.31767813422239 24.422027295021802,-85.37797421353 24.4796584337908,-85.4404901505969 24.535243167489696,-85.5051497793836 24.588713774682798,-85.5718743220924 24.640005109671705,-85.6405824851462 24.689054681865507,-85.711190558232 24.735802731915996,-85.7836125162892 24.7801923045253,-85.857760124317409 24.8221693178367,-85.9335430448779 24.861682629325607,-86.0108689481556 24.8986840981086,-86.089643624448286 24.9331286435955,-86.16977109894728 24.964974300413406,-86.2511537486677 24.994182269535102,-86.3336924213867 25.020716965549198,-86.4172865564459 25.044546060016007,-86.5018343072682 25.065640520854508,-86.587232665443 25.0839746477134,-86.6733775862253 25.099526103283498,-86.76016411529892 25.1122759405116,-86.8474865166464 25.122208625684898,-86.935238401372885 25.129312057356707,-87.0233128573239 25.133577581089593,-87.1116025793417 25.134999999999998,-87.199999999999989 25.133577581089593,-87.288397420658271 25.129312057356707,-87.37668714267609 25.122208625684898,-87.464761598627092 25.1122759405116,-87.552513483353579 25.099526103283498,-87.639835884701085 25.0839746477134,-87.726622413774678 25.065640520854508,-87.812767334556966 25.044546060016007,-87.89816569273178 25.020716965549198,-87.98271344355409 24.994182269535102,-88.066307578613277 24.8941822695351,-88.365673779535868 24.864974300413405,-88.44815206615668 24.833128643595494,-88.529475175536376 24.798684098108595,-88.60954402799328 24.761682629325602,-88.688261071964192 24.7221693178367,-88.765530402856484 24.680192304525296,-88.841257879892865 24.635802731916009,-88.915351240807581 24.589054681865502,-88.987720214253571 24.540005109671704,-89.058276629784189 24.488713774682793,-89.126934525275487 24.435243167489691,-89.193610251657788 24.379658433790695,-89.25822257482919 24.322027295021797,-89.320692774626465 24.262419965847904,-89.380944740734179 24.200909068618106,-89.43890506541257 24.137569544885409,-89.494503132934284 24.116379573371855,-89.511811674487276 24.079658433790698,-89.55440403836279 24.0220272950218,-89.616738564361285 23.962419965847907,-89.676859674266169 23.900909068618105,-89.73469411976609 23.837569544885408,-89.790171438497865 23.772478564102894,-89.843224039894167 23.7057154296042,-89.893787287532476 23.6373614819845,-89.941799577884069 23.567499999999995,-89.987202415368984 23.4962160991051,-90.029940483623491 23.4235966277525,-90.069961712894582 23.349730061581994,-90.107217343479491 23.2747063956262,-90.141661985130767 23.1986170346654,-90.173253672358669 23.121554681865504,-90.201953915558491 23.0436132258327,-90.22772774790478 22.9648876262252,-90.25054376795309 22.885473798059497,-90.270374177897466 22.805468494852303,-90.287194817438078 22.724969190741795,-90.300985193216576 22.644073961730005,-90.311728503784479 22.562881366192503,-90.319411660072475 22.4814903248003,-90.32402530133848 22.399999999999995,-90.325563806570983 22.318509675199721,-90.32402530133848 22.237118633807523,-90.319411660072475 22.155926038270021,-90.311728503784479 22.075030809258212,-90.300985193216576 21.994531505147723,-90.287194817438078 21.914526201940511,-90.270374177897466 21.835112373774823,-90.25054376795309 21.756386774167325,-90.22772774790478 21.678445318134521,-90.201953915558491 21.601382965334622,-90.173253672358669 21.525293604373825,-90.141661985130767 21.450269938418014,-90.107217343479491 21.376403372247509,-90.069961712894582 21.303783900894924,-90.029940483623491 21.232500000000012,-89.987202415368984 21.162638518015523,-89.941799577884069 21.094284570395821,-89.893787287532476 21.027521435897111,-89.843224039894167 20.962430455114614,-89.790171438497865 20.899090931381917,-89.73469411976609 20.837580034152118,-89.676859674266169 20.777972704978225,-89.616738564361285 20.72034156620931,-89.55440403836279 20.664756832510314,-89.489932041288782 20.624204395078976,-89.439474583075935 20.595323184258408,-89.42247162755379 20.549500000000009,-89.39520915577269 20.504591184386008,-89.366246836550687 20.46065145189041,-89.335619956012579 20.41773433630901,-89.303365828294488 20.375892125536215,-89.269523750082783 20.335175797860508,-89.234134952736781 20.295634959855409,-89.197242552054789 20.257317785941012,-89.158891495744086 20.220270959691714,-89.1191285086595 20.184539616958407,-89.078002035875585 20.150167290878411,-89.035562183664382 20.117195858836311,-88.991860658448587 20.085665491443208,-88.946950703804887 20.055614603594908,-88.90088703559519 19.897085267962336,-88.653956345133636 19.452126686228908,-88.3965286074127 19.41650000000001,-88.375513017619681 19.381584218639908,-88.353187080884879 18.78158421863991,-87.949245498796685 18.747421881649604,-87.9257247734877 18.71405461057471,-87.900954360542983 18.68152305829501,-87.874964438895091 18.649866859495809,-87.847786673260288 18.619124582379204,-87.819454175559386 18.589333681674308,-87.790001464576591 18.560530453004809,-87.7594644239035 18.532749988667902,-87.727880258220182 18.506026134880209,-87.695287447967388 18.480391450541006,-87.661725702463983 18.455877167564406,-87.627235911526881 18.43251315282831,-87.5918600956537 18.410327871785409,-87.555641354826889 18.389348353783603,-87.518623816002986 18.369600159133604,-87.48085257935098 18.351107347968906,-87.4423736633045 18.33389245093111,-87.403233948495583 18.31797644172061,-87.3634811206376 18.303378711542805,-87.323163612428 18.290117045483612,-87.282330544539988 18.278207600840005,-87.241031665777 18.267664887435906,-87.1993172924611 18.258501749943612,-87.157238247130593 18.250729352234803,-87.1148457966206 18.244357163778609,-87.072191589601786 18.239392948105206,-87.029327593655083 18.235842753346805,-86.986306031956985 18.233710904868708,-86.9431793196534 18.233000000000004,-86.9