GDACS_DR_1012538_20
info-gdacs@gdacs.org
2019-02-16T14:47:00-00:00
Actual
Alert
Public
1012538
Geo
Drought
Past
Severe
Unknown
Global Disaster Alert and Coordination System

Drought is on going in China, India, Myanmar, Nepal
The Drought alert level is Orange.
http://www.gdacs.org/report.aspx?eventtype=DR&eventid=1012538
eventid
1012538
currentepisodeid
20
glide
version
0
fromdate
Wed, 20 Jun 2018 22:00:00 GMT
todate
Sat, 16 Feb 2019 14:47:00 GMT
eventtype
DR
alertlevel
Orange
alerttype
agricultural drought
link
http://www.gdacs.org/report.aspx?eventtype=DR&amp;eventid=1012538
country
China, India, Myanmar, Nepal
eventname
India-2018
severity
Medium impact for agricultural drought in 106336 km2
population
vulnerability
sourceid
GDO
iso3
CHN
hazardcomponents
datemodified
Thu, 28 Feb 2019 14:47:00 GMT
Polygon
27.000000000000025,85.000000000000043 27.000000000000025,86 27.916000000000004,86 27.999999999999986,86 27.999999999999986,85.971000000000018 27.999999999999986,85.000000000000043 27.000000000000025,85.000000000000043
Polygon
25.999999999999996,86 25.999999999999996,87.000000000000028 26.531000000000002,87.000000000000028 27.000000000000025,87.000000000000028 27.000000000000025,86 26.658000000000012,86 25.999999999999996,86
Polygon
24.999999999999968,95.000000000000014 24.999999999999968,95.999999999999972 25.999999999999996,95.999999999999972 25.999999999999996,95.136999999999958 25.999999999999996,95.000000000000014 25.721999999999973,95.000000000000014 24.999999999999968,95.000000000000014
Polygon
19.456999999999987,72.733000000000075 19.467000000000017,72.7360000000001 19.467999999999986,72.7310000000001 19.467999999999986,72.727000000000075 19.46599999999998,72.727000000000075 19.456999999999987,72.733000000000075
Polygon
19,72.811000000000064 19,72.861000000000075 19.002999999999975,72.862000000000052 19.008999999999993,72.885000000000133 19.002000000000006,72.886000000000109 19,72.886000000000109 19,72.919000000000125 19.028000000000016,72.955000000000084 19.039999999999985,72.96100000000007 19.057999999999971,72.963000000000051 19.06300000000002,72.9820000000001 19.059000000000008,72.9930000000001 19.048999999999978,72.9980000000001 19.043000000000028,73.000000000000071 20.000000000000028,73.000000000000071 20.000999999999998,72.722000000000065 19.987000000000023,72.722000000000065 19.979,72.719000000000108 19.972000000000012,72.716000000000079 19.970999999999975,72.7200000000001 19.968999999999969,72.725000000000108 19.961000000000013,72.733000000000075 19.943999999999996,72.738000000000085 19.943000000000026,72.750000000000057 19.94100000000002,72.74300000000008 19.943000000000026,72.734000000000052 19.948000000000008,72.7310000000001 19.95799999999997,72.7310000000001 19.968999999999969,72.7200000000001 19.968999999999969,72.71100000000007 19.965999999999994,72.705000000000069 19.95799999999997,72.69000000000004 19.945000000000032,72.683000000000064 19.943999999999996,72.683000000000064 19.932999999999996,72.6640000000001 19.930000000000021,72.6640000000001 19.930000000000021,72.665000000000092 19.928000000000015,72.671000000000078 19.919000000000022,72.677000000000078 19.900999999999968,72.6810000000001 19.88800000000003,72.683000000000064 19.869999999999976,72.6800000000001 19.864999999999995,72.678000000000054 19.860000000000014,72.676000000000087 19.853000000000026,72.67400000000012 19.85199999999999,72.6700000000001 19.85100000000002,72.66300000000011 19.85199999999999,72.662000000000049 19.858999999999977,72.655000000000072 19.858000000000008,72.652000000000115 19.853000000000026,72.651000000000039 19.840000000000021,72.651000000000039 19.829999999999991,72.6530000000001 19.820999999999998,72.660000000000082 19.820000000000029,72.66300000000011 19.818000000000023,72.671000000000078 19.818000000000023,72.67400000000012 19.818000000000023,72.6750000000001 19.812999999999974,72.6800000000001 19.794000000000018,72.6870000000001 19.78899999999997,72.688000000000073 19.770999999999983,72.688000000000073 19.759999999999984,72.685000000000116 19.748000000000015,72.6870000000001 19.735999999999979,72.693000000000083 19.733999999999973,72.698000000000093 19.731999999999967,72.70100000000005 19.731999999999967,72.70600000000006 19.731999999999967,72.707000000000036 19.748999999999985,72.7140000000001 19.733999999999973,72.712000000000046 19.726000000000017,72.709000000000088 19.726000000000017,72.707000000000036 19.726000000000017,72.699000000000083 19.726999999999986,72.6970000000001 19.722999999999974,72.699000000000083 19.706999999999994,72.710000000000079 19.693999999999988,72.710000000000079 19.68200000000002,72.70600000000006 19.67199999999999,72.707000000000036 19.671000000000021,72.708000000000112 19.667000000000009,72.71100000000007 19.64500000000001,72.713000000000036 19.638000000000023,72.716000000000079 19.63,72.7200000000001 19.625999999999987,72.723000000000056 19.625999999999987,72.726000000000084 19.62900000000003,72.726000000000084 19.625000000000018,72.728000000000065 19.599000000000007,72.7310000000001 19.594999999999995,72.728000000000065 19.597,72.723000000000056 19.597,72.721000000000089 19.597,72.7200000000001 19.596000000000032,72.713000000000036 19.572999999999997,72.716000000000079 19.544000000000011,72.723000000000056 19.53900000000003,72.725000000000108 19.526999999999994,72.732000000000085 19.524999999999988,72.733000000000075 19.515999999999995,72.7420000000001 19.509000000000007,72.7530000000001 19.507,72.756000000000057 19.504000000000026,72.765000000000086 19.504999999999995,72.772000000000077 19.504999999999995,72.773000000000053 19.515999999999995,72.783000000000072 19.522000000000013,72.784000000000049 19.524000000000019,72.784000000000049 19.526000000000025,72.784000000000049 19.528000000000031,72.780000000000115 19.526999999999994,72.7750000000001 19.529,72.783000000000072 19.526000000000025,72.786000000000115 19.513000000000019,72.784000000000049 19.509000000000007,72.779000000000053 19.489999999999984,72.7750000000001 19.484000000000034,72.767000000000053 19.478000000000016,72.7590000000001 19.474000000000004,72.755000000000081 19.463000000000005,72.745000000000061 19.456000000000017,72.745000000000061 19.454000000000011,72.746000000000038 19.432000000000013,72.756000000000057 19.416000000000032,72.760000000000076 19.395999999999972,72.762000000000057 19.388999999999985,72.761000000000067 19.37599999999998,72.758000000000109 19.362000000000005,72.772000000000077 19.344000000000019,72.787000000000091 19.331000000000014,72.799000000000078 19.313000000000027,72.794000000000068 19.309999999999985,72.793000000000092 19.307999999999979,72.787000000000091 19.302999999999997,72.784000000000049 19.28000000000003,72.784000000000049 19.278999999999993,72.778000000000063 19.27,72.7810000000001 19.250000000000007,72.783000000000072 19.230000000000015,72.780000000000115 19.204999999999973,72.779000000000053 19.193000000000005,72.782000000000082 19.193000000000005,72.790000000000049 19.193999999999974,72.791000000000111 19.19599999999998,72.794000000000068 19.204000000000004,72.7920000000001 19.215999999999973,72.801000000000045 19.221000000000021,72.805000000000078 19.228999999999978,72.811000000000064 19.241999999999983,72.822000000000074 19.245999999999995,72.82800000000006 19.230999999999984,72.822000000000074 19.217999999999979,72.8140000000001 19.215000000000003,72.812000000000054 19.208000000000016,72.804000000000087 19.204999999999973,72.801000000000045 19.199000000000023,72.797000000000111 19.177999999999994,72.797000000000111 19.171999999999976,72.795000000000059 19.16999999999997,72.790000000000049 19.16999999999997,72.788000000000082 19.168000000000031,72.782000000000082 19.166000000000025,72.780000000000115 19.158,72.7810000000001 19.149999999999977,72.789000000000073 19.129999999999985,72.786000000000115 19.129999999999985,72.793000000000092 19.133000000000028,72.797000000000111 19.136000000000003,72.7980000000001 19.144999999999996,72.803000000000111 19.171000000000006,72.819000000000116 19.175999999999988,72.822000000000074 19.182999999999975,72.82800000000006 19.182000000000006,72.830000000000112 19.173000000000012,72.830000000000112 19.166000000000025,72.830000000000112 19.166000000000025,72.8250000000001 19.166000000000025,72.824000000000041 19.153999999999989,72.811000000000064 19.149000000000008,72.806000000000054 19.142000000000021,72.803000000000111 19.122000000000028,72.822000000000074 19.118000000000016,72.8200000000001 19.094000000000012,72.827000000000083 19.078000000000031,72.826000000000093 19.079,72.8250000000001 19.079,72.824000000000041 19.078000000000031,72.821000000000083 19.057999999999971,72.821000000000083 19.041999999999991,72.816000000000074 19.041999999999991,72.822000000000074 19.041999999999991,72.824000000000041 19.045000000000034,72.830000000000112 19.048999999999978,72.8310000000001 19.050000000000015,72.835000000000036 19.039000000000016,72.838000000000079 19.028000000000016,72.836000000000112 19.017999999999986,72.827000000000083 19.017999999999986,72.8200000000001 19.017000000000017,72.8200000000001 19.013000000000005,72.816000000000074 19.002000000000006,72.811000000000064 19,72.811000000000064
Polygon
13.0000000000001,75.000000000000071 13.0000000000001,76.000000000000114 14.00000000000006,76.000000000000114 15.000000000000089,76.000000000000114 15.000000000000089,75.000000000000071 14.00000000000006,75.000000000000071 13.0000000000001,75.000000000000071
Polygon
12.000000000000071,78.0000000000001 12.000000000000071,79.000000000000057 13.0000000000001,79.000000000000057 14.00000000000006,79.000000000000057 14.00000000000006,78.0000000000001 14.00000000000006,77.000000000000057 13.0000000000001,77.000000000000057 13.0000000000001,78.0000000000001 12.000000000000071,78.0000000000001
Polygon
9.1830000000000958,78.9226666666672 9.1830000000000958,78.93900000000005 9.1850000000000342,78.942000000000093 9.1830000000000958,78.9226666666672
Polygon
9.18243298969076,78.917185567010236 9.1830000000000958,78.9226666666672 9.1830000000000958,78.9190000000001 9.18243298969076,78.917185567010236
Polygon
9.178000000000047,78.903000000000091 9.18243298969076,78.917185567010236 9.182000000000059,78.91300000000011 9.1830000000000958,78.905000000000058 9.1790000000000838,78.898000000000081 9.178000000000047,78.903000000000091
Polygon
9.1580000000000545,78.815000000000069 9.1580000000000545,78.8190000000001 9.1650000000000418,78.828000000000046 9.17100000000006,78.828000000000046 9.1660000000000785,78.825000000000088 9.1580000000000545,78.815000000000069
Polygon
9.10200000000009,78.572000000000045 9.1030000000000584,78.5800000000001 9.1090000000000764,78.586000000000084 9.1120000000000516,78.5800000000001 9.1100000000000456,78.577000000000055 9.10200000000009,78.572000000000045
Polygon
9.0860000000000412,78.493000000000052 9.09100000000009,78.495000000000118 9.09200000000006,78.494000000000042 9.0930000000000959,78.492000000000075 9.0900000000000531,78.488000000000056 9.0860000000000412,78.493000000000052
Polygon
9.0000000000000533,78.0000000000001 9.0000000000000533,78.2620000000001 9.003000000000096,78.26700000000011 9.0050000000000345,78.271000000000043 9.01700000000007,78.288000000000039 9.0580000000000922,78.346000000000089 9.0760000000000787,78.366000000000042 9.08100000000006,78.371000000000052 9.1120000000000516,78.411000000000115 9.1270000000000628,78.458000000000084 9.1270000000000628,78.4620000000001 9.1290000000000688,78.487000000000066 9.1350000000000868,78.510000000000048 9.1370000000000928,78.539000000000115 9.1370000000000928,78.5400000000001 9.1370000000000928,78.562000000000111 9.1310000000000748,78.578000000000117 9.14400000000008,78.5960000000001 9.1520000000000366,78.61400000000009 9.1560000000000485,78.648000000000067 9.1580000000000545,78.65700000000011 9.1590000000000913,78.658000000000087 9.1590000000000913,78.655000000000058 9.1590000000000913,78.65100000000011 9.1690000000000538,78.643000000000058 9.174000000000035,78.642000000000081 9.1750000000000718,78.643000000000058 9.18100000000009,78.645000000000124 9.182000000000059,78.645000000000124 9.192000000000089,78.658000000000087 9.19800000000004,78.671000000000063 9.1950000000000642,78.692000000000078 9.194000000000095,78.696000000000112 9.1910000000000522,78.704000000000065 9.190000000000083,78.7180000000001 9.19700000000007,78.720000000000084 9.19800000000004,78.717000000000041 9.2000000000000455,78.7180000000001 9.2030000000000882,78.72100000000006 9.2090000000000387,78.728000000000037 9.2150000000000567,78.755000000000052 9.2250000000000867,78.778000000000134 9.2290000000000987,78.794000000000054 9.2310000000000372,78.798000000000073 9.2360000000000859,78.805000000000064 9.2370000000000552,78.816000000000059 9.2430000000000732,78.832000000000065 9.2480000000000544,78.8530000000001 9.2530000000000356,78.86000000000007 9.2570000000000476,78.873000000000118 9.2550000000000416,78.882000000000076 9.2540000000000724,78.8850000000001 9.2530000000000356,78.890000000000114 9.25000000000006,78.90700000000011 9.2530000000000356,78.9140000000001 9.2570000000000476,78.915000000000077 9.2620000000000964,78.922000000000054 9.2640000000000349,78.9240000000001 9.26600000000004,78.926000000000087 9.2720000000000589,78.955000000000069 9.2750000000000341,78.985000000000113 9.2740000000000649,78.991000000000113 9.2720000000000589,79.000000000000057 9.3450000000000415,79.000000000000057 9.3540000000000347,78.989000000000061 9.4060000000000556,78.93900000000005 9.4320000000000661,78.921000000000078 9.4660000000000331,78.9020000000001 9.478000000000069,78.898000000000081 9.4890000000000683,78.898000000000081 9.49300000000008,78.903000000000091 9.4920000000000435,78.9080000000001 9.4910000000000743,78.911000000000058 9.49400000000005,78.915000000000077 9.50900000000006,78.915000000000077 9.518000000000054,78.91800000000012 9.53000000000009,78.92300000000013 9.5330000000000652,78.921000000000078 9.5370000000000772,78.91800000000012 9.5380000000000464,78.9190000000001 9.5430000000000952,78.9190000000001 9.57200000000008,78.9240000000001 9.59400000000008,78.929000000000116 9.6080000000000538,78.935000000000116 9.6120000000000658,78.93900000000005 9.62600000000004,78.955000000000069 9.6300000000000523,78.960000000000065 9.65200000000005,78.970000000000084 9.6660000000000927,78.971000000000075 9.6680000000000987,78.972000000000065 9.6900000000000972,78.98200000000007 9.7080000000000837,78.994000000000057 9.7120000000000957,78.99800000000009 9.7130000000000649,79.000000000000057 10.000000000000082,79.000000000000057 10.000000000000082,78.0000000000001 9.0000000000000533,78.0000000000001