GDACS_FL_1971_1
info-gdacs@gdacs.org
2002-07-13T21:59:59-00:00
Actual
Alert
Public
1971
Geo
Flood
Past
Moderate
Unknown
Global Disaster Alert and Coordination System

Green flood alert in China
On 30/06/2002, a flood started in China, lasting until 13/07/2002 (last update). The flood caused 0 killed and 0 displaced .
http://www.gdacs.org/report.aspx?eventtype=FL&eventid=1971
eventid
1971
currentepisodeid
1
glide
0
version
1
fromdate
Sat, 29 Jun 2002 22:00:00 GMT
todate
Sat, 13 Jul 2002 21:59:59 GMT
eventtype
FL
alertlevel
Green
alerttype
automatic
link
http://www.gdacs.org/report.aspx?eventtype=FL&amp;eventid=1971
country
China
eventname
severity
Magnitude 6.92
population
0 killed and 0 displaced
vulnerability
sourceid
DFO
iso3
hazardcomponents
FL,dead=0,displaced=0,main_cause=Heavy rain,severity=1,sqkm=598178.98
datemodified
Thu, 28 May 2015 11:47:31 GMT
Polygon
28.567937000000086,109.22691300000002 27.454433000000051,108.37046500000008 26.538661000000047,110.22745200000003 27.454433000000051,115.47971300000006 26.596565000000055,119.94276000000002 26.597151000000054,119.94765000000007 26.601721000000055,119.95095000000003 26.604187000000081,119.95586000000003 26.602890000000059,119.96072000000004 26.604279000000076,119.9693400000001 26.601509000000078,119.97559000000001 26.601871000000074,119.9818600000001 26.598894000000087,119.98788000000002 26.603199000000075,119.99722000000008 26.602207000000078,120 26.601057000000083,120.00323000000003 26.606585000000052,120.0160800000001 26.611156000000051,120.01891 26.628819000000078,120.05281000000002 26.631012000000055,120.06400000000008 26.637888000000089,120.06616000000008 26.640787000000046,120.06898000000001 26.64259700000008,120.07645000000002 26.64905200000004,120.07908000000009 26.650190000000066,120.0911900000001 26.631189000000063,120.08957000000009 26.624165000000062,120.08112000000006 26.621218000000056,120.08341000000007 26.618166000000087,120.09663 26.623154000000056,120.09948000000009 26.630737000000067,120.11491000000001 26.646032000000048,120.13206000000002 26.648132000000089,120.13115000000005 26.647741000000053,120.12836000000004 26.640135000000043,120.11548000000005 26.638927000000081,120.11059 26.641472000000078,120.1069 26.648165000000063,120.10627 26.650364000000081,120.11653000000001 26.660383000000081,120.11781000000008 26.662109000000044,120.11224000000004 26.66964100000007,120.1111800000001 26.670938000000035,120.1067700000001 26.67530400000004,120.10915 26.687010000000043,120.10881000000006 26.691891000000055,120.10120000000006 26.694389000000058,120.10215000000005 26.694754000000046,120.10774000000004 26.705124000000069,120.11577 26.706936000000042,120.12277000000006 26.713327000000049,120.13168000000007 26.711573000000044,120.14004 26.71358100000009,120.14821000000006 26.721684000000039,120.15319 26.731079000000079,120.154 26.731733000000077,120.15121000000011 26.727404000000035,120.14535000000001 26.728556000000083,120.13442000000009 26.730652000000077,120.13375000000008 26.736406000000045,120.14359000000002 26.73830600000008,120.14175 26.737770000000069,120.13244000000009 26.732622000000049,120.1246900000001 26.734737000000052,120.12216000000001 26.734613000000081,120.11332000000004 26.744493000000091,120.10738000000003 26.746855000000039,120.10089000000005 26.748751000000084,120.09928000000002 26.752939000000083,120.09840000000008 26.758152000000052,120.09962000000007 26.76185600000008,120.10548000000006 26.769550000000038,120.10954000000004 26.773052000000064,120.11469 26.778048000000069,120.11684000000002 26.78322600000007,120.12157000000002 26.787928000000079,120.13232000000005 26.793312000000071,120.13728000000003 26.796051000000091,120.13499000000002 26.796501000000035,120.13173000000006 26.793024000000059,120.12401 26.791836000000046,120.11724000000004 26.797663000000057,120.11987000000011 26.792450000000088,120.09699 26.809462000000053,120.08810000000005 26.817600000000084,120.08936000000006 26.823101000000065,120.08244000000002 26.821266000000037,120.07752000000005 26.821539000000087,120.07078000000001 26.81727200000006,120.05769000000009 26.819626000000085,120.05166000000008 26.818909000000076,120.03884000000005 26.823114000000089,120.03586000000007 26.83274700000004,120.03387000000009 26.84891500000009,120.02542000000005 26.859369000000072,120.02483000000007 26.867498000000069,120.02725000000009 26.873932000000082,120.03222000000005 26.875986000000069,120.03596000000005 26.87424100000004,120.04411000000005 26.875484000000085,120.04528000000005 26.875235000000089,120.04971 26.869957000000056,120.05547000000001 26.868649000000062,120.06128000000001 26.871099000000072,120.0673700000001 26.872972000000061,120.06808000000001 26.879480000000058,120.06513000000007 26.87874400000004,120.05441000000008 26.881947000000082,120.04698000000008 26.885105000000067,120.04446000000007 26.894508000000087,120.04456000000005 26.893995000000075,120.05481000000009 26.88871800000004,120.0605700000001 26.890764000000047,120.06525000000011 26.89024500000005,120.0759700000001 26.893358000000035,120.07834000000003 26.891233000000057,120.08204 26.888506000000064,120.08318000000008 26.882282000000089,120.07821000000001 26.879765000000077,120.07935000000009 26.875654000000054,120.0939800000001 26.875988000000063,120.09792000000004 26.87994000000009,120.10475000000008 26.883266000000049,120.10665000000006 26.891211000000055,120.10628000000008 26.887182000000053,120.11229000000003 26.888832000000036,120.11464000000001 26.895502000000079,120.11635000000001 26.900949000000082,120.1150100000001 26.909582000000057,120.10835000000009 26.913141000000053,120.10770000000002 26.916033000000084,120.11122 26.92830100000009,120.11766 26.931154000000049,120.12515000000008 26.930483000000038,120.12958000000003 26.921711000000073,120.12901000000011 26.916887000000088,120.13081 26.918917000000079,120.13689000000011 26.927868000000046,120.14050000000009 26.929520000000082,120.14262000000008 26.921944000000053,120.14789000000007 26.927437000000054,120.16287 26.925089000000071,120.16774000000009 26.924313000000041,120.18242000000009 26.919235000000072,120.18842000000006 26.918779000000086,120.19214 26.921850000000063,120.19847000000004 26.922010000000057,120.2031300000001 26.918594000000041,120.21008000000006 26.922049000000072,120.21945000000005 26.914486000000068,120.22332000000006 26.913202000000069,120.22610000000009 26.914228000000037,120.22798 26.919420000000059,120.23108000000002 26.927267000000086,120.24004000000002 26.935610000000054,120.2415400000001 26.938166000000081,120.23714000000007 26.944191000000046,120.24048000000005 26.948610000000087,120.23751000000004 26.959400000000073,120.24487000000011 26.962339000000043,120.2435200000001 26.963047000000074,120.23606000000007 26.965588000000082,120.23283000000004 26.955801000000065,120.20938000000001 26.955139000000088,120.19259 26.957041000000061,120.19051000000002 26.960966000000042,120.19499000000008 26.962688000000071,120.19012000000009 26.962536000000057,120.18452000000002 26.968046000000072,120.17712000000006 26.973028000000056,120.15969000000007 26.975693000000035,120.16486000000009 26.975389000000064,120.17418000000009 26.978054000000043,120.17934000000002 26.977783000000045,120.18540000000007 26.980436000000054,120.19173 26.976372000000083,120.20078000000001 26.983032000000037,120.20343000000003 26.973530000000039,120.21287000000007 26.972633000000087,120.21869000000004 26.975973000000067,120.2390200000001 26.978819000000044,120.24652000000003 26.984627000000046,120.25056000000006 26.989071000000081,120.26485000000002 26.995920000000069,120.26936 27.012428000000057,120.26958000000002 27.019999000000041,120.26524000000006 27.027502000000084,120.26721000000009 27.028982000000042,120.26559000000009 27.027985000000058,120.26115000000004 27.03011100000009,120.25768000000005 27.026159000000064,120.2364 27.027029000000084,120.23314000000005 27.031443000000081,120.23086 27.033731000000046,120.23183000000006 27.037317000000087,120.24844000000007 27.042290000000037,120.25246000000004 27.04240400000009,120.26134000000002 27.051701000000037,120.25189 27.051805000000058,120.24209000000008 27.054567000000077,120.23769000000004 27.060776000000089,120.2436100000001 27.063711000000069,120.2427100000001 27.065540000000055,120.24763000000007 27.066730000000064,120.25349000000006 27.060991000000058,120.26251000000002 27.059441000000049,120.27066000000002 27.049166000000071,120.27380000000005 27.046417000000076,120.27679 27.045948000000067,120.28146000000004 27.047800000000052,120.28404 27.053890000000081,120.28133000000003 27.058477000000039,120.28232000000003 27.064362000000074,120.27936 27.070795000000089,120.28365000000008 27.076233000000059,120.28325000000007 27.080460000000073,120.2788700000001 27.085247000000038,120.2808 27.090088000000037,120.2776 27.092220000000054,120.27366000000006 27.088779000000045,120.26334000000008 27.089933000000087,120.25308000000007 27.09536200000008,120.25362000000007 27.100140000000067,120.25648000000001 27.113201000000061,120.24661000000003 27.117605000000083,120.24526000000003 27.122805000000085,120.24767000000008 27.126926000000083,120.25309000000004 27.122496000000069,120.25700000000006 27.120993000000055,120.26072000000011 27.112598000000048,120.26388000000009 27.108337000000063,120.2715300000001 27.098680000000058,120.27538000000004 27.099157000000048,120.28915000000006 27.094479000000035,120.29657000000009 27.094200000000058,120.30286000000001 27.100502000000063,120.31882000000007 27.092720000000043,120.32316000000003 27.089943000000062,120.3284900000001 27.090784000000042,120.34648000000004 27.087322000000086,120.35693000000003 27.085415000000069,120.37722000000008 27.081980000000044,120.38511000000005 27.08236700000009,120.38769000000002 27.086706000000049,120.39194000000009 27.08919700000007,120.39339000000007 27.088505000000055,120.38123000000007 27.090017000000046,120.37682000000007 27.094225000000051,120.37454000000002 27.097982000000059,120.37483000000009 27.104944000000046,120.38731000000007 27.107042000000035,120.38663000000008 27.10927200000009,120.37452000000008 27.112423000000035,120.3731600000001 27.116377000000057,120.37462000000005 27.118164000000036,120.38282000000004 27.117371000000048,120.39705000000004 27.118977000000086,120.40268000000003 27.119467000000043,120.41413 27.131823000000054,120.39445 27.134418000000039,120.38408000000004 27.135704000000089,120.38409000000001 27.135710000000074,120.40152 27.139330000000086,120.41348000000005 27.13927300000006,120.41839000000004 27.133125000000064,120.42554000000007 27.132250000000056,120.42879000000005 27.140362000000039,120.43218000000002 27.144043000000067,120.43877000000009 27.146122000000048,120.43974000000003 27.148666000000048,120.4367400000001 27.145466000000056,120.42478000000006 27.148607000000084,120.40661 27.168379000000073,120.3959000000001 27.169298000000083,120.3889200000001 27.177284000000043,120.38506000000007 27.190567000000044,120.37519000000009 27.200354000000061,120.37836000000004 27.204025000000058,120.38613000000009 27.19685700000008,120.39140000000009 27.191320000000076,120.40021000000002 27.18563800000004,120.40340000000003 27.175028000000054,120.41703000000007 27.167303000000061,120.41622000000007 27.160381000000086,120.4184600000001 27.166368000000091,120.42461000000003 27.168161000000055,120.43188000000009 27.171486000000073,120.43357000000003 27.17631700000004,120.43153000000007 27.183130000000062,120.42112000000009 27.19235000000009,120.41915000000006 27.195250000000044,120.42130000000009 27.195200000000057,120.42550000000006 27.197657000000049,120.42974000000004 27.208086000000037,120.43153000000007 27.208977000000061,120.44440000000009 27.218552000000045,120.44758000000002 27.218721000000073,120.45085000000006 27.216347000000042,120.45713 27.209179000000063,120.46217000000001 27.205549000000076,120.46842000000004 27.194891000000041,120.4682600000001 27.189899000000082,120.46632 27.190815000000043,120.45979 27.188322000000085,120.45859000000007 27.181374000000062,120.46268000000009 27.174677000000088,120.46352000000002 27.164972000000091,120.47086000000002 27.162611000000084,120.4759600000001 27.164042000000052,120.47855000000004 27.179998000000069,120.48954000000003 27.188042000000053,120.49831000000006 27.191406000000086,120.51331000000005 27.195953000000088,120.51736000000005 27.207758000000069,120.50935000000004 27.211081000000036,120.51104000000009 27.215605000000039,120.51695000000007 27.222471000000041,120.51939000000004 27.220932000000062,120.52545000000009 27.221729000000039,120.52850000000001 27.223391000000049,120.5292300000001 27.231579000000067,120.52631000000008 27.243107000000066,120.54029000000003 27.245237000000088,120.53705000000002 27.245216000000084,120.52232000000004 27.246523000000082,120.51813000000004 27.249044000000083,120.51700000000005 27.256559000000038,120.51781000000005 27.26152600000006,120.52163000000007 27.269247000000064,120.52269000000001 27.270447000000047,120.52692000000002 27.274973000000045,120.5326 27.275126000000057,120.53704000000005 27.278364000000067,120.54528000000005 27.282305000000065,120.54768000000001 27.285681000000068,120.54516000000001 27.287554000000057,120.5458900000001 27.291054000000088,120.54992000000004 27.294714000000056,120.55793000000006 27.298719000000062,120.55518000000006 27.30052900000004,120.54446000000007 27.301998000000083,120.54401000000007 27.306137000000035,120.54735000000005 27.308950000000038,120.55605000000003 27.312298000000055,120.55587000000003 27.314363000000071,120.55777 27.318554000000063,120.55690000000004 27.324762000000078,120.56168000000002 27.32644300000004,120.56100000000004 27.32668300000006,120.55867 27.31911800000006,120.54545000000007 27.319593000000054,120.54101000000003 27.326498000000072,120.54041000000007 27.328400000000045,120.53880000000004 27.327578000000074,120.52125000000001 27.335869000000059,120.51014000000009 27.338182000000074,120.50900000000001 27.338335000000086,120.51345000000003 27.335733000000062,120.5209000000001 27.338726000000065,120.53218000000004 27.34183900000005,120.53387000000009 27.349823000000072,120.53072000000009 27.357958000000053,120.53201000000001 27.357649000000038,120.53973000000008 27.364677000000086,120.54592000000002 27.366064000000051,120.55180000000007 27.367718000000082,120.55322000000001 27.374388000000067,120.55473000000006 27.382992000000058,120.5520600000001 27.380209000000036,120.54078000000004 27.383383000000038,120.53779000000009 27.393192000000056,120.53888000000006 27.391407000000072,120.54774000000009 27.398159000000078,120.54270000000008 27.401903000000061,120.54416000000003 27.403324000000055,120.54746 27.403257000000053,120.55261000000007 27.398960000000045,120.56168000000002 27.395857000000035,120.57544000000007 27.386782000000039,120.58208000000002 27.378304000000071,120.59108000000003 27.381399000000044,120.59417000000008 27.383005000000082,120.59911 27.388186000000076,120.60248000000001 27.389965000000075,120.61023 27.380966000000058,120.61102000000005 27.378633000000036,120.61356 27.376640000000066,120.62196000000006 27.373728000000085,120.62097000000006 27.369202000000087,120.61551000000009 27.366074000000083,120.61499000000003 27.362450000000081,120.62032000000011 27.361557000000062,120.62452000000008 27.366482000000076,120.63139000000001 27.364096000000075,120.63790000000006 27.364851000000044,120.64376000000004 27.370466000000079,120.64597000000003 27.379271000000074,120.644 27.382744000000059,120.64991000000009 27.393230000000074,120.64728000000002 27.394348000000036,120.64191000000005 27.395823000000064,120.64100000000008 27.398056000000054,120.64595000000008 27.401594000000046,120.64694000000009 27.403492000000085,120.6458100000001 27.405680000000075,120.63858000000005 27.409235000000081,120.63840000000005 27.415672000000086,120.64156000000003 27.424284000000057,120.63842 27.428026000000045,120.63988000000006 27.432920000000081,120.6488700000001 27.437714000000085,120.64989000000003 27.443811000000039,120.64718000000005 27.443470000000048,120.65701000000001 27.445490000000063,120.66219000000001 27.452154000000064,120.66395 27.45826100000005,120.67576000000008 27.474033000000077,120.68399000000011 27.475298000000066,120.68331 27.476671000000067,120.67467000000011 27.47963100000004,120.67213000000004 27.484772000000078,120.66309000000001 27.49187100000006,120.66367000000002 27.495651000000066,120.66233 27.499260000000049,120.65817000000004 27.49956700000007,120.65091000000007 27.496140000000082,120.64172000000008 27.499159000000077,120.63474000000008 27.491028000000085,120.63319000000001 27.487108000000035,120.62938000000008 27.503061000000059,120.60855000000004 27.507887000000039,120.6072200000001 27.514977000000044,120.60851000000002 27.541082000000074,120.5941600000001 27.550041000000078,120.59641000000011 27.563501000000088,120.59007000000008 27.572508000000084,120.58857 27.57667500000008,120.58958000000007 27.580572000000075,120.59527000000003 27.582861000000037,120.59601000000009 27.586855000000071,120.59419000000003 27.594551000000081,120.59713000000011 27.596336000000065,120.60443000000009 27.601900000000057,120.61039000000005 27.595322000000067,120.61778000000004 27.594858000000045,120.62130000000002 27.599371000000076,120.6277 27.599054000000081,120.63567 27.600689000000045,120.63851 27.604887000000076,120.63718000000006 27.610491000000081,120.64008000000001 27.614876000000038,120.64039000000002 27.612419000000045,120.65208000000007 27.614853000000039,120.65752000000009 27.628799000000072,120.66174000000001 27.635540000000049,120.65786000000003 27.636753000000056,120.66093000000001 27.634525000000053,120.6709800000001 27.63885300000004,120.67551000000003 27.649120000000039,120.67187000000001 27.653383000000076,120.66755 27.654730000000086,120.6607600000001 27.65707000000009,120.65775000000008 27.659588000000042,120.65709000000004 27.674149000000057,120.66226000000006 27.688536000000056,120.66485 27.695511000000067,120.67435 27.700935000000072,120.67516 27.706400000000087,120.67290000000003 27.710213000000067,120.66920000000005 27.722811000000036,120.6802100000001 27.719994000000042,120.68745000000001 27.719446000000062,120.69683000000009 27.719999000000087,120.70225000000005 27.723234000000048,120.71005000000002 27.736612000000036,120.72484000000009 27.74257300000005,120.73199 27.748579000000063,120.73586 27.763357000000042,120.74034000000006 27.774551000000088,120.74688000000003 27.785797000000059,120.74966000000006 27.796108000000061,120.75948000000005 27.803772000000038,120.76431000000002 27.813715000000059,120.77060000000006 27.826014000000043,120.78727000000003 27.847462000000064,120.80717000000004 27.86051000000009,120.82951000000003 27.862909000000059,120.83684000000005 27.872784000000081,120.84737000000007 27.885704000000089,120.84996000000001 27.890322000000083,120.84863000000007 27.895090000000039,120.85131000000001 27.905941000000041,120.85245000000009 27.919807000000048,120.86165000000005 27.931881000000089,120.86493000000007 27.938391000000081,120.86293 27.942429000000061,120.85854000000006 27.946779000000049,120.84708 27.958733000000052,120.83036000000004 27.962681000000089,120.8177300000001 27.970551000000057,120.80846000000008 27.971226000000058,120.80517000000009 27.96887600000008,120.79430000000002 27.970619000000056,120.78939000000003 27.969879000000049,120.78278 27.972897000000046,120.77648000000011 27.973709000000042,120.76355000000001 27.97884600000009,120.75517000000002 27.986834000000044,120.73718000000008 27.991299000000083,120.73185000000001 28.00142100000005,120.72543000000007 28.014349000000038,120.71271000000002 28.016743000000076,120.70592000000011 28.018629000000089,120.69041000000004 28.019905000000051,120.67348000000004 28.025894000000051,120.66345000000001 28.026415000000043,120.65592000000004 28.024818000000039,120.65025000000003 28.036829000000068,120.64314000000002 28.040804000000037,120.65829000000008 28.051140000000089,120.66670000000011 28.048346000000038,120.67231000000004 28.044273000000089,120.67977000000008 28.045206000000064,120.68803000000003 28.040739000000087,120.69361000000004 28.031118000000049,120.73890000000006 28.024281000000087,120.76421000000005 28.018847000000051,120.77872000000002 28.007591000000048,120.79099000000008 27.996431000000086,120.79668000000004 27.993441000000075,120.80110000000002 27.989002000000085,120.81868000000009 27.989525000000071,120.82574 27.993956000000082,120.83713 27.998049000000037,120.85698000000002 27.998543000000041,120.87959000000001 27.992060000000038,120.90725000000009 27.98988200000008,120.92651000000001 27.980030000000056,120.94594000000006 27.986416000000077,120.94763 27.983791000000053,120.95512000000008 27.984993000000088,120.95844 27.99111600000009,120.95455000000004 28.007647000000077,120.96665000000007 28.023184000000072,120.97543000000007 28.044640000000072,120.99305000000004 28.053614000000039,120.99393000000009 28.074141000000054,120.99128000000007 28.08024800000004,120.98833000000002 28.087038000000064,120.99507000000006 28.09015700000009,120.99607000000003 28.092688000000066,120.99471000000005 28.094646000000068,120.98980000000006 28.099024000000043,120.99059 28.109358000000043,120.99787000000003 28.121229000000085,121.00046000000009 28.127974000000052,121.01003000000003 28.145315000000039,121.02334000000008 28.147146000000077,121.02644000000009 28.14283800000004,121.03437000000008 28.14352400000007,121.04358000000002 28.147799000000077,121.05050000000006 28.150179000000037,121.05833000000007 28.167627000000039,121.07755000000009 28.168184000000053,121.08181000000002 28.165382000000079,121.08694000000003 28.165709000000049,121.09237000000007 28.167953000000068,121.09572000000003 28.172766000000081,121.09534000000008 28.180563000000063,121.10400000000004 28.186954000000071,121.09682000000009 28.190306000000078,121.09642000000008 28.199802000000091,121.10345000000007 28.204418000000089,121.10237000000006 28.212984000000063,121.11506000000008 28.217621000000065,121.11279000000002 28.224628000000052,121.1186100000001 28.234421000000054,121.12046000000009 28.246210000000076,121.12779 28.249763000000087,121.12786000000006 28.252724000000057,121.12580000000003 28.257242000000076,121.11811 28.27112800000009,121.11274000000003 28.277088000000049,121.10625000000005 28.277798000000075,121.10131000000001 28.275406000000089,121.09441000000004 28.276144000000045,121.0750700000001 28.280424000000039,121.06902000000002 28.279972000000043,121.0584 28.282812000000035,121.05090000000007 28.282131000000049,121.04144000000008 28.285746000000074,121.03773000000001 28.288568000000055,121.03118000000006 28.294569000000081,121.03484000000003 28.29403700000006,121.04192 28.301655000000039,121.04892000000007 28.307764000000077,121.04597000000001 28.310637000000042,121.04934000000003 28.308609000000047,121.05827000000011 28.303316000000052,121.06241 28.299751000000072,121.06305000000009 28.299883000000079,121.06777 28.297731000000056,121.07150000000001 28.305353000000082,121.07827000000009 28.300070000000062,121.08170000000007 28.286919000000069,121.08073000000002 28.283112000000074,121.08348000000001 28.281034000000091,121.0952400000001 28.282373000000064,121.1151000000001 28.28541800000005,121.12059000000011 28.294550000000072,121.12432000000001 28.299360000000036,121.13647000000003 28.301044000000047,121.13580000000002 28.304739000000041,121.12737000000004 28.308460000000082,121.12981000000002 28.315432000000044,121.13776000000007 28.316168000000062,121.14367000000004 28.322380000000067,121.14711 28.326370000000054,121.14601000000005 28.325659000000087,121.13868000000002 28.32840200000004,121.13708000000008 28.33896100000004,121.1429700000001 28.340380000000039,121.14561000000003 28.338844000000051,121.14983000000007 28.348089000000073,121.15923000000009 28.346758000000079,121.16369000000009 28.349176000000057,121.16894000000002 28.350677000000076,121.17889000000002 28.359989000000041,121.18430000000001 28.363991000000055,121.18249000000003 28.378054000000077,121.16696000000002 28.383011000000067,121.17038000000002 28.386374000000046,121.1692700000001 28.38926500000008,121.17122000000006 28.390017000000057,121.17620000000011 28.386412000000064,121.19125000000008 28.38857500000006,121.19909000000007 28.384899000000075,121.20610000000011 28.376682000000073,121.19788000000005 28.375202000000058,121.1988 28.374121000000059,121.20090000000005 28.380245000000059,121.2093000000001 28.374580000000037,121.22241000000008 28.372896000000082,121.2230800000001 28.370636000000047,121.22091 28.369282000000055,121.21474 28.362843000000055,121.21247000000005 28.357576000000051,121.21471000000008 28.357901000000084,121.2201500000001 28.353634000000056,121.22502000000009 28.354269000000045,121.23637000000008 28.350792000000069,121.24386000000004 28.350336000000084,121.25778000000003 28.352755000000059,121.26280000000008 28.360943000000077,121.2724300000001 28.361088000000052,121.27598 28.357723000000078,121.27708000000007 28.353596000000039,121.27415000000008 28.341143000000045,121.25758000000008 28.34012400000006,121.2443300000001 28.335278000000073,121.23477000000003 28.337330000000065,121.22514000000001 28.331007000000056,121.21626000000003 28.325817000000086,121.21426000000008 28.318020000000047,121.21786000000009 28.319813000000067,121.22286000000008 28.319729000000052,121.2275800000001 28.317373000000089,121.23083000000008 28.303144000000088,121.23170000000005 28.301512000000059,121.24135000000001 28.295088000000078,121.24994000000004 28.289803000000063,121.25336000000004 28.281424000000072,121.25436000000002 28.277954000000079,121.26136000000008 28.279945000000055,121.26684 28.277781000000061,121.27103 28.269613000000049,121.26023000000009 28.259214000000043,121.25740000000008 28.253151000000059,121.25750000000005 28.249548000000061,121.26025000000004 28.245396000000085,121.2587400000001 28.239050000000077,121.26285000000007 28.236267000000055,121.26656000000003 28.234207000000083,121.26487000000009 28.231274000000042,121.2652700000001 28.226158000000055,121.27082000000007 28.222227000000089,121.26861000000008 28.219915000000071,121.26926000000003 28.218390000000056,121.27277000000004 28.213554000000045,121.27431000000001 28.211618000000044,121.27734000000009 28.206242000000088,121.27415000000008 28.19745800000004,121.27442000000008 28.191301000000067,121.27971000000002 28.19041100000004,121.28276000000005 28.191408000000081,121.29693000000009 28.190102000000081,121.29974000000004 28.181070000000091,121.30212000000006 28.175776000000042,121.30601000000001 28.168724000000054,121.31434000000002 28.166561000000058,121.31830000000002 28.167459000000065,121.32634000000007 28.166128000000072,121.33055000000002 28.161453000000051,121.33469000000002 28.157249000000036,121.3360100000001 28.150875000000042,121.3302000000001 28.150106000000051,121.33797000000004 28.15122000000008,121.34554000000003 28.148899000000085,121.34666000000004 28.144159000000059,121.34302000000002 28.141417000000047,121.34437000000003 28.140951000000086,121.34695000000011 28.143766000000085,121.35291000000007 28.139065000000073,121.35846000000004 28.139612000000056,121.36272000000008 28.15434300000004,121.36871000000008 28.16119000000009,121.38255000000004 28.168013000000087,121.38649000000009 28.180914000000087,121.38962000000004 28.188662000000079,121.38886000000002 28.184984000000043,121.38429000000008 28.184212000000059,121.38097000000005 28.179850000000044,121.37946000000011 28.179245000000037,121.3671700000001 28.180756000000088,121.36462000000006 28.188704000000087,121.36433 28.194345000000055,121.37555000000009 28.199095000000057,121.37872000000004 28.202242000000069,121.37809000000004 28.207054000000085,121.36665000000005 28.21044500000005,121.36413000000005 28.21484600000008,121.36353000000008 28.224133000000052,121.36987000000011 28.221525000000042,121.37524000000008 28.229427000000044,121.37731000000008 28.230682000000058,121.38844000000006 28.23260300000004,121.39745000000005 28.230352000000039,121.40588000000002 28.239344000000074,121.41672000000005 28.247040000000084,121.42964000000006 28.249779000000046,121.42853000000002 28.247570000000053,121.42376000000002 28.253265000000056,121.42106000000001 28.257605000000069,121.42376000000002 28.261574000000053,121.43472000000008 28.263885000000073,121.43406000000004 28.264191000000039,121.42911000000004 28.270311000000049,121.42596000000003 28.277201000000048,121.41550000000007 28.276653000000067,121.41123000000005 28.280712000000051,121.40661 28.286913000000084,121.41029000000003 28.293125000000089,121.40241000000003 28.297112000000084,121.40157000000011 28.301895000000059,121.40286000000003 28.304752000000065,121.40647000000001 28.305281000000036,121.41167000000007 28.302225000000078,121.41845 28.304483000000062,121.42063000000007 28.304815000000076,121.42513000000008 28.29862200000008,121.43206000000009 28.297066000000086,121.43698000000006 28.291950000000043,121.44205 28.292088000000035,121.44583 28.303551000000084,121.44753000000003 28.303709000000083,121.45013000000006 28.30112500000007,121.45408000000009 28.304771000000073,121.46007000000009 28.306889000000069,121.45870000000002 28.30951900000008,121.45239000000004 28.313103000000069,121.45083 28.320963000000063,121.45503000000008 28.329979000000037,121.46446000000003 28.336329000000035,121.4818600000001 28.334162000000049,121.4858200000001 28.335588000000087,121.49837000000002 28.332436000000087,121.50986 28.332834000000048,121.52145000000007 28.325209000000086,121.53709000000003 28.32380500000005,121.54461000000003 28.319376000000091,121.54662000000008 28.313915000000065,121.54790000000003 28.313019000000054,121.55095000000006 28.317663000000039,121.55910000000006 28.313148000000069,121.56536000000006 28.310631000000058,121.57616000000007 28.306751000000077,121.58196000000009 28.295715000000087,121.59019 28.285995000000071,121.59537 28.278051000000062,121.59540000000004 28.272501000000091,121.59077000000002 28.268314000000089,121.59114 28.264814000000058,121.58846000000005 28.260168000000078,121.58055000000002 28.257261000000085,121.57953000000009 28.254478000000063,121.58276000000001 28.250505000000089,121.5829 28.248358000000053,121.58568000000002 28.252117000000055,121.59616000000005 28.253391000000079,121.60539000000006 28.261454000000072,121.60985000000005 28.258341000000087,121.6189700000001 28.263048000000083,121.62382000000002 28.266531000000043,121.61706000000004 28.268421000000046,121.61664000000007 28.272518000000048,121.62076000000002 28.276331000000084,121.61826000000008 28.277090000000044,121.62206000000003 28.283216000000039,121.62906000000009 28.283747000000062,121.63379000000009 28.287622000000056,121.6383800000001 28.30154200000004,121.6425200000001 28.305473000000063,121.64451000000008 28.312420000000088,121.64209000000005 28.322914000000083,121.65015000000005 28.327419000000077,121.64461000000006 28.337645000000066,121.6554900000001 28.343889000000047,121.66676000000007 28.345791000000077,121.66587000000004 28.346504000000039,121.66164000000003 28.34497500000009,121.65083000000004 28.346581000000072,121.65086000000008 28.350340000000074,121.65820000000008 28.351665000000082,121.65469000000007 28.349718000000053,121.64778000000001 28.344065000000057,121.63818000000003 28.343365000000063,121.63155000000006 28.336168000000043,121.62570000000005 28.33603700000009,121.62192000000005 28.338156000000083,121.62055000000009 28.343758000000037,121.62259000000006 28.350758000000042,121.61757 28.352411000000075,121.61856 28.356403000000057,121.61748 28.36048500000004,121.61215000000004 28.356575000000078,121.59882000000005 28.353945000000067,121.59450000000004 28.353861000000052,121.58836000000008 28.357679000000076,121.58562000000006 28.363348000000087,121.58434 28.366041000000052,121.58559000000002 28.367027000000064,121.58846000000005 28.374146000000053,121.58793000000003 28.379923000000076,121.59161000000006 28.39117200000004,121.58316000000002 28.398792000000071,121.57839000000001 28.407616000000075,121.57625000000007 28.420980000000043,121.56642000000011 28.428574000000083,121.56306000000006 28.431873000000053,121.56528000000003 28.43382500000007,121.57218 28.437138000000061,121.57368000000008 28.452038000000073,121.57076000000006 28.474010000000078,121.57983000000002 28.481497000000047,121.58167000000003 28.485291000000075,121.5801100000001 28.488695000000064,121.57712000000004 28.489922000000035,121.56816000000003 28.48696700000005,121.55910000000006 28.490541000000064,121.5476000000001 28.491152000000056,121.5379200000001 28.496504000000073,121.54207000000008 28.492256000000054,121.55592000000001 28.492352000000039,121.5616 28.495157000000063,121.56759 28.497646000000088,121.56860000000006 28.512192000000084,121.56234000000006 28.524782000000073,121.54940000000011 28.564489000000037,121.52863000000002 28.578436000000067,121.52092000000005 28.600746000000072,121.51295000000005 28.626772000000074,121.50744000000009 28.654100000000085,121.49935000000005 28.66138600000005,121.49005 28.684341000000074,121.44868000000008 28.684671000000037,121.4422800000001 28.691544000000079,121.4436300000001 28.690807000000063,121.44930000000011 28.692543000000057,121.45693000000006 28.691502000000071,121.46757000000002 28.696831000000088,121.49448000000007 28.69482000000005,121.50107000000003 28.695234000000085,121.51198000000011 28.691376000000048,121.5275200000001 28.69796000000008,121.54333000000008 28.706520000000069,121.55421000000001 28.711298000000056,121.56618000000003 28.71761500000008,121.57417000000009 28.715437000000065,121.57861000000003 28.715084000000047,121.58572000000004 28.72133800000006,121.60721000000001 28.721256000000039,121.61124000000007 28.716097000000048,121.61821000000009 28.719305000000077,121.62493000000006 28.725367000000062,121.62486000000001 28.733873000000074,121.62791000000004 28.74372500000004,121.62651000000005 28.763113000000089,121.62891000000002 28.776365000000055,121.63495 28.78188700000004,121.64079000000004 28.784496000000047,121.64606000000003 28.786001000000056,121.64397000000008 28.787653000000034,121.64497000000006 28.788567000000057,121.65139000000011 28.786379000000068,121.65608000000009 28.788069000000064,121.66537000000005 28.786348000000089,121.66770000000008 28.786890000000085,121.67175000000009 28.785116000000073,121.67668000000003 28.792606000000035,121.67830000000004 28.800121000000047,121.67874000000006 28.800205000000062,121.67471 28.802736000000039,121.67358000000002 28.79954100000009,121.66639000000009 28.799301000000071,121.65784000000008 28.800842000000046,121.64388000000008 28.802120000000059,121.64273000000003 28.809265000000039,121.65099000000009 28.814310000000035,121.65966000000003 28.817472000000066,121.65832 28.819721000000072,121.66075000000001 28.823713000000055,121.66987000000006 28.822714000000076,121.67777000000001 28.827150000000074,121.67542000000003 28.832069000000047,121.68005000000005 28.834223000000065,121.67702000000008 28.833958000000052,121.66966000000002 28.839298000000042,121.66411000000005 28.844908000000089,121.66568000000007 28.843639000000053,121.64619000000005 28.845217000000048,121.64053000000001 28.844912000000079,121.63506000000007 28.846655000000055,121.63155000000006 28.849405000000047,121.6299600000001 28.860165000000052,121.63522 28.866653000000042,121.63468 28.867331000000036,121.63232000000005 28.87303200000008,121.63960000000009 28.877390000000048,121.64113000000009 28.880547000000035,121.64002000000005 28.879736000000037,121.62861000000009 28.881504000000064,121.62391000000002 28.884893000000091,121.62162000000001 28.892181000000051,121.62299000000007 28.894293000000062,121.62186000000008 28.894367000000045,121.61830000000009 28.899261000000081,121.61392000000001 28.897932000000083,121.59702000000004 28.894909000000041,121.59149000000002 28.895437000000072,121.58604000000003 28.903513000000089,121.56892000000005 28.906588000000056,121.54050000000007 28.912748000000079,121.53542000000004 28.912447000000043,121.52948000000004 28.916536000000065,121.52341000000001 28.919062000000054,121.5225200000001 28.929161000000079,121.52966000000004 28.932291000000077,121.52998000000002 28.934198000000038,121.5286000000001 28.932631000000072,121.52334000000008 28.934116000000074,121.52219000000002 28.938906000000088,121.52302000000009 28.939991000000077,121.5209000000001 28.935146000000088,121.51224000000002 28.93507800000009,121.50511000000006 28.931669000000056,121.49766 28.934839000000068,121.49584000000004 28.939617000000055,121.49738000000002 28.950041000000056,121.5092800000001 28.950581000000057,121.51381000000003 28.946705000000065,121.51965000000007 28.946440000000052,121.52249000000006 28.953875000000039,121.52695000000006 28.953316000000086,121.53407000000004 28.955168000000072,121.53554000000008 28.957907000000034,121.53442000000007 28.960979000000066,121.53758000000005 28.962538000000052,121.54333000000008 28.959362000000056,121.54539 28.965197000000046,121.55669 28.961807000000078,121.55899000000011 28.945341000000042,121.55691000000002 28.938618000000076,121.55864000000008 28.936045000000036,121.56190000000004 28.935884000000044,121.56997000000001 28.932775000000049,121.57915000000003 28.932962000000089,121.5905600000001 28.943390000000079,121.60199 28.94267700000006,121.60625000000005 28.936228000000085,121.61511000000007 28.93012200000004,121.61732000000006 28.925848000000087,121.62196000000006 28.923779000000081,121.64139 28.91764500000005,121.64503000000002 28.918318000000056,121.65289000000007 28.915014000000042,121.66111000000001 28.919725000000085,121.67572000000007 28.917141000000072,121.67945000000009 28.919424000000049,121.6902 28.916410000000042,121.69440000000009 28.916555000000074,121.69749000000002 28.922569000000067,121.69978000000003 28.922718000000089,121.70264000000009 28.931379000000049,121.70809000000008 28.93701400000009,121.71845000000008 28.940516000000059,121.72092000000009 28.942671000000075,121.72763000000009 28.944424000000083,121.72388000000001 28.948147000000063,121.72564 28.949654000000066,121.72354000000007 28.946035000000052,121.71680000000003 28.94763800000004,121.71019000000001 28.946901000000082,121.70541000000003 28.949850000000083,121.70431000000008 28.953999000000067,121.70584000000008 28.957026000000042,121.71091000000001 28.958921000000089,121.71025000000009 28.962168000000077,121.70487000000003 28.961174000000085,121.70247000000006 28.953962000000047,121.69753000000003 28.949482000000046,121.69195000000002 28.949760000000083,121.6886300000001 28.963829000000089,121.69541000000004 28.968206000000066,121.69601 28.97095500000006,121.69441000000006 28.973562000000072,121.68974000000003 28.967728000000079,121.68887000000007 28.964909000000034,121.68380000000002 28.964584000000059,121.67928000000006 28.972168000000067,121.67639000000008 28.97397600000005,121.66978000000006 28.976318000000049,121.66771000000006 28.982346000000064,121.66929000000005 28.98682000000008,121.66513000000009 28.99038500000006,121.66451000000006 28.992439000000047,121.66623000000004 28.990971000000059,121.67665 28.992805000000089,121.67883000000006 28.999937000000045,121.6776000000001 29.00592400000005,121.68108000000007 29.011623000000043,121.67838000000006 29.013981000000058,121.68558000000007 29.012892000000079,121.69767000000002 29.008665000000065,121.69994000000008 29.008844000000067,121.70136000000002 29.016901000000075,121.70586000000003 29.018318000000079,121.69805000000008 29.022814000000039,121.69294000000002 29.021852000000081,121.68887000000007 29.023090000000082,121.67963000000009 29.026695000000075,121.67712000000006 29.031021000000067,121.68008000000009 29.034258000000079,121.67518000000007 29.027863000000082,121.6712 29.026077000000043,121.66664000000003 29.026802000000089,121.66190000000006 29.030226000000084,121.65795000000003 29.036327000000085,121.65598 29.044031000000075,121.65736000000004 29.050009000000045,121.66132000000005 29.053837000000044,121.6581000000001 29.047890000000052,121.64249000000007 29.040779000000043,121.63255000000004 29.037994000000083,121.62558000000001 29.041176000000064,121.61307000000011 29.039143000000081,121.59994000000006 29.036167000000034,121.59201000000007 29.036434000000042,121.58917000000008 29.047567000000072,121.57590000000005 29.050833000000068,121.56933000000004 29.050951000000055,121.56339000000003 29.044909000000075,121.5520600000001 29.039339000000041,121.54835000000003 29.029945000000055,121.5478700000001 29.025591000000077,121.54610000000002 29.023052000000064,121.54770000000008 29.022350000000074,121.55149000000006 29.023884000000066,121.55842000000007 29.022936000000072,121.56410000000005 29.020363000000089,121.56736000000001 29.015074000000084,121.56010000000003 29.007059000000083,121.54279000000008 29.006184000000076,121.53420000000006 29.000471000000061,121.52717000000007 29.003029000000083,121.52462000000003 29.005331000000069,121.52444000000003 29.016279000000054,121.53089 29.020763000000045,121.52601000000004 29.035578000000044,121.53780000000006 29.039318000000037,121.53884000000005 29.044611000000089,121.53541000000007 29.05016500000005,121.53983000000005 29.05372600000004,121.53944000000001 29.058708000000081,121.53053 29.05987500000009,121.53484000000003 29.058729000000085,121.54004000000009 29.05593900000008,121.54378000000008 29.056261000000063,121.54854 29.059059000000047,121.5550300000001 29.059126000000049,121.56216000000006 29.057108000000085,121.56901000000005 29.063364000000036,121.56964000000005 29.062643000000037,121.57438000000002 29.059015000000045,121.57809000000009 29.059155000000089,121.58167000000003 29.05809000000005,121.5825900000001 29.051250000000039,121.57980000000009 29.048307000000079,121.58067000000005 29.04332700000009,121.58935000000008 29.043772000000047,121.59839 29.04691100000008,121.60846000000004 29.045155000000079,121.62292000000002 29.04728700000004,121.63106000000005 29.049765000000036,121.63255000000004 29.064880000000073,121.62914 29.075712000000067,121.63084000000003 29.088913000000048,121.62904000000003 29.095552000000055,121.63136000000009 29.098759000000086,121.62788 29.101192000000083,121.64173000000005 29.105486000000042,121.64637000000005 29.106827000000067,121.63189 29.105242000000089,121.62756000000002 29.107855000000086,121.62240000000008 29.104799000000071,121.6185200000001 29.100651000000084,121.61698000000001 29.099510000000066,121.61148000000003 29.10314800000009,121.60729000000003 29.103039000000081,121.60229000000004 29.104572000000076,121.59876000000008 29.101906000000042,121.59631000000002 29.10217700000004,121.59323000000006 29.110598000000039,121.59012000000007 29.112953000000061,121.58732000000009 29.117411000000061,121.57339000000002 29.116856000000041,121.56982000000005 29.111900000000048,121.5668300000001 29.111658000000091,121.55802000000006 29.116747000000089,121.55434000000002 29.111380000000054,121.54041000000007 29.107189000000062,121.50914 29.104074000000082,121.49741000000006 29.101881000000049,121.48118 29.10374100000007,121.47147000000007 29.099863000000084,121.46661000000006 29.097507000000064,121.45871 29.097754000000066,121.45681000000002 29.104460000000074,121.45579000000009 29.105890000000045,121.44654000000003 29.111620000000073,121.44193000000007 29.106501000000037,121.42538000000002 29.101374000000078,121.42027000000007 29.100197000000037,121.41619000000003 29.101326000000086,121.41171000000008 29.105616000000055,121.4058500000001 29.10852200000005,121.39570000000003 29.111370000000079,121.39981 29.110081000000037,121.41286000000002 29.112034000000051,121.42004000000009 29.111673000000053,121.42812000000004 29.114861000000076,121.4362900000001 29.11493500000006,121.44343000000003 29.111860000000036,121.45121000000006 29.112442000000044,121.45360000000005 29.114985000000047,121.45176000000004 29.119362000000081,121.45234000000005 29.124210000000062,121.45008000000007 29.126476000000082,121.45180000000005 29.127193000000091,121.45801000000006 29.13258200000007,121.46028000000001 29.137018000000069,121.4577700000001 29.134844000000044,121.45129000000009 29.13784000000004,121.44756000000007 29.136047000000076,121.44299000000001 29.136965000000089,121.43873000000008 29.139071000000058,121.43783000000008 29.146757000000036,121.44016000000011 29.15145700000005,121.44575000000009 29.154404000000056,121.44463000000007 29.153627000000085,121.44151000000011 29.155371000000059,121.43775000000005 29.154413000000091,121.43320000000006 29.146887000000049,121.42231000000004 29.145582000000047,121.41395 29.153261000000043,121.41676000000007 29.156820000000039,121.41637000000003 29.159590000000037,121.41357000000005 29.169098000000076,121.41904 29.16819600000008,121.42258000000004 29.16912700000006,121.42856000000006 29.167389000000071,121.43209000000002 29.166727000000037,121.44492000000002 29.163593000000049,121.45580000000007 29.157433000000083,121.46112000000005 29.156023000000062,121.46918000000005 29.159946000000048,121.47166000000004 29.165632000000073,121.48013000000003 29.169983000000059,121.48214000000007 29.178383000000053,121.47997000000009 29.186478000000079,121.48278000000005 29.195953000000088,121.47897 29.199703000000056,121.47954000000004 29.197296000000051,121.4851900000001 29.191801000000055,121.48839000000009 29.185781000000077,121.48634000000004 29.178453000000047,121.48711000000003 29.169718000000046,121.48499000000004 29.169432000000086,121.48903000000007 29.160236000000054,121.48904000000005 29.160391000000061,121.4919000000001 29.170731000000046,121.50810000000001 29.172281000000055,121.51433000000009 29.178543000000047,121.51472000000001 29.181614000000081,121.51790000000005 29.180578000000082,121.52811000000008 29.184416000000056,121.53487000000007 29.187159000000065,121.53351000000009 29.186640000000068,121.52802000000008 29.191086000000041,121.5250400000001 29.198400000000049,121.52498000000003 29.203716000000043,121.5203600000001 29.206388000000061,121.52256 29.206026000000065,121.53041000000007 29.211275000000057,121.52911000000006 29.219391000000087,121.53075000000001 29.231178000000057,121.53699000000006 29.23954000000009,121.54745000000003 29.243986000000064,121.54446000000007 29.250608000000057,121.54773 29.258772000000079,121.54698000000008 29.26844600000004,121.53317000000004 29.266806000000088,121.52098000000001 29.268602000000044,121.51459 29.266090000000077,121.49332000000004 29.268358000000035,121.48409000000004 29.266409000000067,121.47689000000003 29.262327000000084,121.47179000000006 29.25614500000006,121.45639000000006 29.258862000000079,121.45645000000002 29.262352000000078,121.45964000000004 29.271189000000049,121.47820000000002 29.272425000000055,121.48991000000001 29.270905000000084,121.50368000000003 29.272394000000077,121.5130200000001 29.27053600000005,121.52250000000004 29.271891000000039,121.52802000000008 29.276567000000057,121.53457000000003 29.267962000000068,121.55770000000007 29.267897000000062,121.56104000000005 29.273184000000072,121.56831 29.273331000000042,121.5714200000001 29.269705000000044,121.57513000000006 29.270454000000086,121.57944000000009 29.266571000000056,121.58554000000004 29.26690300000007,121.58984000000009 29.27877600000005,121.59157000000005 29.280565000000081,121.59615000000008 29.260406000000046,121.60110000000009 29.246794000000079,121.60266000000001 29.230986000000087,121.60940000000005 29.224508000000071,121.6094700000001 29.221535000000074,121.61177000000009 29.218927000000065,121.61671000000001 29.207573000000082,121.62022000000002 29.203299000000072,121.62488000000008 29.196966000000089,121.62804000000006 29.188395000000071,121.62830000000008 29.186523000000079,121.63801000000001 29.187107000000083,121.64017000000001 29.189180000000079,121.64094 29.200119000000086,121.63741000000005 29.230579000000034,121.63963000000001 29.235855000000072,121.63715000000002 29.239357000000041,121.63963000000001 29.280298000000073,121.64022 29.284101000000078,121.63818000000003 29.283442000000036,121.62958000000003 29.286024000000054,121.62583000000006 29.296316000000047,121.62324000000001 29.302090000000078,121.62697000000003 29.303989000000058,121.63631000000009 29.302677000000074,121.63914 29.29972100000009,121.6407200000001 29.299040000000048,121.64333000000011 29.298355000000072,121.6461700000001 29.319328000000041,121.66270000000009 29.320871000000068,121.66893000000005 29.319365000000062,121.67104000000006 29.312840000000051,121.66324000000009 29.309946000000082,121.66173000000003 29.308872000000065,121.66313000000002 29.309652000000085,121.66578000000004 29.307755000000043,121.66668000000004 29.303185000000042,121.66537000000005 29.300804000000085,121.6693600000001 29.286604000000068,121.65565000000004 29.280165000000068,121.65690000000006 29.266218000000038,121.65439000000003 29.242353000000037,121.64638000000002 29.23566100000005,121.64668000000006 29.232435000000066,121.65112000000011 29.227928000000077,121.6467100000001 29.221682000000044,121.64560000000006 29.207636000000036,121.64785000000006 29.191870000000051,121.65244000000007 29.184031000000061,121.65771000000007 29.183121000000085,121.66125 29.188284000000067,121.66425000000004 29.18777700000004,121.66852000000006 29.18409900000006,121.67461000000003 29.18354000000005,121.69150000000002 29.187464000000091,121.69375000000002 29.187752000000046,121.69994000000008 29.19508600000006,121.70895000000007 29.206442000000038,121.71545000000003 29.20821600000005,121.72049000000004 29.215937000000054,121.73094000000003 29.228504000000044,121.7393800000001 29.232687000000055,121.73925000000008 29.251280000000065,121.72952000000009 29.259251000000063,121.72806000000003 29.270672000000047,121.73146000000008 29.270107000000053,121.71858000000009 29.278437000000054,121.72000000000003 29.280165000000068,121.72720000000004 29.283775000000048,121.7244300000001 29.288290000000075,121.72836000000007 29.285219000000041,121.7351900000001 29.287834000000089,121.74003000000005 29.285074000000066,121.74210000000005 29.279491000000064,121.73933 29.274469000000067,121.73967000000005 29.271189000000049,121.7367200000001 29.270821000000069,121.73433 29.254328000000044,121.73364000000004 29.244228000000078,121.73695000000009 29.231949000000043,121.74448000000007 29.225073000000066,121.74358000000007 29.211908000000051,121.73369000000002 29.201084000000037,121.73174000000006 29.196226000000081,121.73422000000005 29.188551000000075,121.74139000000002 29.194227000000069,121.74964 29.198219000000051,121.74856 29.20486800000009,121.75040000000001 29.208494000000087,121.75670000000002 29.22128500000008,121.76443000000006 29.235950000000059,121.77245000000005 29.254633000000069,121.77821000000006 29.27256200000005,121.78012000000001 29.277401000000054,121.77859000000001 29.28113600000006,121.77011000000005 29.293884000000048,121.76998000000003 29.299150000000054,121.76798000000008 29.301422000000059,121.76923000000011 29.303576000000078,121.77597000000003 29.305634000000055,121.77746000000002 29.308573000000081,121.77682000000004 29.311634000000083,121.77047000000005 29.315897000000064,121.7665300000001 29.320868000000075,121.76858000000004 29.321718000000089,121.77388000000008 29.326088000000084,121.77850000000001 29.329454000000055,121.77740000000006 29.32876200000004,121.77070000000003 29.330530000000067,121.76622000000009 29.335440000000062,121.77112 29.337339000000043,121.77999 29.341883000000053,121.78250000000003 29.351122000000089,121.78037000000006 29.350883000000067,121.77202 29.354498000000035,121.76902000000007 29.364054000000067,121.77167000000009 29.370543000000055,121.77113000000008 29.37154600000008,121.7730600000001 29.370253000000048,121.77493000000004 29.363331000000073,121.77618000000007 29.363905000000045,121.77858000000003 29.36739300000005,121.78153000000009 29.368494000000055,121.78872000000001 29.378513000000055,121.80856000000006 29.375992000000053,121.80920000000003 29.364080000000058,121.79957000000002 29.36033400000008,121.78921000000003 29.358654000000058,121.78964000000008 29.354658000000086,121.80050000000006 29.350889000000052,121.80087000000003 29.344055000000083,121.79807000000005 29.34082600000005,121.79272000000003 29.334908000000041,121.79590000000007 29.330620000000067,121.7912500000001 29.328726000000074,121.79192 29.329020000000071,121.79765000000009 29.333078000000057,121.80325000000005 29.338844000000051,121.81676000000004 29.340633000000082,121.83064000000002 29.337463000000071,121.83221000000003 29.333565000000078,121.82900000000006 29.332623000000069,121.82421000000011 29.330353000000059,121.82295000000011 29.326939000000039,121.83573000000001 29.325029000000086,121.83711000000005 29.321745000000078,121.83440000000007 29.322908000000041,121.82895000000008 29.321217000000047,121.82032000000004 29.315344000000039,121.82134000000008 29.310978000000034,121.82027000000005 29.309370000000058,121.8173700000001 29.310987000000068,121.81026000000008 29.300898000000075,121.80331000000001 29.297098000000062,121.80511000000001 29.29509900000005,121.81053000000009 29.298923000000059,121.81731000000002 29.299629000000039,121.82329000000004 29.297855000000084,121.8375400000001 29.296139000000039,121.83964000000003 29.287884000000076,121.83488 29.27998000000008,121.82370000000003 29.280918000000042,121.81895000000009 29.27989400000007,121.81798000000003 29.255848000000071,121.81874000000005 29.246176000000048,121.83109000000002 29.242020000000082,121.83955000000003 29.22036200000008,121.81704000000002 29.198351000000059,121.80095000000006 29.196848000000045,121.80281000000002 29.195791000000042,121.81302000000005 29.192001000000062,121.8143500000001 29.177473000000077,121.82550000000003 29.161634000000049,121.84612000000004 29.167263000000048,121.85627 29.16911500000009,121.86703 29.167521000000079,121.87294000000009 29.16848200000004,121.87678000000005 29.176687000000072,121.88367000000005 29.188932000000079,121.90617000000009 29.193607000000043,121.93059000000005 29.196220000000039,121.93519000000003 29.201538000000085,121.94034000000011 29.210430000000088,121.94440000000009 29.226473000000055,121.94654000000003 29.22870400000005,121.94946000000004 29.228346000000045,121.95612000000006 29.218630000000076,121.9606 29.215317000000084,121.95931000000007 29.211903000000063,121.95326 29.197493000000065,121.95284000000004 29.196411000000069,121.9544800000001 29.198847000000058,121.95765000000006 29.195930000000089,121.9663700000001 29.196733000000052,121.96782000000007 29.201574000000051,121.96630000000005 29.20292500000005,121.96205000000009 29.20589300000006,121.96023000000002 29.213993000000073,121.96237000000008 29.216005000000052,121.96577000000002 29.221188000000041,121.96758 29.222548000000074,121.97215000000006 29.226585000000057,121.96917000000008 29.232048000000077,121.9679000000001 29.238277000000039,121.96046000000001 29.242931000000056,121.95798000000002 29.250662000000091,121.95796000000007 29.253126000000066,121.95994000000007 29.250263000000075,121.96629000000007 29.253149000000064,121.96804000000009 29.258211000000074,121.96604000000002 29.261892000000046,121.96949000000006 29.260954000000083,121.9739800000001 29.265171000000066,121.9815000000001 29.263365000000078,121.98740000000009 29.263844000000063,121.99385000000007 29.269167000000039,121.98948000000007 29.275097000000073,121.99513000000002 29.277802000000065,121.99569000000008 29.278124000000048,121.99069000000009 29.284042000000056,121.98777000000007 29.283092000000067,121.98369000000002 29.276798000000042,121.97564 29.276344000000051,121.96800000000007 29.268011000000058,121.95775000000003 29.267103000000077,121.95177000000001 29.274532000000079,121.92815000000007 29.278399000000036,121.9235000000001 29.284876000000054,121.92345 29.288046000000065,121.92187000000001 29.292072000000076,121.91007000000002 29.298359000000062,121.90929000000006 29.303114000000051,121.91158000000007 29.305004000000054,121.92045000000007 29.307440000000042,121.92362000000003 29.312950000000058,121.92020000000002 29.316681000000074,121.91221000000007 29.326576000000045,121.91821000000004 29.331429000000071,121.92550000000006 29.33072100000004,121.92906000000005 29.332756000000074,121.93150000000003 29.336590000000058,121.92828000000009 29.337296000000038,121.92472000000009 29.336052000000052,121.92146000000002 29.346474000000057,121.9161600000001 29.349380000000053,121.91696000000002 29.351780000000076,121.92180000000008 29.354654000000039,121.92403000000002 29.358707000000038,121.92033000000004 29.362520000000075,121.92735000000005 29.367060000000038,121.92987000000005 29.371483000000069,121.92833000000007 29.369154000000037,121.92039 29.375492000000065,121.90793000000008 29.378496000000041,121.90444000000002 29.381649000000039,121.90357000000006 29.38769300000007,121.90422000000001 29.394520000000057,121.90728000000001 29.393755000000056,121.91347000000007 29.395582000000047,121.91590000000008 29.400904000000082,121.91152 29.418385000000058,121.9239500000001 29.424374000000057,121.94560000000001 29.420259000000044,121.96124000000009 29.412409000000082,121.96649000000002 29.414646000000062,121.96918000000005 29.421827000000064,121.96581000000003 29.426163000000088,121.96809000000007 29.427134000000081,121.96215000000007 29.433273000000042,121.96782000000007 29.432554000000039,121.97186000000011 29.433966000000055,121.97404000000006 29.440533000000073,121.97018000000003 29.447659000000044,121.96919000000003 29.446386000000075,121.97918000000004 29.45050800000007,121.98169000000007 29.458101000000056,121.9785700000001 29.464994000000047,121.96946000000003 29.468603000000087,121.96694000000002 29.472666000000061,121.95369000000005 29.471043000000066,121.95149000000004 29.47151000000008,121.94936000000007 29.478020000000072,121.94788000000005 29.479403000000048,121.94218000000001 29.483408000000054,121.94063000000006 29.492823000000044,121.94926000000009 29.495966000000067,121.94888000000003 29.496294000000034,121.9436300000001 29.500315000000057,121.94136000000003 29.503201000000047,121.94312000000002 29.500908000000038,121.95213000000001 29.502485000000036,121.95623 29.509457000000054,121.95285000000001 29.510197000000062,121.94785000000002 29.508823000000064,121.93468000000007 29.510660000000087,121.9273300000001 29.514986000000079,121.92077000000006 29.518808000000035,121.91801000000009 29.530495000000087,121.91859 29.537716000000046,121.92262000000005 29.54138400000005,121.9267900000001 29.541452000000049,121.94231000000002 29.53638600000005,121.95387000000005 29.53991300000007,121.9549300000001 29.543806000000075,121.94907 29.550814000000059,121.95334000000003 29.559643000000051,121.9509700000001 29.558271000000047,121.95618000000002 29.560299000000043,121.95887000000005 29.561975000000075,121.95868000000007 29.566433000000075,121.96478000000002 29.565050000000042,121.97048000000007 29.567249000000061,121.97485000000006 29.56633400000004,121.98748 29.567537000000073,121.98967000000005 29.572119000000043,121.9902800000001 29.569860000000062,121.97946000000002 29.570574000000079,121.97565000000009 29.574337000000071,121.97553000000005 29.578976000000068,121.98283000000004 29.581882000000064,121.99272000000008 29.584316000000058,121.9959 29.589697000000058,121.99821000000009 29.598295000000064,121.99679000000003 29.601728000000037,121.99283000000003 29.595217000000048,121.98522000000003 29.593882000000065,121.97969 29.601423000000068,121.97871000000009 29.604868000000067,121.97427000000005 29.610918000000083,121.97469000000001 29.615030000000047,121.96836000000008 29.609215000000063,121.95767000000001 29.609709000000066,121.95434 29.614944000000037,121.95377000000008 29.617620000000045,121.95552000000009 29.621069000000034,121.95084000000008 29.625095000000044,121.94833000000006 29.627365000000054,121.94959000000006 29.629932000000053,121.95612000000006 29.633411000000081,121.95524 29.631632000000081,121.94566000000009 29.636129000000039,121.94077000000004 29.632452000000058,121.93707000000006 29.63607200000007,121.92474000000004 29.639492000000075,121.9212500000001 29.640182000000038,121.91840000000002 29.638977000000068,121.91621000000009 29.63092000000006,121.91216000000009 29.620838000000049,121.89585 29.620424000000071,121.88628000000006 29.616182000000038,121.87970000000007 29.615864000000045,121.87515000000008 29.62122700000009,121.86885000000007 29.620230000000049,121.86667 29.607271000000082,121.85746000000006 29.605099000000052,121.85166000000004 29.605417000000045,121.84665000000007 29.610872000000086,121.83604000000003 29.611420000000066,121.83009000000004 29.609701000000086,121.82262000000003 29.602455000000077,121.81956000000002 29.600243000000034,121.81567000000007 29.600151000000039,121.81017000000008 29.60265000000004,121.80092000000002 29.600365000000068,121.79058000000009 29.597473000000036,121.78906000000006 29.593061000000034,121.79014000000006 29.576681000000065,121.77463 29.565136000000052,121.76739000000009 29.560614000000044,121.75412000000006 29.552870000000041,121.74483000000009 29.539516000000049,121.74399000000005 29.537750000000074,121.74848000000009 29.541542000000049,121.7569400000001 29.542051000000072,121.7722500000001 29.545635000000061,121.78046000000006 29.542330000000049,121.7885 29.547306000000049,121.80966000000001 29.543566000000055,121.81839000000002 29.543047000000058,121.83271000000002 29.541737000000069,121.83530000000007 29.53331600000007,121.8381700000001 29.529850000000067,121.84381000000008 29.527349000000072,121.85305000000005 29.523706000000061,121.85725000000002 29.519964000000073,121.85643000000005 29.526964000000078,121.8325000000001 29.525558000000046,121.82983000000002 29.509287000000086,121.81911000000002 29.494476000000077,121.81798000000003 29.488464000000079,121.81590000000006 29.482063000000039,121.81239000000005 29.476351000000079,121.8060200000001 29.465273000000082,121.77706 29.468771000000061,121.76976000000002 29.477474000000086,121.76331000000005 29.491577000000063,121.75845000000004 29.498894000000064,121.75817000000006 29.507002000000057,121.76006000000007 29.524761000000069,121.76986000000011 29.530689000000052,121.77599000000009 29.532787000000042,121.77557000000002 29.531988000000069,121.76409000000001 29.530790000000081,121.76143000000002 29.525618000000065,121.75914 29.524149000000079,121.74954000000002 29.51973200000009,121.74107000000004 29.51984200000004,121.73581000000001 29.524532000000079,121.73140000000001 29.531088000000068,121.73755000000006 29.535048000000074,121.72810000000004 29.534533000000067,121.7128100000001 29.524723000000051,121.69224000000008 29.514431000000059,121.67477000000008 29.511372000000051,121.67110000000002 29.499359000000084,121.66602 29.493879000000049,121.65823 29.494278000000065,121.64893000000006 29.489569000000074,121.63400000000001 29.489782000000048,121.62350000000004 29.480013000000042,121.6003300000001 29.475742000000082,121.59449000000006 29.474386000000038,121.5892 29.474800000000073,121.57895000000008 29.473217000000091,121.57461 29.455883000000085,121.55316000000005 29.453396000000055,121.5521500000001 29.445192000000077,121.55504000000008 29.429884000000072,121.54726000000005 29.42664300000007,121.54216000000008 29.421696000000054,121.53870000000006 29.413805000000082,121.52561000000003 29.401939000000084,121.51267000000007 29.399351000000081,121.50616000000002 29.38708100000008,121.49250000000006 29.387798000000089,121.48775 29.373384000000044,121.48763000000008 29.381231000000071,121.48163 29.389362000000062,121.48254000000009 29.397552000000076,121.48036000000002 29.402555000000064,121.4809600000001 29.412632000000087,121.48932000000002 29.415472000000079,121.49368000000004 29.417130000000043,121.50518 29.421436000000085,121.50934000000007 29.435333000000071,121.5144600000001 29.443729000000076,121.51252 29.445993000000044,121.51425000000006 29.443594000000076,121.51944000000003 29.452734000000078,121.52206000000001 29.456938000000036,121.52876000000003 29.462162000000035,121.53136000000006 29.465950000000078,121.53002000000004 29.465351000000055,121.52858000000003 29.459566000000052,121.52533000000005 29.458591000000069,121.52172000000007 29.453497000000084,121.51515000000006 29.453669000000048,121.50632000000007 29.456240000000037,121.50305000000003 29.460981000000061,121.50627000000009 29.461952000000053,121.49937 29.468699000000072,121.5069400000001 29.472296000000085,121.50464 29.480764000000079,121.50963000000002 29.485771000000057,121.50999000000002 29.487686000000053,121.50813000000005 29.482695000000035,121.49631000000011 29.47568700000005,121.4913600000001 29.467836000000091,121.47588000000007 29.463297000000068,121.47291000000007 29.459066000000064,121.47567000000004 29.439856000000077,121.46422000000007 29.430082000000084,121.46183000000008 29.417526000000066,121.46296000000007 29.410208000000068,121.44131000000004 29.411547000000041,121.43681000000004 29.416826000000071,121.43383000000006 29.420382000000075,121.43368000000009 29.430292000000065,121.4398900000001 29.446831000000088,121.43814000000009 29.45311200000009,121.42636000000005 29.46612900000008,121.42285000000004 29.469431000000043,121.42508000000009 29.470181000000082,121.42963000000009 29.472618000000068,121.43327000000011 29.482117000000073,121.43923000000007 29.482443000000046,121.44402000000002 29.487200000000087,121.44652000000008 29.490627000000075,121.45305000000008 29.494522000000075,121.45696000000009 29.496838000000082,121.45607000000007 29.499041000000091,121.45015000000001 29.51292600000005,121.44500000000005 29.517065000000059,121.44701000000009 29.522795000000087,121.45336000000009 29.515295000000037,121.46320000000003 29.516003000000069,121.46991000000003 29.517649000000063,121.47115000000008 29.524614000000042,121.46749 29.528145000000052,121.46854000000008 29.530369000000064,121.47241000000008 29.540449000000081,121.48055000000011 29.541086000000064,121.49083000000007 29.545069000000069,121.50096000000008 29.555096000000049,121.51172000000008 29.55297100000007,121.51358000000005 29.541691000000071,121.51353000000006 29.524229000000048,121.51978000000008 29.515648000000056,121.52053000000001 29.506109000000038,121.51694000000009 29.505426000000057,121.51979000000006 29.508219000000054,121.52655000000004 29.515059000000065,121.52935000000002 29.51580000000007,121.53414000000009 29.519474000000059,121.53854000000001 29.534943000000055,121.54872 29.536142000000041,121.55138000000011 29.534403000000054,121.55492000000004 29.534512000000063,121.5599400000001 29.536951000000045,121.56334000000004 29.541531000000077,121.5641700000001 29.545849000000089,121.56763000000001 29.546366000000035,121.57314000000008 29.538065000000074,121.59132 29.538736000000085,121.59946000000002 29.546732000000077,121.61734000000001 29.545330000000035,121.62470000000008 29.547729000000061,121.63002000000006 29.54356800000005,121.63947000000007 29.546665000000075,121.64123000000006 29.553623000000073,121.63806 29.571522000000073,121.64140000000009 29.571688000000051,121.64355 29.567039000000079,121.64606000000003 29.55470100000008,121.64669000000004 29.546923000000049,121.64912000000004 29.546198000000061,121.6538700000001 29.55380800000006,121.66984000000002 29.552855000000079,121.67555000000004 29.56136900000007,121.68820000000005 29.561731000000066,121.69083 29.557455000000061,121.69550000000004 29.558002000000045,121.69934 29.568666000000064,121.7089400000001 29.572754000000089,121.70332000000008 29.583183000000076,121.70407 29.586349000000041,121.70248000000004 29.588974000000064,121.69682 29.591078000000039,121.69616000000008 29.593136000000072,121.69765000000007 29.593021000000078,121.70314000000008 29.586712000000034,121.71516000000008 29.590424000000041,121.72745000000009 29.597551000000067,121.73624000000007 29.609076000000073,121.74445000000003 29.613869000000079,121.74506000000008 29.615662000000043,121.74917000000005 29.634933000000046,121.76643000000001 29.639042000000074,121.76965000000007 29.644888000000037,121.76981 29.650221000000045,121.7745000000001 29.66629000000006,121.79479000000003 29.681841000000077,121.82919000000004 29.687344000000053,121.8355600000001 29.692553000000089,121.8361900000001 29.696487000000047,121.82816000000003 29.698215000000062,121.83515 29.696692000000041,121.83797000000004 29.690319000000045,121.84282000000007 29.690878000000055,121.84595000000002 29.69374300000004,121.84866 29.699625000000083,121.84715000000006 29.714949000000047,121.86289000000011 29.719305000000077,121.86421000000007 29.731243000000063,121.86288000000002 29.753664000000072,121.86926000000005 29.765100000000075,121.88107000000002 29.766308000000038,121.89260000000002 29.773184000000072,121.90285000000006 29.77567300000004,121.91298000000006 29.785839000000067,121.92548000000011 29.787582000000043,121.94086000000004 29.789745000000039,121.94691 29.793545000000051,121.95444000000009 29.810564000000056,121.97769000000005 29.819862000000057,122.00047000000006 29.822279000000037,122.01348000000007 29.826029000000062,122.02293000000009 29.839622000000077,122.0403500000001 29.848680000000058,122.07297000000005 29.855846000000042,122.07917000000009 29.855492000000083,122.08539000000007 29.860479000000055,122.09537 29.860321000000056,122.10207000000003 29.870050000000049,122.11459000000002 29.870907000000045,122.1225300000001 29.878757000000064,122.13499000000002 29.881395000000055,122.13648 29.886677000000077,122.13571000000002 29.890295000000037,122.13295000000005 29.898075000000063,122.13079000000005 29.90234600000008,122.1268500000001 29.904774000000089,122.12141000000008 29.90332600000005,122.11202000000003 29.897413000000086,122.10584000000006 29.90085600000009,122.10164000000009 29.899925000000053,122.09682000000009 29.897245000000055,122.09529000000009 29.893059000000051,122.09564 29.889978000000042,122.09339 29.886650000000088,122.08395000000007 29.887749000000042,122.07272 29.882092000000057,122.05553000000009 29.881643000000054,122.04784000000006 29.883429000000035,122.02489000000003 29.875425000000064,122.01866000000007 29.872839000000056,122.01307000000008 29.87498700000009,122.01050000000009 29.882364000000052,122.00761 29.888418000000058,121.99867000000006 29.888851000000045,121.98886000000005 29.885000000000048,121.96526000000006 29.887934000000087,121.94641000000001 29.890562000000045,121.94098000000008 29.903852000000086,121.92578000000003 29.917725000000075,121.90318000000002 29.919924000000037,121.87926000000004 29.917311000000041,121.87463000000002 29.921251000000041,121.8663600000001 29.921612000000039,121.85941000000003 29.927866000000051,121.85048000000006 29.936638000000073,121.85049000000004 29.93981000000008,121.84866 29.937984000000085,121.84621000000004 29.930719000000067,121.84409000000005 29.928288000000066,121.84066000000007 29.923054000000036,121.84123 29.91996400000005,121.83923000000004 29.918383000000063,121.8351100000001 29.919916000000057,121.83179000000007 29.927254000000062,121.8305600000001 29.931496000000038,121.81797000000006 29.935335000000066,121.81425000000002 29.942518000000064,121.81037000000003 29.947653000000059,121.8047600000001 29.953732000000059,121.80373000000009 29.962002000000041,121.78813000000002 29.962534000000062,121.77303000000006 29.970592000000067,121.76726000000008 29.970888000000059,121.76319000000001 29.966005000000052,121.75706000000002 29.965723000000082,121.75058000000001 29.95789300000007,121.74557000000004 29.956085000000087,121.74216000000001 29.958605000000034,121.74151000000006 29.966446000000076,121.74604000000011 29.968758000000037,121.74538000000007 29.967377000000056,121.74151000000006 29.958658000000071,121.72904000000005 29.948757000000057,121.72301000000004 29.952000000000055,121.71783000000005 29.959400000000073,121.72355000000005 29.96484200000009,121.72298 29.96512000000007,121.71963000000005 29.959332000000074,121.70676000000003 29.962008000000083,121.67829000000006 29.965248000000088,121.67310000000009 29.978138000000058,121.66577000000007 29.985388000000057,121.65852000000007 30.000000000000057,121.64218000000005 30.00718500000005,121.63415000000009 30.010002000000043,121.62919000000011 30.026667000000089,121.62099 30.034801000000073,121.62144 30.036606000000063,121.61476000000005 30.049959000000058,121.60503000000006 30.051273000000037,121.60194000000001 30.049995000000081,121.59279000000004 30.078547000000071,121.57481000000007 30.095282000000054,121.57332000000008 30.099518000000046,121.57030000000009 30.107904000000076,121.55803000000003 30.122381000000075,121.54399000000001 30.14075100000008,121.53365000000008 30.150742000000037,121.52453000000003 30.174433000000079,121.50383000000011 30.192160000000058,121.48833000000002 30.197826000000077,121.47597000000007 30.208712000000048,121.46350000000007 30.217339000000038,121.4601100000001 30.227320000000077,121.45122000000003 30.263697000000036,121.40425000000005 30.276583000000073,121.38484000000005 30.285229000000072,121.35739000000001 30.295874000000083,121.33455000000004 30.299446000000046,121.32164 30.304888000000062,121.30926 30.31230000000005,121.27984000000004 30.314552000000049,121.24668000000008 30.314783000000034,121.23346000000004 30.311251000000084,121.22038000000009 30.312624000000085,121.21344000000011 30.308971000000042,121.19508000000008 30.308729000000085,121.18472000000008 30.301582000000053,121.16291000000001 30.294283000000064,121.15000000000009 30.291498000000047,121.14176000000009 30.287413000000072,121.13638000000003 30.28375200000005,121.11778000000004 30.276522000000057,121.10056000000009 30.272705000000087,121.09133000000008 30.267405000000053,121.08353 30.261202000000083,121.07979 30.252048000000059,121.07767000000001 30.248989000000051,121.07328000000007 30.248270000000048,121.06605000000002 30.242817000000059,121.05463000000009 30.209703000000047,121.00996000000009 30.197058000000084,120.97750000000008 30.191347000000064,120.96873000000005 30.184553000000051,120.96259000000009 30.185293000000058,120.95515 30.168144000000041,120.9158900000001 30.154415000000085,120.89857000000006 30.153217000000041,120.89494000000002 30.148478000000068,120.89077000000009 30.153835000000072,120.88150000000007 30.15326900000008,120.87740000000008 30.142653000000053,120.86111000000005 30.13390000000004,120.85999000000004 30.131214000000057,120.85801000000004 30.131273000000078,120.8539300000001 30.136768000000075,120.84947 30.131464000000051,120.84097000000008 30.130821000000083,120.82774000000006 30.128750000000082,120.82650000000001 30.123037000000068,120.83168 30.121225000000038,120.82708000000002 30.122314000000074,120.82398 30.127386000000058,120.81975 30.128008000000079,120.80560000000003 30.127893000000086,120.79887000000008 30.124208000000067,120.79375000000005 30.123642000000075,120.72987 30.117481000000055,120.72231000000011 30.112471000000085,120.70709000000011 30.112471000000085,120.69173 30.114658000000077,120.68433000000005 30.122818000000052,120.66741000000002 30.131136000000083,120.65435000000002 30.145725000000084,120.64043000000004 30.146242000000086,120.63299000000006 30.139988000000073,120.63216 30.137663000000089,120.6342800000001 30.135273000000041,120.64145000000008 30.117056000000048,120.66107 30.111515000000054,120.66962000000001 30.102240000000052,120.67619000000002 30.097572000000071,120.68163000000004 30.093651000000079,120.67820000000006 30.10028600000004,120.6660700000001 30.101871000000074,120.65673000000004 30.106424000000061,120.64408000000003 30.104671000000053,120.63445000000002 30.10537000000005,120.62894000000006 30.110498000000064,120.61990000000003 30.118752000000086,120.61139000000003 30.119633000000078,120.6078 30.114971000000082,120.59692000000007 30.115442000000087,120.59285 30.118143000000089,120.59385000000009 30.126089000000036,120.60912000000008 30.135406000000046,120.61527000000001 30.140022000000044,120.61343000000011 30.144688000000087,120.60798 30.151794000000052,120.59104000000002 30.155190000000061,120.58678000000009 30.164848000000063,120.58261000000005 30.179474000000084,120.58165000000008 30.196274000000074,120.57399000000009 30.209854000000064,120.57325000000003 30.241470000000049,120.56608000000006 30.256176000000039,120.5588600000001 30.282707000000073,120.55737000000011 30.288076000000046,120.54543000000001 30.294214000000068,120.5385500000001 30.302366000000063,120.52088000000003 30.315506000000084,120.50473 30.319386000000065,120.49468000000002 30.318817000000081,120.47254000000009 30.316647000000046,120.46192000000008 30.315025000000048,120.45781 30.298365000000047,120.43662000000006 30.296747000000039,120.43203000000005 30.294109000000049,120.42550000000006 30.289557000000059,120.42207000000008 30.288895000000082,120.40714000000003 30.284590000000037,120.40010000000007 30.280008000000066,120.39907000000005 30.268702000000076,120.40203000000008 30.265791000000036,120.40103000000011 30.261065000000087,120.39447000000007 30.25586700000008,120.39247 30.245190000000036,120.39520000000005 30.237490000000037,120.39292 30.229828000000055,120.38752 30.222839000000079,120.37781000000007 30.221264000000076,120.36937 30.219549000000086,120.33569 30.225183000000072,120.31679000000008 30.230738000000088,120.30508000000009 30.244907000000069,120.28797000000009 30.257063000000073,120.28357000000005 30.27079000000009,120.26860000000011 30.274191000000087,120.26288 30.294649000000049,120.26291000000003 30.296505000000082,120.28482000000008 30.29587900000007,120.30430000000001 30.287146000000064,120.32053000000008 30.284977000000083,120.32796000000008 30.285069000000078,120.33878000000004 30.288317000000063,120.34701000000007 30.305536000000075,120.35863000000006 30.306137000000035,120.35905000000002 30.321098000000063,120.36527000000001 30.348162000000059,120.37192000000005 30.37619200000006,120.38532000000009 30.381350000000054,120.39069000000006 30.385229000000038,120.39845000000003 30.387619000000086,120.40836000000002 30.38862800000004,120.42956000000004 30.39080000000007,120.44019000000003 30.394344000000046,120.45829000000003 30.396633000000065,120.49396000000002 30.396063000000083,120.55727000000002 30.399017000000072,120.5879000000001 30.399391000000037,120.62378000000001 30.397400000000061,120.64830000000006 30.393131000000039,120.67110000000002 30.390322000000083,120.67828000000009 30.389515000000074,120.69175000000007 30.378052000000082,120.72115000000008 30.367832000000078,120.73566000000005 30.356907000000035,120.74075000000005 30.352196000000049,120.74934000000007 30.347143000000074,120.75237000000004 30.345989000000088,120.76029000000005 30.347931000000074,120.77068000000008 30.346809000000064,120.77619000000004 30.34043900000006,120.78378000000009 30.33164000000005,120.7860300000001 30.332212000000084,120.78989000000001 30.341702000000055,120.79776000000004 30.345367000000067,120.80432000000008 30.345877000000087,120.81252000000006 30.348116000000061,120.81641000000002 30.345999000000063,120.83297000000005 30.348867000000041,120.8366400000001 30.355310000000088,120.83868000000007 30.356470000000058,120.84496000000001 30.365082000000086,120.85571000000004 30.367502000000059,120.8615400000001 30.365068000000065,120.87088000000006 30.363781000000074,120.87326000000007 30.37280700000008,120.88403000000005 30.37400800000006,120.88742000000002 30.37415100000004,120.89175 30.370829000000072,120.90469000000007 30.376568000000077,120.91178000000002 30.382568000000049,120.91527000000008 30.385937000000069,120.91341 30.38708100000008,120.90669000000003 30.39111900000006,120.90195000000006 30.399307000000078,120.89874000000009 30.413996000000054,120.90770000000009 30.416042000000061,120.91039 30.417658000000074,120.91403000000003 30.417742000000089,120.92222000000004 30.413193000000035,120.93321000000003 30.41309700000005,120.93947000000003 30.415960000000041,120.94338000000005 30.42038000000008,120.94106000000011 30.424305000000061,120.94379000000004 30.423748000000046,120.95293000000004 30.424971000000085,120.95488 30.427464000000043,120.95565000000011 30.437521000000061,120.95320000000004 30.441135000000088,120.94894000000011 30.438919000000055,120.94360000000006 30.439413000000059,120.93855000000008 30.442171000000087,120.93571000000009 30.445738000000063,120.9345800000001 30.45487600000007,120.9376400000001 30.460941000000048,120.93681000000004 30.473782000000085,120.92982000000006 30.49559400000004,120.93677000000002 30.500135000000057,120.93999000000008 30.506439000000057,120.95096000000001 30.513285000000053,120.95375000000001 30.518297000000075,120.95361000000003 30.526690000000087,120.96438 30.533909000000051,120.97007000000008 30.544550000000072,120.98379 30.554010000000062,120.99290000000008 30.561970000000088,121.00439000000006 30.576553000000047,121.03268000000003 30.58881400000007,121.06211000000008 30.590170000000057,121.06866000000002 30.589617000000089,121.07709 30.591219000000081,121.08122000000003 30.590279000000066,121.0877200000001 30.586205000000064,121.09438 30.586744000000067,121.0997000000001 30.58895700000005,121.10481000000004 30.588188000000059,121.1134800000001 30.595217000000048,121.13028000000008 30.596388000000047,121.13512000000003 30.595663000000059,121.14114000000006 30.597477000000083,121.14504000000011 30.602512000000047,121.14346 30.608122000000037,121.14503000000002 30.637413000000038,121.16570000000002 30.645166000000074,121.1762500000001 30.673283000000083,121.22878000000003 30.68567500000006,121.24837000000002 30.695301000000086,121.2708100000001 30.697235000000035,121.27954 30.706696000000079,121.29932000000008 30.707859000000042,121.31601 30.711403000000075,121.32793000000004 30.711477000000059,121.34702000000004 30.717434000000083,121.36382000000003 30.721300000000042,121.36922000000004 30.735065000000077,121.38115000000005 30.740360000000067,121.38828000000001 30.758955000000071,121.39864 30.768820000000062,121.40685000000008 30.786001000000056,121.42564000000004 30.802223000000083,121.43981000000008 30.807543000000067,121.45662000000004 30.837875000000054,121.52943000000005 30.84555800000004,121.55284000000006 30.861313000000052,121.62170000000003 30.863771000000042,121.64474000000007 30.867916000000037,121.66686000000004 30.870790000000056,121.69984 30.868509000000074,121.71937000000003 30.872631000000069,121.74197000000004 30.872017000000085,121.75139000000001 30.866629000000046,121.76362000000006 30.865282000000036,121.77394000000004 30.86033400000008,121.78106000000002 30.858784000000071,121.79504000000009 30.856880000000046,121.80612000000008 30.858915000000081,121.80859000000009 30.86228200000005,121.80724000000009 30.863487000000077,121.80945000000008 30.861618000000078,121.81883000000005 30.859785000000045,121.8458700000001 30.860693000000083,121.85218000000009 30.866150000000061,121.86032 30.866886000000079,121.86494000000005 30.873396000000071,121.8726200000001 30.887352000000078,121.88343000000009 30.900574000000063,121.88962000000004 30.935408000000052,121.89983000000007 30.944157000000075,121.90056000000004 30.964664000000084,121.89801 30.975983000000042,121.89568000000008 30.989666000000057,121.89026000000001 31.047848000000045,121.86311 31.065519000000052,121.85635000000002 31.088972000000069,121.84277000000009 31.136929000000066,121.81499000000008 31.149458000000038,121.8046700000001 31.184900000000084,121.78602000000001 31.202288000000067,121.77267000000006 31.239071000000081,121.74943000000007 31.257101000000034,121.73512000000005 31.270603000000051,121.72771 31.284897000000058,121.71233000000007 31.292927000000077,121.70720000000006 31.305773000000045,121.69103000000007 31.316584000000034,121.68259 31.321293000000082,121.67664000000002 31.339853000000062,121.63535000000002 31.35334000000006,121.61797000000001 31.359911000000068,121.60210000000006 31.374212000000057,121.58546000000001 31.377249000000063,121.57947000000001 31.378500000000088,121.5688100000001 31.381590000000074,121.56013000000007 31.383392000000072,121.54244000000006 31.386660000000063,121.53523000000007 31.38410900000008,121.51596000000006 31.387491000000068,121.51362000000006 31.388233000000071,121.50756000000001 31.393579000000045,121.50065000000006 31.397873000000061,121.50513000000001 31.400593000000072,121.50471000000005 31.412321000000077,121.49116000000004 31.416948000000048,121.48908000000006 31.420361000000071,121.48504000000003 31.421274000000039,121.48093000000006 31.419989000000044,121.47166000000004 31.420849000000089,121.47021000000007 31.42590000000007,121.45673000000011 31.451674000000082,121.43888000000004 31.455303000000072,121.43436000000008 31.461655000000064,121.41797000000008 31.469177000000059,121.40575000000001 31.474380000000053,121.38349000000005 31.480534000000034,121.36613 31.484200000000044,121.35941000000003 31.49399800000009,121.34796000000006 31.498283000000072,121.32981000000007 31.507423000000074,121.32005000000004 31.515135000000043,121.30856000000006 31.513226000000088,121.29853000000003 31.514709000000039,121.2971 31.509726000000057,121.28409000000011 31.503447000000051,121.27348000000006 31.502708000000041,121.26787000000002 31.509686000000045,121.27435000000003 31.511036000000047,121.28072000000009 31.515310000000056,121.28665000000001 31.518696000000034,121.29574000000002 31.521151000000089,121.29847000000007 31.524902000000054,121.29856000000007 31.529142000000036,121.29453000000001 31.535851000000036,121.29249000000004 31.547749000000067,121.27987000000007 31.581371000000047,121.2648200000001 31.585611000000085,121.26078000000007 31.585966000000042,121.25227000000007 31.590523000000076,121.25407000000007 31.593044000000077,121.25291000000004 31.594917000000066,121.25320000000011 31.597668000000056,121.25083000000006 31.607700000000079,121.23717000000011 31.613358000000062,121.23560000000009 31.619709000000057,121.22990000000004 31.66811800000005,121.16569000000004 31.673485000000085,121.1563000000001 31.676575000000071,121.14589000000001 31.681906000000083,121.13869 31.691393000000062,121.11940000000004 31.714180000000056,121.08967000000007 31.720650000000035,121.0761500000001 31.722485000000063,121.06570000000011 31.72064000000006,121.05054000000007 31.725761000000034,121.04993000000002 31.734045000000037,121.03327000000002 31.754040000000089,121.00759000000005 31.757710000000088,120.99937 31.755379000000062,120.98835000000008 31.757235000000037,120.96229000000005 31.75610400000005,120.95446000000004 31.761873000000037,120.9450700000001 31.763412000000073,120.93973000000005 31.753468000000055,120.92172000000005 31.753265000000056,120.87879000000009 31.756680000000074,120.85910000000001 31.765625000000057,120.83122000000003 31.770304000000067,120.82472000000007 31.772017000000062,120.82159000000001 31.771143000000052,120.80962 31.776529000000039,120.81191000000001 31.780745000000081,120.80858 31.789524000000085,120.79191000000003 31.802685000000054,120.77483000000007 31.81680300000005,120.74849000000006 31.821894000000043,120.7419900000001 31.833143000000064,120.72707000000003 31.833635000000072,120.72146000000009 31.838978000000054,120.72717 31.850304000000051,120.72822000000008 31.839901000000054,120.73597000000007 31.836073000000056,120.74152000000004 31.832409000000041,120.75048000000004 31.825163000000089,120.76206000000002 31.822966000000065,120.77032000000008 31.823074000000076,120.77740000000006 31.824873000000082,120.78305 31.82815700000009,120.78653000000008 31.843086000000085,120.79218000000003 31.846949000000052,120.79909000000009 31.852335000000039,120.80138000000011 31.878456000000085,120.79650000000004 31.885191000000077,120.79174 31.901051000000052,120.77518000000009 31.934036000000049,120.75576000000001 31.945333000000062,120.75255000000004 31.962843000000078,120.75214000000005 31.973644000000036,120.7393800000001 31.979309000000057,120.73655000000008 31.984838000000082,120.72834 31.991745000000037,120.71062000000006 31.98992700000008,120.69054000000006 31.987358000000086,120.67999000000009 31.986864000000082,120.66995000000009 31.989594000000068,120.65240000000006 31.987087000000088,120.63671000000011 31.98805800000008,120.62598000000003 31.986568000000034,120.61201000000005 31.989744000000087,120.59154000000001 31.990040000000079,120.56783000000007 31.994799000000057,120.55373000000009 32.000000000000057,120.54304000000002 32.004177000000084,120.53146000000004 32.013634000000081,120.49387000000002 32.015640000000076,120.48225000000002 32.02062600000005,120.47052000000008 32.021877000000075,120.45624000000009 32.024357000000066,120.45454000000007 32.027962000000059,120.46140000000003 32.03067400000009,120.45996000000002 32.029972000000043,120.45004000000006 32.027256000000079,120.44208000000003 32.021851000000083,120.43636000000004 32.016533000000038,120.43439000000001 32.000000000000057,120.45197000000007 31.995399000000077,120.45082000000002 31.986013000000071,120.45165000000009 31.98082700000009,120.4496200000001 31.974428000000046,120.44439 31.964357000000064,120.43226000000004 31.962343000000089,120.40778 31.964474000000052,120.40366000000006 31.961254000000054,120.39336000000003 31.965096000000074,120.38535000000002 31.964321000000041,120.3799600000001 31.955462000000068,120.37079000000006 31.953775000000064,120.35365000000002 31.944412000000057,120.3134500000001 31.933189000000084,120.27078000000006 31.946810000000085,120.26339000000007 31.954552000000035,120.28060000000005 31.971376000000078,120.30552 31.985367000000053,120.32233000000008 31.992737000000091,120.3346600000001 31.998625000000061,120.34893 32.000000000000057,120.35101000000009 32.004177000000084,120.35156000000006 32.015961000000061,120.35526000000004 32.04950000000008,120.40610000000004 32.065128000000072,120.4359300000001 32.076817000000062,120.4737100000001 32.079006000000049,120.47901000000002 32.077869000000078,120.48873000000003 32.072418000000084,120.50021000000004 32.072281000000089,120.50397000000009 32.073730000000069,120.50715000000002 32.081688000000042,120.51414 32.084610000000055,120.51189000000011 32.089439000000084,120.50313000000006 32.091099000000042,120.50549000000001 32.088795000000061,120.51444000000004 32.092865000000074,120.52184 32.088905000000068,120.5286900000001 32.069187000000056,120.5471 32.06813800000009,120.5511600000001 32.068398000000059,120.55250000000001 32.073841000000073,120.55017000000009 32.074799000000041,120.55202000000008 32.069931000000054,120.55917000000011 32.069370000000049,120.56457 32.078281000000061,120.59304000000009 32.079681000000051,120.60402000000011 32.076466000000039,120.61353000000008 32.065666000000078,120.63190000000009 32.061203000000035,120.64709000000005 32.056324000000075,120.67440000000011 32.045071000000064,120.69331 32.03943600000008,120.70773000000008 32.039581000000055,120.71417000000008 32.043472000000065,120.72453000000007 32.036884000000043,120.72688000000005 32.036617000000035,120.73549000000003 32.028473000000076,120.74004000000002 32.029453000000046,120.75345000000004 32.021610000000067,120.77196000000004 32.019180000000063,120.78654000000006 32.014912000000038,120.7904400000001 32.013218000000052,120.79694000000006 31.99984900000004,120.80198000000007 32.000000000000057,120.81901000000005 31.995424000000071,120.82167000000004 31.98487300000005,120.83101000000011 31.985233000000051,120.83492000000001 31.972567000000083,120.84641000000011 31.96957000000009,120.85198000000003 31.962652000000048,120.85477000000003 31.947477000000049,120.86671000000001 31.945093000000043,120.87301000000002 31.941280000000063,120.87733000000003 31.928881000000047,120.88442000000009 31.919973000000084,120.8950000000001 31.907377000000054,120.90134 31.900642000000062,120.9058500000001 31.893101000000058,120.90839000000005 31.892868000000078,120.91010000000006 31.895533000000057,120.91308000000004 31.888643000000059,120.91392000000008 31.884935000000041,120.91091000000006 31.883932000000073,120.92237 31.872833000000071,120.93997000000002 31.867304000000047,120.96111000000008 31.864412000000073,120.95934 31.864069000000086,120.95445000000007 31.877474000000063,120.9222400000001 31.877327000000037,120.91809 31.874670000000037,120.91462000000001 31.871763000000044,120.91383000000008 31.843765000000076,120.9186400000001 31.831472000000076,120.91840000000002 31.831429000000071,120.92133000000001 31.835123000000067,120.92543 31.833364000000074,120.92657000000008 31.825802000000067,120.92121000000009 31.821232000000066,120.92014000000006 31.810072000000048,120.92773 31.804518000000087,120.93690000000004 31.800978000000043,120.95049000000006 31.801502000000085,120.95708000000002 31.803947000000051,120.96080000000006 31.811018000000047,120.9619100000001 31.830641000000071,120.95988 31.836754000000042,120.95536000000004 31.841330000000085,120.95594000000006 31.841297000000054,120.95814000000007 31.826374000000044,120.96638000000007 31.820934000000079,120.96774000000005 31.804890000000057,120.96741000000009 31.806288000000052,120.97134000000005 31.801285000000064,120.97148000000004 31.801605000000052,120.97783000000004 31.805265000000077,120.98376000000007 31.805983000000083,120.99134000000004 31.815960000000075,121.00668000000007 31.816460000000063,121.01475000000005 31.820951000000036,121.02070000000003 31.823334000000045,121.02831000000003 31.83052100000009,121.03529000000003 31.834742000000062,121.03197 31.839666000000079,121.06332000000009 31.843119000000058,121.06901000000005 31.84684800000008,121.0834900000001 31.852501000000075,121.09484000000009 31.852512000000047,121.10705000000007 31.84891900000008,121.12309000000005 31.835293000000036,121.14060000000006 31.833979000000056,121.14449000000002 31.834209000000044,121.15572000000009 31.837414000000081,121.16360000000009 31.85816600000004,121.19409000000007 31.860367000000053,121.19952 31.861719000000051,121.20589000000007 31.860933000000045,121.21540000000005 31.857405000000085,121.22679000000005 31.858793000000048,121.22990000000004 31.867098000000055,121.24509 31.873699000000045,121.26111000000003 31.880848000000071,121.26958000000002 31.884832000000074,121.28017 31.885956000000078,121.28753000000006 31.881804000000045,121.3103900000001 31.871281000000067,121.32796000000008 31.861462000000074,121.35264000000006 31.853413000000046,121.38297 31.850044000000082,121.40778 31.842842000000076,121.42543 31.841738000000078,121.44005000000004 31.83141500000005,121.45712000000003 31.824678000000063,121.47184000000004 31.80353000000008,121.49913000000004 31.79207800000006,121.50933000000009 31.789064000000053,121.51438000000007 31.783276000000058,121.53375000000005 31.785030000000063,121.55088 31.768387000000075,121.57069000000001 31.758656000000087,121.57800000000009 31.757660000000044,121.58627000000001 31.761955000000057,121.59053000000006 31.773928000000069,121.59646000000009 31.77281000000005,121.6003300000001 31.754637000000059,121.59156000000007 31.752327000000037,121.59248000000002 31.741554000000065,121.61024000000009 31.732353000000046,121.63268000000005 31.732416000000057,121.63999000000001 31.727453000000082,121.65888000000007 31.722904000000085,121.68803000000003 31.722513000000049,121.70728000000008 31.720104000000049,121.72306000000003 31.715225000000089,121.73732000000007 31.71052700000007,121.76279 31.700176000000056,121.7793200000001 31.701004000000069,121.78959000000009 31.696768000000077,121.80264 31.702097000000037,121.80693000000008 31.695942000000059,121.81212000000005 31.698141000000078,121.81657000000007 31.697428000000059,121.82069000000001 31.693377000000055,121.82497000000001 31.692007000000046,121.8402900000001 31.693644000000063,121.85155000000009 31.692257000000041,121.8578500000001 31.695324000000085,121.87037000000009 31.708364000000074,121.88441 31.717293000000041,121.88613000000009 31.75740600000006,121.88217000000009 31.772690000000068,121.87920000000008 31.780355000000043,121.88138000000004 31.790024000000074,121.87775000000011 31.84828200000004,121.84405000000004 31.852901000000088,121.83270000000005 31.857124000000056,121.83990000000006 31.859209000000078,121.83997000000011 31.863342000000046,121.83178000000009 31.869915000000049,121.8266000000001 31.879889000000048,121.82810000000006 31.911451000000056,121.82388000000003 31.923334000000068,121.81396000000007 31.929594000000066,121.81364000000008 31.933603000000062,121.81132000000002 31.936388000000079,121.80773000000011 31.937374000000034,121.80043 31.942455000000052,121.79666000000009 31.943651000000045,121.78937000000008 31.947701000000052,121.78508000000011 31.952496000000053,121.78497000000004 31.956348000000048,121.78019000000006 31.963898000000086,121.77796000000001 31.968796000000054,121.77296000000001 31.970793000000072,121.76715000000002 31.973347000000047,121.76453000000004 31.984283000000062,121.75971000000004 31.992828000000088,121.74968000000001 32.000000000000057,121.74652000000003 32.010815000000036,121.73935000000006 32.014069000000063,121.72609 32.018860000000075,121.72466000000009 32.026428000000067,121.72559000000001 32.041725000000042,121.70541000000003 32.045242000000087,121.69460000000004 32.046921000000054,121.68327000000011 32.049393000000066,121.68000000000006 32.053921000000059,121.6761600000001 32.079487000000086,121.62162000000001 32.081551000000047,121.60571000000004 32.085274000000084,121.59408000000008 32.098343000000057,121.56396000000007 32.100052000000062,121.55559000000005 32.106968000000052,121.54334000000006 32.108433000000048,121.53417000000002 32.113770000000045,121.52357000000006 32.117016000000035,121.51189000000011 32.11966300000006,121.47476000000006 32.11158000000006,121.47037 32.111034000000075,121.46473000000003 32.117844000000048,121.46108000000004 32.118000000000052,121.45624000000009 32.115829000000076,121.44930000000011 32.120216000000084,121.4371000000001 32.118042000000059,121.41563000000008 32.12766600000009,121.41621000000009 32.139538000000073,121.41379000000006 32.143272000000081,121.4182800000001 32.170010000000048,121.41471000000001 32.178772000000038,121.40401000000008 32.180569000000048,121.40182000000004 32.17639500000007,121.38469000000009 32.175934000000041,121.37044000000003 32.181789000000038,121.36437000000001 32.197338000000059,121.36294000000009 32.196751000000063,121.35514 32.202442000000076,121.3531200000001 32.20033600000005,121.32302000000004 32.200909000000081,121.31628 32.204700000000059,121.31026000000008 32.206062000000088,121.33662000000004 32.208229000000074,121.34303 32.210777000000064,121.34485000000006 32.240688000000034,121.33929 32.250999000000036,121.35332000000005 32.249729000000059,121.37356 32.251404000000036,121.37783000000002 32.258373000000063,121.38387 32.261333000000036,121.38271000000009 32.263634000000081,121.3834700000001 32.269985000000077,121.37955 32.274887000000035,121.37135 32.27905700000008,121.36021000000005 32.282459000000074,121.35824000000002 32.28642700000006,121.34872000000007 32.374916000000042,121.33961000000011 32.375999000000036,121.34956 32.37952800000005,121.35514 32.391022000000078,121.35757000000001 32.396736000000089,121.3569 32.399654000000055,121.35332000000005 32.407837000000086,121.33558000000005 32.421059000000071,121.31826000000001 32.423447000000067,121.31037000000003 32.436134000000038,121.2887300000001 32.442074000000048,121.27428000000009 32.44267700000006,121.26941000000011 32.440765000000056,121.26486 32.44180700000004,121.25890000000004 32.472935000000064,121.17979000000003 32.470535000000041,121.17364000000009 32.455223000000046,121.16323 32.455868000000066,121.16078000000005 32.459961000000078,121.15906000000007 32.474976000000083,121.16596000000004 32.479057000000068,121.16370000000006 32.479641000000072,121.15800000000002 32.482788000000085,121.1546800000001 32.490784000000076,121.15339000000006 32.503582000000051,121.1268500000001 32.511208000000067,121.10557000000006 32.522125000000074,121.07716000000005 32.524437000000034,121.06602000000009 32.533089000000075,121.03929000000005 32.532650000000046,121.01659000000006 32.543148000000087,120.98962000000006 32.543995000000052,120.98763000000008 32.542969000000085,120.98197000000005 32.540619000000049,120.97906 32.518089000000089,120.97636 32.520298000000082,120.97099000000003 32.527039000000059,120.97594000000004 32.532001000000037,120.97201000000007 32.542896000000042,120.96684000000005 32.546894000000066,120.96050000000002 32.549843000000067,120.95907 32.553532000000075,120.96004000000005 32.560596000000089,120.9582200000001 32.565079000000082,120.9532200000001 32.584381000000064,120.92184000000009 32.589706000000035,120.91330000000005 32.592434000000083,120.91213000000005 32.596664000000089,120.91743000000008 32.60031100000009,120.91650000000004 32.603069000000062,120.90560000000005 32.608631000000059,120.89759000000004 32.616360000000043,120.8832900000001 32.615589000000057,120.87926000000004 32.608589000000052,120.8732500000001 32.606903000000045,120.86923000000002 32.608097000000043,120.86054000000001 32.611382000000049,120.85313000000008 32.61269400000009,120.85012000000006 32.615818000000047,120.84624000000008 32.616009000000076,120.83351000000005 32.61756900000006,120.83130000000006 32.62675100000007,120.83211000000006 32.63064200000008,120.84282000000007 32.63870200000008,120.84474 32.640579000000059,120.84686000000011 32.642559000000062,120.87603000000001 32.650093000000084,120.89693 32.65545300000008,120.90137000000004 32.663727000000051,120.90248000000008 32.678535000000068,120.89826000000005 32.687424000000078,120.8847300000001 32.715073000000075,120.88094000000001 32.72834400000005,120.84694000000002 32.730770000000064,120.84226000000001 32.749973000000068,120.84006000000011 32.754749000000061,120.81660000000011 32.761848000000043,120.81639000000007 32.788036000000034,120.80855000000008 32.764953000000048,120.79017700000009 31.908425000000079,117.96368100000007 31.737113000000079,113.08137700000009 30.28100100000006,110.68304100000006 28.567937000000086,109.22691300000002