GDACS_DR_1012247_20
info-gdacs@gdacs.org
2018-11-24T15:27:00-00:00
Actual
Alert
Public
1012247
Geo
Drought
Past
Moderate
Unknown
Global Disaster Alert and Coordination System

Drought is on going in Albania, Austria, Bosnia & Herzegovina, Bulgaria, Belarus, Greece, Croatia, Hungary, Kazakhstan, Moldova, Montenegro, Macedonia, Romania, Serbia, Russia, Slovenia, Slovakia, Turkey, Ukraine
The Drought alert level is Green.
http://www.gdacs.org/report.aspx?eventtype=DR&eventid=1012247
eventid
1012247
currentepisodeid
20
glide
version
0
fromdate
Fri, 20 Apr 2018 22:00:00 GMT
todate
Sat, 24 Nov 2018 15:27:00 GMT
eventtype
DR
alertlevel
Green
alerttype
agricultural drought
link
http://www.gdacs.org/report.aspx?eventtype=DR&amp;eventid=1012247
country
Albania, Austria, Bosnia & Herzegovina, Bulgaria, Belarus, Greece, Croatia, Hungary, Kazakhstan, Moldova, Montenegro, Macedonia, Romania, Serbia, Russia, Slovenia, Slovakia, Turkey, Ukraine
eventname
Eastern Europe, Don, Volga-2018
severity
Minor impact for agricultural drought in 1677855 km2
population
vulnerability
sourceid
GDO
iso3
ALB
hazardcomponents
datemodified
Tue, 26 Feb 2019 08:21:32 GMT
Polygon
51.999999999999972,52.999999999999972 51.999999999999972,54.000000000000057 51.999999999999972,55 53.000000000000021,55 53.000000000000021,54.000000000000057 53.000000000000021,52.999999999999972 51.999999999999972,52.999999999999972
Polygon
48.000000000000036,47.999999999999972 48.000000000000036,49.000000000000057 49.000000000000021,49.000000000000057 49.000000000000021,50 50.000000000000007,50 50.000000000000007,50.999999999999943 50.999999999999986,50.999999999999943 51.67900000000003,50.999999999999943 51.999999999999972,50.999999999999943 51.999999999999972,52.000000000000028 53.000000000000021,52.000000000000028 53.000000000000021,52.999999999999972 54.000000000000007,52.999999999999972 54.000000000000007,52.000000000000028 54.999999999999993,52.000000000000028 54.999999999999993,50.999999999999943 54.999999999999993,50 54.000000000000007,50 53.000000000000021,50 53.000000000000021,49.000000000000057 53.000000000000021,47.999999999999972 51.999999999999972,47.999999999999972 51.999999999999972,47.000000000000028 50.999999999999986,47.000000000000028 50.999999999999986,45.999999999999943 50.000000000000007,45.999999999999943 50.000000000000007,47.000000000000028 49.877999999999986,47.000000000000028 49.222000000000023,47.000000000000028 49.056999999999988,47.000000000000028 49.000000000000021,47.000000000000028 49.000000000000021,47.999999999999972 48.000000000000036,47.999999999999972
Polygon
46.44000000000009,31.961000000000155 46.44000000000009,31.973000000000127 46.44300000000009,31.979000000000184 46.441000000000066,31.971000000000203 46.445000000000043,31.954000000000207 46.442181818181886,31.954000000000207 46.441800000000029,31.95470000000029 46.44000000000009,31.961000000000155
Polygon
46.43600000000005,31.709000000000174 46.438000000000073,31.712000000000131 46.43900000000005,31.709000000000174 46.44200000000005,31.702000000000083 46.44600000000009,31.698000000000093 46.449000000000083,31.6970000000002 46.466000000000037,31.700000000000159 46.47300000000007,31.705000000000183 46.480000000000047,31.716000000000122 46.488000000000063,31.742000000000132 46.487000000000087,31.768000000000143 46.47900000000007,31.808000000000192 46.461000000000077,31.889000000000181 46.447000000000067,31.928000000000196 46.445000000000043,31.934000000000111 46.43900000000005,31.955000000000098 46.44000000000009,31.958000000000197 46.441800000000029,31.95470000000029 46.44200000000005,31.954000000000207 46.442181818181886,31.954000000000207 46.44600000000009,31.947000000000116 46.44600000000009,31.9410000000002 46.448000000000043,31.937000000000211 46.450000000000067,31.931000000000154 46.454000000000043,31.921000000000106 46.45600000000006,31.919000000000182 46.45600000000006,31.927000000000163 46.449000000000083,31.962000000000188 46.447000000000067,31.970000000000169 46.445000000000043,31.970000000000169 46.445000000000043,31.963000000000079 46.44300000000009,31.971000000000203 46.44300000000009,31.979000000000184 46.44300000000009,31.983000000000175 46.44600000000009,31.990000000000123 46.451000000000043,31.994000000000113 46.45300000000006,31.992000000000189 46.454000000000043,31.9880000000002 46.452000000000083,31.986000000000132 46.450000000000067,31.987000000000165 46.449000000000083,31.987000000000165 46.447000000000067,31.981000000000108 46.44600000000009,31.978000000000151 46.447000000000067,31.973000000000127 46.449000000000083,31.972000000000094 46.450000000000067,31.971000000000203 46.45600000000006,31.990000000000123 46.455000000000084,32.000000000000171 46.48900000000004,32.000000000000171 46.48900000000004,31.999000000000137 46.49200000000004,31.979000000000184 46.49600000000008,31.960000000000122 46.508000000000074,31.92600000000013 46.51800000000005,31.90400000000011 46.517000000000067,31.886000000000081 46.516000000000091,31.884000000000157 46.514000000000074,31.877000000000209 46.517000000000067,31.859000000000179 46.519000000000091,31.850000000000165 46.520000000000067,31.829000000000178 46.526000000000067,31.805000000000092 46.537000000000077,31.778000000000191 46.539000000000037,31.776000000000124 46.54200000000003,31.773000000000167 46.547000000000054,31.755000000000138 46.545000000000094,31.711000000000098 46.545000000000094,31.708000000000141 46.541000000000054,31.684000000000196 46.538000000000061,31.675000000000182 46.537000000000077,31.674000000000149 46.536000000000037,31.661000000000143 46.539000000000037,31.632000000000176 46.540000000000077,31.611000000000189 46.537000000000077,31.590000000000202 46.538000000000061,31.575000000000131 46.547000000000054,31.550000000000153 46.556000000000047,31.533000000000158 46.559000000000047,31.529000000000167 46.563000000000088,31.526000000000209 46.571000000000041,31.519000000000119 46.560000000000088,31.526000000000209 46.538000000000061,31.551000000000187 46.517000000000067,31.590000000000202 46.501000000000033,31.617000000000104 46.471000000000053,31.659000000000077 46.464000000000077,31.668000000000092 46.447000000000067,31.688000000000187 46.43600000000005,31.709000000000174
Polygon
46.252000000000052,31.998000000000104 46.252000000000052,32.000000000000171 46.357000000000056,32.000000000000171 46.351000000000056,31.9880000000002 46.343000000000039,31.962000000000188 46.339000000000063,31.942000000000093 46.336000000000062,31.923000000000172 46.333000000000069,31.879000000000133 46.332000000000086,31.861000000000104 46.334000000000046,31.8480000000001 46.334000000000046,31.836000000000126 46.328000000000046,31.807000000000158 46.322000000000052,31.785000000000139 46.308000000000042,31.764000000000152 46.30000000000009,31.763000000000119 46.282000000000032,31.777000000000157 46.275000000000055,31.784000000000106 46.273000000000039,31.791000000000196 46.272000000000062,31.812000000000182 46.274000000000079,31.830000000000069 46.272000000000062,31.861000000000104 46.265000000000086,31.876000000000175 46.278000000000056,31.892000000000138 46.282000000000032,31.894000000000204 46.285000000000032,31.897000000000162 46.299000000000042,31.894000000000204 46.299000000000042,31.886000000000081 46.306000000000083,31.879000000000133 46.309000000000083,31.8810000000002 46.311000000000035,31.88500000000019 46.315000000000076,31.894000000000204 46.315000000000076,31.897000000000162 46.309000000000083,31.899000000000086 46.308000000000042,31.896000000000129 46.301000000000066,31.895000000000095 46.298000000000066,31.899000000000086 46.296000000000049,31.914000000000158 46.294000000000089,31.933000000000078 46.291000000000089,31.943000000000126 46.286000000000072,31.94800000000015 46.274000000000079,31.95200000000014 46.273000000000039,31.95200000000014 46.265000000000086,31.959000000000088 46.256000000000093,31.975000000000193 46.252000000000052,31.998000000000104
Polygon
44.777000000000037,29.507000000000119 44.777000000000037,29.516000000000133 44.77900000000006,29.526000000000181 44.79000000000007,29.554000000000116 44.805000000000064,29.576000000000136 44.820000000000057,29.594000000000165 44.841000000000044,29.612000000000194 44.850000000000037,29.617000000000075 44.867000000000047,29.621000000000208 44.878000000000064,29.618000000000109 44.84300000000006,29.611000000000161 44.82300000000005,29.595000000000198 44.816000000000081,29.586000000000183 44.816000000000081,29.578000000000202 44.814000000000057,29.574000000000211 44.80600000000004,29.561000000000206 44.801000000000087,29.558000000000106 44.794000000000047,29.547000000000168 44.792000000000094,29.538000000000153 44.788000000000054,29.512000000000143 44.79000000000007,29.499000000000137 44.798000000000087,29.498000000000104 44.79600000000007,29.49600000000018 44.79000000000007,29.498000000000104 44.778000000000077,29.503000000000128 44.777000000000037,29.507000000000119
Polygon
40.481000000000051,19.30000000000021 40.488000000000092,19.3010000000001 40.496000000000045,19.306000000000125 40.500000000000085,19.306000000000125 40.516000000000055,19.287000000000205 40.518000000000072,19.282000000000181 40.515000000000079,19.277000000000157 40.510000000000062,19.276000000000124 40.499000000000045,19.282000000000181 40.483000000000075,19.29300000000012 40.481000000000051,19.30000000000021
Polygon
40.414000000000051,24.0000000000002 40.448000000000071,24.0000000000002 40.447000000000095,23.999000000000166 40.444000000000095,23.995000000000175 40.440000000000055,23.992000000000075 40.420000000000044,23.9970000000001 40.414000000000051,24.0000000000002
Polygon
40.308000000000064,23.946000000000112 40.310000000000088,23.949000000000211 40.316000000000081,23.940000000000197 40.31800000000004,23.937000000000097 40.31800000000004,23.925000000000125 40.321000000000041,23.922000000000168 40.324000000000034,23.922000000000168 40.329000000000057,23.924000000000092 40.339000000000091,23.918000000000177 40.340000000000067,23.91900000000021 40.342000000000091,23.915000000000077 40.335000000000051,23.891000000000133 40.330000000000034,23.883000000000152 40.327000000000034,23.885000000000076 40.325000000000081,23.891000000000133 40.326000000000057,23.895000000000124 40.322000000000081,23.911000000000087 40.319000000000081,23.917000000000144 40.317000000000064,23.918000000000177 40.316000000000081,23.918000000000177 40.31500000000004,23.916000000000111 40.31200000000004,23.921000000000134 40.310000000000088,23.931000000000182 40.309000000000047,23.935000000000173 40.308000000000064,23.946000000000112
Polygon
40.201000000000043,23.787000000000091 40.201000000000043,23.795000000000073 40.217000000000077,23.789000000000158 40.219000000000094,23.785000000000167 40.22300000000007,23.787000000000091 40.230000000000047,23.780000000000143 40.22900000000007,23.778000000000077 40.224000000000053,23.769000000000204 40.20600000000006,23.771000000000129 40.204000000000043,23.774000000000086 40.201000000000043,23.787000000000091
Polygon
40.058000000000035,23.720000000000141 40.058000000000035,23.727000000000089 40.059000000000083,23.733000000000146 40.062000000000083,23.734000000000179 40.064000000000036,23.733000000000146 40.065000000000076,23.727000000000089 40.065000000000076,23.722000000000207 40.060000000000059,23.717000000000183 40.058000000000035,23.720000000000141
Polygon
40.001000000000069,23.381000000000114 40.001000000000069,23.581000000000074 40.015000000000086,23.5420000000002 40.018000000000086,23.530000000000086 40.031000000000056,23.499000000000194 40.051000000000066,23.469000000000193 40.069000000000052,23.457000000000079 40.070000000000093,23.453000000000088 40.075000000000053,23.450000000000131 40.089000000000063,23.443000000000183 40.102000000000032,23.439000000000192 40.10300000000008,23.4350000000002 40.127000000000066,23.417000000000172 40.134000000000036,23.4020000000001 40.139000000000053,23.397000000000077 40.139000000000053,23.38300000000018 40.141000000000076,23.373000000000133 40.147000000000077,23.363000000000085 40.157000000000046,23.355000000000103 40.166000000000039,23.351000000000113 40.18300000000005,23.348000000000155 40.197000000000067,23.334000000000117 40.19600000000009,23.322000000000145 40.194000000000067,23.325000000000102 40.18300000000005,23.326000000000136 40.17500000000004,23.325000000000102 40.154000000000046,23.320000000000078 40.148000000000053,23.317000000000121 40.141000000000076,23.317000000000121 40.132000000000083,23.322000000000145 40.12300000000009,23.319000000000187 40.10000000000008,23.304000000000116 40.085000000000086,23.30900000000014 40.079000000000093,23.31300000000013 40.074000000000069,23.323000000000178 40.073000000000093,23.331000000000159 40.069000000000052,23.338000000000108 40.066000000000059,23.340000000000174 40.062000000000083,23.341000000000207 40.042000000000073,23.352000000000146 40.024000000000079,23.362000000000194 40.020000000000039,23.370000000000175 40.008000000000045,23.380000000000081 40.001000000000069,23.381000000000114
Polygon
39.876000000000055,19.591000000000207 39.885000000000048,19.596000000000089 39.892000000000088,19.595000000000198 39.898000000000089,19.58500000000015 39.897000000000048,19.582000000000193 39.899000000000065,19.578000000000202 39.899000000000065,19.574000000000211 39.895000000000088,19.571000000000112 39.890000000000072,19.571000000000112 39.881000000000071,19.576000000000136 39.876000000000055,19.591000000000207
Polygon
39.836000000000041,19.392000000000138 39.837000000000081,19.400000000000119 39.839000000000034,19.410000000000167 39.856000000000051,19.420000000000073 39.861000000000068,19.427000000000163 39.863000000000085,19.433000000000078 39.867000000000061,19.429000000000087 39.867000000000061,19.422000000000139 39.860000000000085,19.401000000000153 39.861000000000068,19.396000000000129 39.866000000000085,19.388000000000147 39.867000000000061,19.387000000000114 39.868000000000038,19.380000000000166 39.861000000000068,19.375000000000142 39.852000000000075,19.374000000000109 39.842000000000034,19.375000000000142 39.841000000000058,19.377000000000209 39.837000000000081,19.386000000000081 39.836000000000041,19.392000000000138
Polygon
39.764000000000081,19.592000000000098 39.767000000000074,19.596000000000089 39.772000000000034,19.594000000000165 39.769000000000034,19.589000000000141 39.764000000000081,19.592000000000098
Polygon
39.757000000000041,19.525000000000148 39.759000000000057,19.535000000000196 39.760000000000034,19.536000000000087 39.764000000000081,19.534000000000162 39.780000000000044,19.520000000000124 39.786000000000044,19.510000000000076 39.784000000000091,19.508000000000152 39.780000000000044,19.507000000000119 39.764000000000081,19.5180000000002 39.759000000000057,19.52200000000019 39.757000000000041,19.525000000000148
Polygon
39.637000000000043,19.927000000000135 39.64200000000006,19.930000000000092 39.64500000000006,19.927000000000135 39.644000000000084,19.920000000000186 39.640000000000043,19.916000000000196 39.637000000000043,19.927000000000135
Polygon
39.399000000000072,20.218000000000131 39.399000000000072,20.22500000000008 39.405000000000072,20.221000000000089 39.407000000000089,20.214000000000141 39.407000000000089,20.208000000000084 39.404000000000096,20.209000000000117 39.399000000000072,20.218000000000131
Polygon
39.361000000000075,20.1100000000001 39.364000000000075,20.115000000000123 39.380000000000038,20.122000000000071 39.393000000000079,20.107000000000141 39.405000000000072,20.09900000000016 39.409000000000049,20.096000000000203 39.422000000000082,20.096000000000203 39.435000000000052,20.087000000000188 39.444000000000045,20.078000000000173 39.452000000000062,20.067000000000093 39.443000000000069,20.056000000000154 39.434000000000076,20.026000000000153 39.433000000000035,20.018000000000171 39.437000000000069,20.01000000000019 39.451000000000086,20.002000000000209 39.455000000000062,20.0030000000001 39.457000000000079,20.002000000000209 39.457000000000079,20.000000000000142 39.460000000000079,19.991000000000128 39.460000000000079,19.970000000000141 39.466000000000079,19.959000000000202 39.470000000000056,19.943000000000097 39.471000000000032,19.938000000000073 39.473000000000056,19.937000000000182 39.485000000000042,19.9290000000002 39.505000000000052,19.924000000000177 39.528000000000063,19.923000000000144 39.548000000000073,19.912000000000205 39.567000000000043,19.909000000000106 39.579000000000036,19.915000000000163 39.587000000000053,19.915000000000163 39.593000000000046,19.910000000000139 39.599000000000046,19.901000000000124 39.60600000000008,19.902000000000157 39.607000000000063,19.907000000000181 39.60500000000004,19.910000000000139 39.59200000000007,19.914000000000129 39.591000000000093,19.91800000000012 39.594000000000094,19.92500000000021 39.596000000000046,19.927000000000135 39.62500000000005,19.932000000000158 39.627000000000073,19.92500000000021 39.62800000000005,19.922000000000111 39.63200000000009,19.897000000000133 39.639000000000067,19.867000000000132 39.646000000000036,19.850000000000136 39.650000000000077,19.847000000000179 39.654000000000053,19.843000000000188 39.660000000000053,19.842000000000155 39.660000000000053,19.850000000000136 39.664000000000094,19.862000000000108 39.667000000000087,19.862000000000108 39.669000000000047,19.858000000000118 39.669000000000047,19.856000000000193 39.667000000000087,19.854000000000127 39.66800000000007,19.85100000000017 39.676000000000087,19.841000000000122 39.693000000000033,19.839000000000198 39.6990000000001,19.839000000000198 39.70700000000005,19.846000000000146 39.709000000000067,19.859000000000151 39.711000000000084,19.865000000000208 39.719000000000037,19.872000000000156 39.722000000000037,19.880000000000138 39.723000000000084,19.887000000000086 39.723000000000084,19.903000000000191 39.734000000000094,19.930000000000092 39.742000000000047,19.941000000000173 39.747000000000071,19.942000000000206 39.75400000000004,19.94000000000014 39.760000000000034,19.945000000000164 39.765000000000057,19.951000000000079 39.766000000000034,19.954000000000178 39.770000000000074,19.956000000000103 39.776000000000067,19.956000000000103 39.779000000000067,19.954000000000178 39.786000000000044,19.948000000000121 39.788000000000068,19.945000000000164 39.788000000000068,19.941000000000173 39.785000000000068,19.94000000000014 39.783000000000044,19.943000000000097 39.779000000000067,19.939000000000107 39.789000000000044,19.928000000000168 39.794000000000061,19.923000000000144 39.795000000000037,19.920000000000186 39.792000000000044,19.904000000000082 39.794000000000061,19.8960000000001 39.800000000000054,19.882000000000204 39.816000000000088,19.87400000000008 39.822000000000088,19.84800000000007 39.801000000000037,19.8220000000002 39.792000000000044,19.805000000000206 39.790000000000084,19.794000000000125 39.791000000000061,19.7890000000001 39.797000000000061,19.782000000000153 39.798000000000037,19.776000000000096 39.794000000000061,19.761000000000166 39.795000000000037,19.738000000000113 39.793000000000085,19.726000000000141 39.790000000000084,19.715000000000202 39.791000000000061,19.710000000000178 39.794000000000061,19.704000000000121 39.797000000000061,19.704000000000121 39.798000000000037,19.698000000000206 39.796000000000078,19.67400000000012 39.776000000000067,19.653000000000134 39.756000000000057,19.643000000000086 39.751000000000047,19.641000000000162 39.745000000000047,19.647000000000077 39.734000000000094,19.6550000000002 39.726000000000077,19.658000000000158 39.722000000000037,19.665000000000106 39.720000000000084,19.673000000000087 39.720000000000084,19.67400000000012 39.714000000000084,19.6820000000001 39.709000000000067,19.684000000000168 39.70100000000005,19.677000000000078 39.680000000000064,19.673000000000087 39.670000000000087,19.699000000000098 39.669000000000047,19.701000000000164 39.669000000000047,19.706000000000188 39.670000000000087,19.708000000000112 39.672000000000047,19.709000000000145 39.676000000000087,19.709000000000145 39.674000000000063,19.7290000000001 39.667000000000087,19.725000000000108 39.664000000000094,19.725000000000108 39.658000000000094,19.726000000000141 39.652000000000037,19.730000000000132 39.637000000000043,19.74000000000018 39.624000000000073,19.742000000000104 39.620000000000033,19.752000000000152 39.619000000000057,19.757000000000176 39.616000000000057,19.76600000000019 39.61200000000008,19.778000000000162 39.60600000000008,19.773000000000138 39.601000000000063,19.776000000000096 39.59800000000007,19.783000000000186 39.597000000000087,19.790000000000134 39.596000000000046,19.800000000000182 39.585000000000093,19.820000000000135 39.573000000000036,19.831000000000074 39.55800000000005,19.842000000000155 39.550000000000026,19.84800000000007 39.541000000000032,19.849000000000103 39.537000000000056,19.844000000000079 39.53600000000008,19.843000000000188 39.530000000000086,19.842000000000155 39.520000000000046,19.850000000000136 39.505000000000052,19.853000000000094 39.492000000000083,19.852000000000203 39.472000000000072,19.8660000000001 39.465000000000032,19.8660000000001 39.456000000000039,19.87000000000009 39.450000000000045,19.879000000000104 39.442000000000093,19.8990000000002 39.430000000000035,19.912000000000205 39.432000000000052,19.931000000000125 39.427000000000035,19.943000000000097 39.425000000000082,19.946000000000197 39.424000000000035,19.959000000000202 39.417000000000058,19.978000000000122 39.406000000000049,19.994000000000085 39.399000000000072,19.999000000000109 39.399000000000072,20.000000000000142 39.395000000000095,20.01000000000019 39.394000000000055,20.022000000000162 39.393000000000079,20.026000000000153 39.391000000000055,20.0330000000001 39.380000000000038,20.058000000000078 39.365000000000052,20.086000000000155 39.367000000000068,20.087000000000188 39.368000000000052,20.091000000000179 39.367000000000068,20.09900000000016 39.361000000000075,20.1100000000001
Polygon
39.178000000000047,20.198000000000178 39.178000000000047,20.206000000000159 39.19000000000004,20.203000000000202 39.205000000000034,20.191000000000088 39.210000000000051,20.178000000000083 39.216000000000051,20.1700000000001 39.221000000000068,20.171000000000134 39.229000000000084,20.163000000000153 39.236000000000061,20.14700000000019 39.240000000000038,20.137000000000143 39.237000000000037,20.134000000000185 39.235000000000085,20.133000000000152 39.241000000000078,20.133000000000152 39.241000000000078,20.130000000000194 39.238000000000078,20.126000000000204 39.235000000000085,20.125000000000171 39.222000000000044,20.126000000000204 39.215000000000074,20.134000000000185 39.202000000000034,20.150000000000148 39.195000000000064,20.161000000000087 39.192000000000064,20.164000000000186 39.188000000000088,20.165000000000077 39.181000000000047,20.177000000000191 39.178000000000047,20.198000000000178
Polygon
39.13700000000005,20.241000000000184 39.139000000000074,20.2500000000002 39.141000000000091,20.252000000000123 39.158000000000044,20.231000000000137 39.162000000000077,20.226000000000113 39.162000000000077,20.223000000000155 39.163000000000061,20.221000000000089 39.15700000000006,20.217000000000098 39.154000000000067,20.216000000000207 39.147000000000091,20.217000000000098 39.13800000000009,20.235000000000127 39.13700000000005,20.241000000000184
Polygon
39.034000000000106,20.83900000000007 39.037000000000063,20.833000000000084 39.04400000000004,20.831000000000159 39.046000000000063,20.829000000000093 39.04800000000008,20.827000000000169 39.04800000000008,20.825000000000102 39.046000000000063,20.826000000000136 39.036000000000087,20.829000000000093 39.034000000000106,20.83900000000007
Polygon
39.034000000000049,20.839000000000354 39.034000000000106,20.83900000000007 39.03400000000007,20.839000000000141 39.034000000000049,20.839000000000354
Polygon
39.033000000000087,20.844000000000165 39.033000000000087,20.849000000000188 39.034000000000049,20.839000000000354 39.033000000000087,20.844000000000165
Polygon
39.010000000000083,20.921000000000163 39.01400000000006,20.923000000000087 39.024000000000093,20.910000000000082 39.015000000000036,20.915000000000106 39.010000000000083,20.921000000000163
Polygon
39.00100000000009,20.709000000000088 39.00100000000009,20.756000000000085 39.00800000000006,20.74300000000008 39.019000000000077,20.73900000000009 39.020000000000053,20.755000000000194 39.025000000000077,20.757000000000119 39.035000000000046,20.762000000000143 39.040000000000063,20.767000000000166 39.042000000000087,20.776000000000181 39.046000000000063,20.779000000000138 39.055000000000057,20.786000000000087 39.06800000000009,20.788000000000153 39.075000000000067,20.788000000000153 39.077000000000083,20.796000000000134 39.077000000000083,20.810000000000173 39.076000000000043,20.832000000000193 39.07100000000009,20.845000000000198 39.063000000000073,20.863000000000085 39.056000000000033,20.862000000000194 39.052000000000056,20.85700000000017 39.046000000000063,20.855000000000103 39.03400000000007,20.859000000000094 39.03100000000007,20.866000000000184 39.032000000000046,20.8720000000001 39.036000000000087,20.8750000000002 39.045000000000087,20.866000000000184 39.046000000000063,20.866000000000184 39.055000000000057,20.866000000000184 39.060000000000073,20.881000000000114 39.060000000000073,20.885000000000105 39.066000000000074,20.886000000000138 39.06800000000009,20.887000000000171 39.07100000000009,20.892000000000195 39.07100000000009,20.9020000000001 39.066000000000074,20.917000000000172 39.059000000000033,20.930000000000177 39.05300000000004,20.9320000000001 39.049000000000063,20.933000000000135 39.046000000000063,20.934000000000168 39.027000000000093,20.941000000000116 39.03400000000007,20.956000000000188 39.036000000000087,20.955000000000155 39.037000000000063,20.962000000000103 39.035000000000046,20.969000000000193 39.032000000000046,20.973000000000184 39.027000000000093,20.973000000000184 39.015000000000036,20.985000000000156 39.01100000000006,20.996000000000095 39.012000000000036,21.000000000000085 40.000000000000092,21.000000000000085 40.000000000000092,22.000000000000171 40.001000000000069,22.609000000000208 40.012000000000086,22.594000000000136 40.037000000000049,22.587000000000188 40.056000000000083,22.571000000000083 40.073000000000093,22.568000000000126 40.097000000000079,22.569000000000159 40.110000000000049,22.560000000000144 40.145000000000053,22.548000000000172 40.157000000000046,22.550000000000097 40.171000000000063,22.556000000000154 40.174000000000056,22.557000000000187 40.19000000000009,22.570000000000192 40.205000000000084,22.585000000000122 40.210000000000036,22.594000000000136 40.216000000000037,22.588000000000079 40.224000000000053,22.586000000000155 40.24800000000004,22.591000000000179 40.274000000000044,22.602000000000118 40.293000000000077,22.6130000000002 40.310000000000088,22.623000000000104 40.336000000000091,22.6430000000002 40.355000000000061,22.661000000000087 40.366000000000078,22.661000000000087 40.377000000000095,22.631000000000085 40.378000000000071,22.629000000000161 40.380000000000088,22.627000000000095 40.384000000000064,22.624000000000137 40.390000000000065,22.619000000000113 40.399000000000058,22.619000000000113 40.406000000000034,22.612000000000165 40.417000000000044,22.611000000000132 40.425000000000061,22.606000000000108 40.441000000000095,22.607000000000141 40.451000000000072,22.598000000000127 40.456000000000088,22.588000000000079 40.460000000000065,22.585000000000122 40.464000000000041,22.586000000000155 40.472000000000058,22.591000000000179 40.474000000000082,22.595000000000169 40.474000000000082,22.600000000000193 40.476000000000035,22.601000000000084 40.476000000000035,22.615000000000123 40.473000000000035,22.626000000000204 40.468000000000082,22.653000000000105 40.469000000000058,22.656000000000205 40.470000000000041,22.663000000000153 40.474000000000082,22.658000000000129 40.479000000000035,22.650000000000148 40.480000000000075,22.651000000000181 40.484000000000052,22.655000000000172 40.485000000000092,22.66200000000012 40.487000000000052,22.675000000000125 40.489000000000068,22.674000000000092 40.492000000000068,22.664000000000186 40.497000000000085,22.658000000000129 40.500000000000085,22.656000000000205 40.509000000000079,22.652000000000072 40.522000000000048,22.656000000000205 40.526000000000096,22.66200000000012 40.529000000000089,22.679000000000116 40.529000000000089,22.682000000000073 40.530000000000072,22.689000000000163 40.529000000000089,22.698000000000178 40.516000000000055,22.707000000000193 40.506000000000085,22.707000000000193 40.506000000000085,22.713000000000108 40.501000000000062,22.717000000000098 40.502000000000038,22.72500000000008 40.506000000000085,22.735000000000127 40.520000000000095,22.746000000000208 40.540000000000042,22.743000000000109 40.551000000000059,22.742000000000075 40.559000000000076,22.742000000000075 40.569000000000045,22.7770000000001 40.566000000000045,22.784000000000191 40.564000000000092,22.791000000000139 40.564000000000092,22.796000000000163 40.579000000000086,22.829000000000121 40.580000000000062,22.837000000000103 40.591000000000079,22.855000000000132 40.593000000000096,22.856000000000165 40.596000000000032,22.8570000000002 40.612000000000066,22.858000000000089 40.617000000000083,22.859000000000123 40.626000000000076,22.8540000000001 40.628000000000036,22.852000000000174 40.633000000000052,22.852000000000174 40.635000000000076,22.858000000000089 40.638000000000069,22.871000000000095 40.638000000000069,22.881000000000142 40.639000000000053,22.889000000000124 40.643000000000086,22.89100000000019 40.644000000000069,22.895000000000181 40.644000000000069,22.900000000000205 40.643000000000086,22.907000000000153 40.636000000000053,22.929000000000173 40.633000000000052,22.938000000000187 40.627000000000052,22.948000000000093 40.620000000000083,22.952000000000083 40.616000000000042,22.952000000000083 40.599000000000032,22.949000000000126 40.593000000000096,22.949000000000126 40.586000000000055,22.938000000000187 40.583000000000062,22.936000000000121 40.581000000000039,22.937000000000154 40.573000000000086,22.950000000000159 40.567000000000093,22.956000000000074 40.560000000000052,22.969000000000079 40.557000000000052,22.97300000000007 40.552000000000035,22.981000000000193 40.548000000000059,22.981000000000193 40.545000000000059,22.978000000000094 40.544000000000082,22.978000000000094 40.541000000000082,22.979000000000127 40.535000000000089,22.974000000000103 40.527000000000072,22.963000000000164 40.516000000000055,22.943000000000211 40.513000000000055,22.936000000000121 40.506000000000085,22.911000000000143 40.503000000000085,22.890000000000157 40.502000000000038,22.875000000000085 40.501000000000062,22.86500000000018 40.504000000000062,22.8570000000002 40.506000000000085,22.850000000000108 40.507000000000062,22.827000000000197 40.502000000000038,22.816000000000116 40.494000000000085,22.818000000000183 40.478000000000058,22.814000000000192 40.475000000000058,22.818000000000183 40.475000000000058,22.819000000000074 40.474000000000082,22.834000000000145 40.469000000000058,22.851000000000141 40.460000000000065,22.860000000000156 40.444000000000095,22.86500000000018 40.443000000000055,22.86500000000018 40.439000000000078,22.863000000000113 40.432000000000038,22.866000000000071 40.426000000000045,22.883000000000209 40.420000000000044,22.886000000000166 40.406000000000034,22.897000000000105 40.397000000000034,22.903000000000162 40.373000000000047,22.88800000000009 40.381000000000071,22.9170000000002 40.380000000000088,22.949000000000126 40.371000000000095,22.958000000000141 40.369000000000071,22.978000000000094 40.368000000000094,22.984000000000151 40.365000000000038,22.989000000000175 40.358000000000061,22.993000000000166 40.357000000000085,22.9940000000002 40.353000000000044,23.000000000000114 40.350000000000044,23.005000000000138 40.347000000000044,23.012000000000086 40.335000000000051,23.020000000000209 40.325000000000081,23.019000000000176 40.313000000000088,23.049000000000177 40.305000000000071,23.082000000000136 40.299000000000071,23.102000000000089 40.290000000000077,23.124000000000109 40.275000000000084,23.140000000000072 40.273000000000067,23.1580000000001 40.270000000000067,23.179000000000087 40.258000000000074,23.196000000000083 40.258000000000074,23.210000000000122 40.256000000000057,23.221000000000203 40.250000000000057,23.234000000000208 40.250000000000057,23.249000000000137 40.23900000000004,23.277000000000072 40.238000000000063,23.285000000000196 40.237000000000087,23.289000000000186 40.23200000000007,23.300000000000125 40.220000000000077,23.315000000000197 40.197000000000067,23.322000000000145 40.197000000000067,23.334000000000117 40.201000000000043,23.331000000000159 40.210000000000036,23.331000000000159 40.224000000000053,23.338000000000108 40.23900000000004,23.349000000000188 40.254000000000033,23.366000000000184 40.273000000000067,23.386000000000138 40.274000000000044,23.389000000000095 40.27900000000006,23.401000000000209 40.277000000000044,23.428000000000111 40.269000000000091,23.439000000000192 40.26200000000005,23.46100000000007 40.260000000000034,23.4820000000002 40.25900000000005,23.496000000000095 40.24900000000008,23.5120000000002 40.241000000000064,23.521000000000072 40.234000000000087,23.540000000000134 40.235000000000063,23.543000000000092 40.235000000000063,23.544000000000125 40.236000000000047,23.552000000000106 40.235000000000063,23.55700000000013 40.228000000000094,23.575000000000159 40.225000000000094,23.584000000000174 40.227000000000046,23.607000000000085 40.22900000000007,23.615000000000208 40.225000000000094,23.652000000000157 40.20900000000006,23.67500000000021 40.204000000000043,23.6790000000002 40.199000000000083,23.6790000000002 40.19600000000009,23.6790000000002 40.19000000000009,23.686000000000149 40.191000000000074,23.687000000000182 40.19200000000005,23.698000000000121 40.182000000000073,23.710000000000093 40.165000000000063,23.726000000000198 40.149000000000093,23.73100000000008 40.148000000000053,23.73100000000008 40.142000000000053,23.733000000000146 40.138000000000076,23.742000000000161 40.134000000000036,23.748000000000076 40.132000000000083,23.758000000000123 40.11700000000009,23.773000000000195 40.106000000000073,23.776000000000153 40.105000000000032,23.775000000000119 40.096000000000039,23.773000000000195 40.092000000000063,23.781000000000176 40.091000000000086,23.7860000000002 40.090000000000039,23.791000000000082 40.077000000000069,23.791000000000082 40.073000000000093,23.7860000000002 40.067000000000036,23.785000000000167 40.057000000000059,23.790000000000191 40.052000000000042,23.797000000000139 40.050000000000082,23.80100000000013 40.050000000000082,23.805000000000121 40.043000000000049,23.813000000000102 40.038000000000025,23.813000000000102 40.033000000000072,23.812000000000211 40.025000000000055,23.813000000000102 40.015000000000086,23.822000000000116 40.015000000000086,23.82300000000015 40.016000000000062,23.828000000000173 40.019000000000062,23.829000000000207 40.022000000000062,23.831000000000131 40.024000000000079,23.837000000000188 40.016000000000062,23.855000000000075 40.013000000000062,23.859000000000208 40.007000000000069,23.867000000000189 40.004000000000069,23.86800000000008 40.001000000000069,23.867000000000189 40.000000000000092,23.867000000000189 40.000000000000092,24.0000000000002 40.035000000000032,24.0000000000002 40.036000000000072,23.991000000000184 40.042000000000073,23.986000000000161 40.046000000000049,23.986000000000161 40.051000000000066,23.992000000000075 40.053000000000083,24.0000000000002 40.068000000000076,24.0000000000002 40.075000000000053,23.991000000000184 40.075000000000053,23.987000000000194 40.075000000000053,23.986000000000161 40.083000000000069,23.980000000000103 40.102000000000032,23.98200000000017 40.107000000000056,23.989000000000118 40.106000000000073,23.992000000000075 40.107000000000056,23.996000000000208 40.107000000000056,23.9970000000001 40.109000000000073,23.9970000000001 40.113000000000049,23.993000000000109 40.126000000000083,23.977000000000146 40.129000000000083,23.969000000000165 40.134000000000036,23.951000000000136 40.138000000000076,23.93400000000014 40.154000000000046,23.916000000000111 40.158000000000087,23.913000000000153 40.160000000000046,23.903000000000105 40.168000000000063,23.885000000000076 40.17300000000008,23.8630000000002 40.17500000000004,23.84900000000016 40.181000000000033,23.824000000000183 40.191000000000074,23.8160000000002 40.194000000000067,23.811000000000178 40.195000000000043,23.808000000000078 40.195000000000043,23.80100000000013 40.194000000000067,23.804000000000087 40.19000000000009,23.802000000000163 40.1870000000001,23.791000000000082 40.18900000000005,23.781000000000176 40.19300000000009,23.775000000000119 40.217000000000077,23.762000000000114 40.225000000000094,23.75700000000009 40.224000000000053,23.750000000000142 40.230000000000047,23.73800000000017 40.24500000000004,23.725000000000165 40.257000000000033,23.710000000000093 40.285000000000061,23.694000000000131 40.304000000000087,23.695000000000164 40.320000000000057,23.699000000000154 40.325000000000081,23.701000000000079 40.333000000000034,23.706000000000103 40.336000000000091,23.720000000000141 40.341000000000051,23.726000000000198 40.344000000000044,23.726000000000198 40.349000000000068,23.729000000000156 40.354000000000084,23.736000000000104 40.345000000000091,23.762000000000114 40.337000000000074,23.7830000000001 40.356000000000037,23.809000000000111 40.365000000000038,23.829000000000207 40.367000000000054,23.840000000000146 40.370000000000054,23.853000000000151 40.370000000000054,23.862000000000165 40.366000000000078,23.878000000000128 40.360000000000078,23.8900000000001 40.366000000000078,23.903000000000105 40.365000000000038,23.9200000000001 40.348000000000084,23.962000000000074 40.343000000000067,23.967000000000098 40.333000000000034,23.973000000000155 40.325000000000081,23.980000000000103 40.316000000000081,23.998000000000133 40.316000000000081,24.0000000000002 40.384000000000064,24.0000000000002 40.382000000000048,23.996000000000208 40.377000000000095,23.97500000000008 40.378000000000071,23.966000000000207 40.381000000000071,23.930000000000149 40.395000000000081,23.889000000000209 40.418000000000092,23.8600000000001 40.430000000000085,23.850000000000193 40.439000000000078,23.843000000000103 40.440000000000055,23.838000000000079 40.460000000000065,23.82700000000014 40.480000000000075,23.821000000000083 40.491000000000092,23.821000000000083 40.502000000000038,23.82300000000015 40.507000000000062,23.824000000000183 40.516000000000055,23.829000000000207 40.519000000000055,23.835000000000122 40.520000000000095,23.852000000000118 40.518000000000072,23.883000000000152 40.519000000000055,23.888000000000176 40.520000000000095,23.895000000000124 40.524000000000072,23.911000000000087 40.529000000000089,23.918000000000177 40.534000000000049,23.9200000000001 40.536000000000065,23.915000000000077 40.536000000000065,23.908000000000129 40.545000000000059,23.895000000000124 40.553000000000075,23.881000000000085 40.559000000000076,23.858000000000175 40.561000000000092,23.852000000000118 40.559000000000076,23.845000000000169 40.557000000000052,23.834000000000088 40.569000000000045,23.82300000000015 40.582000000000079,23.810000000000144 40.591000000000079,23.785000000000167 40.598000000000049,23.781000000000176 40.604000000000049,23.781000000000176 40.616000000000042,23.780000000000143 40.625000000000036,23.772000000000162 40.629000000000076,23.768000000000171 40.633000000000052,23.763000000000147 40.635000000000076,23.75700000000009 40.642000000000046,23.749000000000109 40.649000000000086,23.748000000000076 40.656000000000063,23.743000000000194 40.659000000000056,23.73500000000007 40.66400000000008,23.718000000000075 40.66400000000008,23.710000000000093 40.666000000000032,23.697000000000088 40.674000000000049,23.694000000000131 40.685000000000066,23.695000000000164 40.703000000000053,23.701000000000079 40.721000000000046,23.711000000000126 40.75100000000009,23.733000000000146 40.758000000000067,23.743000000000194 40.756000000000043,23.76000000000019 40.758000000000067,23.765000000000072 40.771000000000036,23.784000000000134 40.779000000000053,23.817000000000093 40.78400000000007,23.834000000000088 40.78400000000007,23.845000000000169 40.779000000000053,23.857000000000141 40.779000000000053,23.86800000000008 40.778000000000077,23.873000000000104 40.777000000000037,23.875000000000171 40.756000000000043,23.913000000000153 40.75000000000005,23.939000000000163 40.738000000000056,23.967000000000098 40.732000000000056,23.9970000000001 40.732000000000056,24.0000000000002 41.000000000000078,24.0000000000002 41.000000000000078,23.000000000000114 41.332000000000036,23.000000000000114 41.677000000000035,23.000000000000114 41.770000000000046,23.000000000000114 42.000000000000064,23.000000000000114 42.000000000000064,24.0000000000002 43.00000000000005,24.0000000000002 43.00000000000005,25.000000000000142 42.000000000000064,25.000000000000142 42.000000000000064,26.000000000000085 42.000000000000064,26.927000000000163 42.000000000000064,26.949000000000183 42.000000000000064,26.966000000000179 42.000000000000064,27.000000000000171 42.037000000000084,27.000000000000171 43.00000000000005,27.000000000000171 43.00000000000005,27.892000000000081 43.023000000000053,27.890000000000157 43.042000000000087,27.890000000000157 43.04700000000004,27.898000000000138 43.055000000000057,27.90600000000012 43.062000000000033,27.91300000000021 43.106000000000094,27.924000000000149 43.128000000000057,27.931000000000097 43.135000000000034,27.940000000000111 43.168000000000077,27.9470000000002 43.172000000000054,27.945000000000135 43.175000000000054,27.928000000000139 43.17300000000003,27.918000000000092 43.176000000000094,27.91300000000021 43.186000000000071,27.909000000000077 43.189000000000064,27.911000000000143 43.204000000000057,27.927000000000106 43.211000000000034,27.944000000000102 43.219000000000051,27.975000000000136 43.220000000000091,27.985000000000184 43.218000000000075,27.992000000000132 43.220000000000091,28.000000000000114 43.221000000000068,28.007000000000204 43.227000000000068,28.014000000000152 43.245000000000054,28.026000000000124 43.277000000000058,28.044000000000153 43.302000000000092,28.048000000000144 43.304000000000045,28.05000000000021 43.310000000000045,28.055000000000092 43.316000000000038,28.060000000000116 43.328000000000095,28.070000000000164 43.335000000000072,28.068000000000097 43.363000000000035,28.082000000000136 43.376000000000069,28.092000000000183 43.381000000000085,28.105000000000189 43.405000000000072,28.151000000000153 43.405000000000072,28.164000000000158 43.398000000000096,28.180000000000121 43.397000000000055,28.194000000000159 43.399000000000072,28.223000000000127 43.403000000000048,28.231000000000108 43.410000000000089,28.266000000000133 43.413000000000089,28.280000000000172 43.412000000000049,28.286000000000087 43.418000000000042,28.30900000000014 43.416000000000089,28.33500000000015 43.414000000000065,28.340000000000174 43.411000000000072,28.349000000000188 43.411000000000072,28.356000000000137 43.406000000000049,28.37900000000019 43.404000000000096,28.387000000000171 43.387000000000086,28.416000000000139 43.381000000000085,28.450000000000131 43.367000000000075,28.464000000000169 43.361000000000075,28.466000000000093 43.383000000000045,28.470000000000084 43.390000000000079,28.481000000000165 43.408000000000072,28.496000000000095 43.415000000000049,28.508000000000209 43.414000000000065,28.514000000000124 43.424000000000042,28.530000000000086 43.439000000000092,28.546000000000191 43.449000000000069,28.556000000000097 43.473000000000056,28.571000000000168 43.490000000000066,28.585000000000207 43.499000000000059,28.588000000000164 43.520000000000053,28.602000000000203 43.53900000000008,28.607000000000085 43.552000000000049,28.604000000000127 43.57800000000006,28.578000000000117 43.59200000000007,28.571000000000168 43.602000000000046,28.568000000000211 43.61200000000008,28.570000000000135 43.61800000000008,28.574000000000126 43.629000000000033,28.573000000000093 43.637000000000043,28.57900000000015 43.65100000000006,28.569000000000102 43.663000000000054,28.567000000000178 43.675000000000047,28.565000000000111 43.694000000000081,28.565000000000111 43.698000000000057,28.573000000000093 43.70100000000005,28.577000000000083 43.708000000000091,28.578000000000117 43.716000000000044,28.575000000000159 43.724000000000061,28.573000000000093 43.739000000000054,28.57900000000015 43.746000000000095,28.57900000000015 43.757000000000041,28.574000000000126 43.775000000000034,28.581000000000074 43.789000000000044,28.581000000000074 43.797000000000061,28.578000000000117 43.805000000000078,28.583000000000141 43.812000000000054,28.586000000000098 43.813000000000095,28.587000000000131 43.823000000000071,28.589000000000198 43.840000000000082,28.592000000000155 43.842000000000034,28.593000000000188 43.842000000000034,28.597000000000179 43.851000000000028,28.609000000000151 43.878000000000078,28.606000000000193 43.884000000000079,28.608000000000118 43.889000000000095,28.611000000000075 43.900000000000048,28.615000000000208 43.902000000000065,28.6190000000002 43.914000000000058,28.630000000000138 43.925000000000075,28.636000000000195 43.932000000000052,28.633000000000095 43.940000000000069,28.639000000000152 43.952000000000062,28.639000000000152 43.959000000000096,28.643000000000143 43.967000000000048,28.654000000000082 43.973000000000049,28.656000000000148 43.979000000000042,28.657000000000181 43.987000000000059,28.66800000000012 43.999000000000052,28.662000000000205 44.001000000000076,28.663000000000096 44.007000000000069,28.664000000000129 44.012000000000086,28.662000000000205 44.025000000000063,28.657000000000181 44.045000000000073,28.6460000000001 44.055000000000042,28.64200000000011 44.077000000000076,28.639000000000152 44.084000000000046,28.644000000000176 44.08900000000007,28.669000000000153 44.08900000000007,28.670000000000186 44.108000000000033,28.665000000000163 44.108000000000033,28.653000000000191 44.093000000000046,28.652000000000157 44.093000000000046,28.644000000000176 44.097000000000079,28.641000000000076 44.112000000000073,28.643000000000143 44.113000000000056,28.640000000000185 44.116000000000049,28.639000000000152 44.118000000000073,28.639000000000152 44.118000000000073,28.643000000000143 44.128000000000043,28.644000000000176 44.130000000000067,28.653000000000191 44.131000000000043,28.657000000000181 44.112000000000073,28.665000000000163 44.111000000000033,28.667000000000087 44.128000000000043,28.662000000000205 44.138000000000083,28.657000000000181 44.145000000000053,28.666000000000196 44.147000000000077,28.669000000000153 44.148000000000053,28.658000000000072 44.145000000000053,28.6460000000001 44.151000000000053,28.643000000000143 44.155000000000094,28.643000000000143 44.167000000000087,28.643000000000143 44.170000000000087,28.651000000000124 44.171000000000063,28.657000000000181 44.16900000000004,28.658000000000072 44.158000000000094,28.657000000000181 44.161000000000087,28.658000000000072 44.154000000000053,28.671000000000078 44.143000000000036,28.672000000000111 44.121000000000066,28.700000000000188 44.108000000000033,28.708000000000169 44.12200000000005,28.701000000000079 44.143000000000036,28.674000000000177 44.154000000000053,28.672000000000111 44.16200000000007,28.658000000000072 44.170000000000087,28.660000000000139 44.174000000000063,28.660000000000139 44.17900000000008,28.657000000000181 44.18200000000008,28.656000000000148 44.190000000000033,28.655000000000115 44.194000000000074,28.655000000000115 44.197000000000067,28.656000000000148 44.20900000000006,28.651000000000124 44.216000000000037,28.645000000000209 44.21800000000006,28.641000000000076 44.219000000000037,28.637000000000086 44.228000000000094,28.630000000000138 44.231000000000094,28.629000000000104 44.250000000000057,28.623000000000189 44.273000000000067,28.622000000000156 44.297000000000054,28.626000000000147 44.324000000000041,28.639000000000152 44.322000000000081,28.689000000000107 44.324000000000041,28.689000000000107 44.325000000000081,28.653000000000191 44.328000000000081,28.652000000000157 44.341000000000051,28.666000000000196 44.345000000000091,28.6760000000001 44.342000000000091,28.686000000000149 44.345000000000091,28.691000000000173 44.359000000000037,28.698000000000121 44.377000000000095,28.711000000000126 44.384000000000071,28.721000000000174 44.412000000000035,28.746000000000151 44.428000000000068,28.764000000000181 44.430000000000085,28.769000000000204 44.448000000000079,28.7860000000002 44.481000000000058,28.82700000000014 44.495000000000068,28.841000000000179 44.524000000000072,28.867000000000189 44.569000000000045,28.901000000000181 44.597000000000072,28.921000000000134 44.617000000000083,28.93400000000014 44.623000000000083,28.939000000000163 44.638000000000076,28.951000000000136 44.646000000000093,28.96000000000015 44.648000000000046,28.964000000000141 44.651000000000046,28.969000000000165 44.679000000000073,28.995000000000175 44.68300000000005,29.0000000000002 44.709000000000053,29.029000000000167 44.732000000000063,29.059000000000168 44.749000000000073,29.085000000000178 44.77000000000006,29.123000000000161 44.77000000000006,29.128000000000185 44.780000000000037,29.159000000000077 44.785000000000053,29.186000000000121 44.782000000000053,29.189000000000078 44.792000000000094,29.220000000000113 44.797000000000047,29.24500000000009 44.800000000000047,29.272000000000133 44.804000000000087,29.326000000000079 44.804000000000087,29.365000000000094 44.80600000000004,29.390000000000072 44.824000000000034,29.524000000000115 44.824000000000034,29.525000000000148 44.824000000000034,29.549000000000092 44.82300000000005,29.554000000000116 44.827000000000091,29.56300000000013 44.838000000000044,29.573000000000178 44.839000000000084,29.575000000000102 44.839000000000084,29.577000000000169 44.837000000000067,29.586000000000183 44.847000000000037,29.606000000000137 44.857000000000077,29.613000000000085 44.865000000000094,29.609000000000094 44.877000000000088,29.603000000000179 44.882000000000041,29.613000000000085 44.885000000000041,29.620000000000175 44.884000000000064,29.6250000000002 44.924000000000078,29.627000000000123 44.998000000000062,29.644000000000119 45.000000000000078,29.641000000000162 45.001000000000062,29.642000000000195 45.055000000000092,29.651000000000209 45.092000000000048,29.656000000000091 45.124000000000052,29.667000000000172 45.152000000000079,29.687000000000126 45.162000000000049,29.700000000000131 45.165000000000049,29.715000000000202 45.167000000000073,29.714000000000169 45.167000000000073,29.705000000000155 45.160000000000032,29.673000000000087 45.160000000000032,29.669000000000096 45.160000000000032,29.650000000000176 45.162000000000049,29.64800000000011 45.169000000000089,29.641000000000162 45.212000000000046,29.62900000000019 45.217000000000063,29.628000000000156 45.221000000000039,29.634000000000071 45.224000000000039,29.638000000000204 45.214000000000063,29.658000000000158 45.206000000000046,29.675000000000153 45.206000000000046,29.678000000000111 45.206000000000046,29.6820000000001 45.212000000000046,29.680000000000177 45.213000000000086,29.6820000000001 45.215000000000046,29.681000000000211 45.217000000000063,29.679000000000144 45.223000000000063,29.67400000000012 45.22800000000008,29.676000000000187 45.230000000000032,29.679000000000144 45.233000000000033,29.687000000000126 45.235000000000056,29.693000000000183 45.234000000000073,29.695000000000107 45.23100000000008,29.693000000000183 45.230000000000032,29.687000000000126 45.217000000000063,29.686000000000092 45.207000000000093,29.693000000000183 45.210000000000086,29.71800000000016 45.21100000000007,29.722000000000151 45.226000000000056,29.727000000000174 45.22800000000008,29.73700000000008 45.246000000000066,29.74000000000018 45.263000000000076,29.74000000000018 45.267000000000053,29.730000000000132 45.272000000000077,29.725000000000108 45.274000000000093,29.723000000000184 45.283000000000087,29.719000000000193 45.289000000000087,29.734000000000123 45.28400000000007,29.74000000000018 45.273000000000053,29.736000000000189 45.267000000000053,29.736000000000189 45.267000000000053,29.739000000000146 45.326000000000043,29.765000000000157 45.332000000000043,29.765000000000157 45.342000000000077,29.764000000000124 45.391000000000091,29.753000000000185 45.39300000000005,29.750000000000085 45.398000000000067,29.748000000000161 45.400000000000091,29.749000000000194 45.402000000000044,29.750000000000085 45.403000000000084,29.750000000000085 45.417000000000037,29.761000000000166 45.434000000000047,29.761000000000166 45.438000000000088,29.757000000000176 45.447000000000081,29.754000000000076 45.460000000000051,29.754000000000076 45.475000000000044,29.747000000000128 45.488000000000078,29.752000000000152 45.470000000000091,29.728000000000208 45.468000000000067,29.721000000000117 45.464000000000091,29.707000000000079 45.466000000000051,29.687000000000126 45.471000000000068,29.680000000000177 45.476000000000084,29.67400000000012 45.479000000000084,29.663000000000181 45.474000000000068,29.6550000000002 45.469000000000051,29.654000000000167 45.468000000000067,29.654000000000167 45.466000000000051,29.656000000000091 45.468000000000067,29.659000000000191 45.468000000000067,29.661000000000115 45.467000000000091,29.661000000000115 45.462000000000074,29.662000000000148 45.453000000000081,29.656000000000091 45.451000000000057,29.653000000000134 45.452000000000034,29.647000000000077 45.468000000000067,29.621000000000208 45.477000000000068,29.609000000000094 45.480000000000061,29.606000000000137 45.485000000000085,29.60700000000017 45.489000000000061,29.612000000000194 45.496000000000095,29.617000000000075 45.504000000000048,29.616000000000184 45.511000000000088,29.611000000000161 45.514000000000088,29.612000000000194 45.516000000000041,29.62600000000009 45.515000000000065,29.631000000000114 45.510000000000048,29.6250000000002 45.513000000000048,29.614000000000118 45.511000000000088,29.612000000000194 45.503000000000071,29.617000000000075 45.495000000000054,29.620000000000175 45.492000000000054,29.616000000000184 45.493000000000038,29.616000000000184 45.489000000000061,29.613000000000085 45.483000000000061,29.614000000000118 45.482000000000085,29.614000000000118 45.475000000000044,29.619000000000142 45.482000000000085,29.617000000000075 45.484000000000037,29.616000000000184 45.496000000000095,29.623000000000133 45.509000000000071,29.631000000000114 45.539000000000051,29.663000000000181 45.551000000000045,29.678000000000111 45.561000000000078,29.690000000000083 45.578000000000095,29.715000000000202 45.611000000000075,29.774000000000171 45.646000000000072,29.845000000000113 45.649000000000072,29.84800000000007 45.663000000000089,29.873000000000189 45.683000000000035,29.902000000000157 45.737000000000066,30.000000000000142 46.000000000000064,30.000000000000142 46.00100000000004,30.377000000000152 46.013000000000034,30.394000000000148 46.048000000000037,30.436000000000121 46.055000000000078,30.446000000000168 46.063000000000095,30.459000000000174 46.071000000000048,30.47300000000007 46.079000000000065,30.483000000000118 46.089000000000034,30.487000000000108 46.108000000000068,30.505000000000138 46.125000000000078,30.515000000000185 46.137000000000072,30.533000000000072 46.139000000000095,30.535000000000139 46.154000000000082,30.5540000000002 46.172000000000075,30.569000000000131 46.188000000000045,30.579000000000178 46.195000000000078,30.583000000000169 46.214000000000048,30.602000000000089 46.233000000000082,30.620000000000118 46.244000000000035,30.6280000000001 46.259000000000086,30.639000000000181 46.282000000000032,30.652000000000186 46.326000000000093,30.684000000000111 46.359000000000073,30.71700000000007 46.375000000000043,30.744000000000113 46.382000000000083,30.751000000000204 46.402000000000093,30.757000000000119 46.42200000000004,30.771000000000157 46.435000000000073,30.774000000000115 46.450000000000067,30.774000000000115 46.477000000000046,30.767000000000166 46.484000000000087,30.761000000000109 46.488000000000063,30.753000000000128 46.491000000000064,30.74600000000018 46.49300000000008,30.740000000000123 46.49500000000004,30.737000000000165 46.500000000000057,30.732000000000141 46.511000000000074,30.731000000000108 46.52900000000006,30.7380000000002 46.538000000000061,30.745000000000147 46.546000000000078,30.754000000000161 46.555000000000071,30.774000000000115 46.558000000000064,30.797000000000168 46.558000000000064,30.81300000000013 46.552000000000071,30.821000000000112 46.551000000000094,30.822000000000145 46.552000000000071,30.840000000000174 46.555000000000071,30.853000000000179 46.556000000000047,30.856000000000137 46.56500000000004,30.878000000000156 46.571000000000041,30.89800000000011 46.575000000000081,30.917000000000172 46.579000000000057,30.927000000000078 46.583000000000034,30.957000000000079 46.593000000000067,31.000000000000085 46.594000000000044,31.006000000000142 46.598000000000084,31.0120000000002 46.600000000000044,31.021000000000072 46.614000000000054,31.09800000000007 46.616000000000078,31.113000000000142 46.616000000000078,31.128000000000071 46.624000000000095,31.148000000000167 46.627000000000095,31.178000000000168 46.622000000000071,31.209000000000202 46.618000000000094,31.221000000000174 46.612000000000037,31.232000000000113 46.610000000000078,31.240000000000094 46.609000000000037,31.2530000000001 46.612000000000037,31.269000000000204 46.611000000000061,31.293000000000148 46.607000000000085,31.310000000000144 46.605000000000061,31.334000000000088 46.603000000000044,31.34200000000007 46.600000000000044,31.350000000000193 46.601000000000084,31.353000000000151 46.604000000000084,31.354000000000184 46.605000000000061,31.355000000000075 46.615000000000038,31.356000000000108 46.621000000000095,31.36400000000009 46.623000000000054,31.372000000000071 46.623000000000054,31.389000000000209 46.619000000000078,31.408000000000129 46.627000000000095,31.4200000000001 46.627000000000095,31.424000000000092 46.625000000000071,31.430000000000149 46.626000000000047,31.476000000000113 46.623000000000054,31.50100000000009 46.620000000000054,31.517000000000195 46.619000000000078,31.518000000000086 46.600000000000044,31.552000000000078 46.601000000000084,31.554000000000144 46.603000000000044,31.555000000000177 46.606000000000037,31.554000000000144 46.617000000000054,31.563000000000159 46.621000000000095,31.567000000000149 46.625000000000071,31.572000000000173 46.638000000000041,31.588000000000136 46.646000000000058,31.609000000000123 46.649000000000058,31.628000000000185 46.649000000000058,31.651000000000096 46.642000000000081,31.694000000000102 46.638000000000041,31.70400000000015 46.627000000000095,31.736000000000075 46.625000000000071,31.7740000000002 46.619000000000078,31.787000000000205 46.609000000000037,31.797000000000111 46.614000000000054,31.807000000000158 46.622000000000071,31.829000000000178 46.631000000000071,31.871000000000151 46.637000000000064,31.889000000000181 46.645000000000081,31.899000000000086 46.657000000000075,31.906000000000176 46.658000000000051,31.906000000000176 46.667000000000044,31.902000000000186 46.667000000000044,31.944000000000159 46.665000000000092,31.979000000000184 46.657000000000075,31.984000000000208 46.641000000000041,32.000000000000171 47.00000000000005,32.000000000000171 47.00000000000005,33.000000000000114 47.00000000000005,34.0000000000002 47.00000000000005,35 47.00000000000005,35.999999999999943 47.00000000000005,37.000000000000028 47.00100000000009,37.453 47.005000000000067,37.45599999999996 47.029000000000053,37.47799999999998 47.04300000000007,37.492000000000019 47.066000000000074,37.516999999999996 47.07300000000005,37.523999999999944 47.081000000000067,37.539000000000016 47.086000000000084,37.575999999999965 47.09000000000006,37.604999999999933 47.095000000000084,37.629000000000019 47.091000000000044,37.648999999999972 47.087000000000067,37.661999999999978 47.084000000000067,37.673000000000059 47.081000000000067,37.689000000000021 47.080000000000091,37.711000000000041 47.084000000000067,37.750000000000057 47.088000000000044,37.77000000000001 47.086000000000084,37.793999999999954 47.09000000000006,37.81800000000004 47.092000000000084,37.823999999999955 47.097000000000037,37.83299999999997 47.103000000000037,37.844999999999942 47.107000000000077,37.862999999999971 47.111000000000054,37.891999999999939 47.11000000000007,37.904000000000053 47.102000000000054,37.928 47.089000000000084,37.967000000000013 47.087000000000067,37.981000000000051 47.087000000000067,37.982999999999976 47.089000000000084,37.982999999999976 47.09300000000006,37.972000000000037 47.098000000000077,37.984000000000009 47.099000000000061,37.999999999999972 48.000000000000036,37.999999999999972 48.000000000000036,39.000000000000057 49.000000000000021,39.000000000000057 49.001,39.668000000000063 49.000000000000021,40 49.149000000000022,40 49.600999999999978,40 50.000000000000007,40 50.999999999999986,40 51.999999999999972,40 51.999999999999972,40.999999999999943 51.999999999999972,42.000000000000028 51.999999999999972,42.999999999999972 53.000000000000021,42.999999999999972 53.000000000000021,44.000000000000057 51.999999999999972,44.000000000000057 51.999999999999972,45 53.000000000000021,45 53.000000000000021,45.999999999999943 53.000000000000021,47.000000000000028 53.000000000000021,47.999999999999972 54.000000000000007,47.999999999999972 54.000000000000007,49.000000000000057 54.999999999999993,49.000000000000057 54.999999999999993,47.999999999999972 55.999999999999979,47.999999999999972 55.999999999999979,47.000000000000028 55.999999999999979,45.999999999999943 55.999999999999979,45 55.999999999999979,44.000000000000057 54.999999999999993,44.000000000000057 54.999999999999993,42.999999999999972 54.999999999999993,42.000000000000028 54.000000000000007,42.000000000000028 54.000000000000007,40.999999999999943 53.000000000000021,40.999999999999943 53.000000000000021,40 54.000000000000007,40 54.999999999999993,40 54.999999999999993,39.000000000000057 54.999999999999993,37.999999999999972 55.999999999999979,37.999999999999972 55.999999999999979,37.000000000000028 57.000000000000028,37.000000000000028 57.000000000000028,35.999999999999943 55.999999999999979,35.999999999999943 55.999999999999979,35 54.999999999999993,35 54.999999999999993,34.0000000000002 54.999999999999993,33.000000000000114 54.000000000000007,33.000000000000114 54.000000000000007,32.000000000000171 54.000000000000007,31.86300000000017 54.000000000000007,31.000000000000085 54.000000000000007,30.000000000000142 54.000000000000007,29.0000000000002 54.000000000000007,28.000000000000114 53.000000000000021,28.000000000000114 53.000000000000021,27.000000000000171 51.999999999999972,27.000000000000171 51.768999999999977,27.000000000000171 50.999999999999986,27.000000000000171 50.999999999999986,26.000000000000085 50.999999999999986,25.000000000000142 50.000000000000007,25.000000000000142 50.000000000000007,24.0000000000002 49.000000000000021,24.0000000000002 49.000000000000021,25.000000000000142 48.000000000000036,25.000000000000142 48.000000000000036,24.0000000000002 49.000000000000021,24.0000000000002 49.000000000000021,23.000000000000114 49.001,22.528000000000077 49.000000000000021,22.000000000000171 49.000000000000021,21.000000000000085 48.000000000000036,21.000000000000085 47.00000000000005,21.000000000000085 47.00000000000005,20.000000000000142 47.00000000000005,19.0000000000002 46.000000000000064,19.0000000000002 46.000000000000064,18.000000000000114 46.00100000000004,17.305000000000206 46.00100000000004,17.290000000000134 46.00100000000004,17.282000000000153 46.000000000000064,17.000000000000171 46.223000000000042,17.000000000000171 47.00000000000005,17.000000000000171 47.00100000000009,16.512000000000171 47.00100000000009,16.459000000000117 47.00100000000009,16.446000000000112 47.00100000000009,16.416000000000111 47.00100000000009,16.388000000000176 47.00100000000009,16.376000000000204 47.00100000000009,16.343000000000103 47.00100000000009,16.32700000000014 47.00100000000009,16.315000000000168 47.00100000000009,16.299000000000206 47.00100000000009,16.28200000000021 47.00000000000005,16.000000000000085 46.834000000000039,16.000000000000085 46.726000000000035,16.000000000000085 46.677000000000085,16.000000000000085 46.311000000000035,16.000000000000085 46.000000000000064,16.000000000000085 46.00100000000004,15.703000000000173 46.000000000000064,15.000000000000142 45.496000000000095,15.000000000000142 45.000000000000078,15.000000000000142 45.001000000000062,15.783000000000129 45.000000000000078,16.000000000000085 45.001000000000062,16.291000000000082 45.001000000000062,16.308000000000078 45.001000000000062,16.333000000000197 45.001000000000062,16.343000000000103 45.000000000000078,17.000000000000171 44.0000000000001,17.000000000000171 44.0000000000001,18.000000000000114 44.0000000000001,19.0000000000002 43.55900000000009,19.0000000000002 43.445000000000093,19.0000000000002 43.253000000000071,19.0000000000002 43.00000000000005,19.0000000000002 42.152000000000058,19.0000000000002 42.156000000000034,19.011000000000138 42.137000000000072,19.016000000000162 42.133000000000095,19.021000000000186 42.136000000000095,19.040000000000106 42.136000000000095,19.043000000000205 42.136000000000095,19.061000000000092 42.133000000000095,19.068000000000183 42.126000000000055,19.073000000000206 42.119000000000078,19.074000000000098 42.110000000000085,19.09300000000016 42.103000000000044,19.099000000000075 42.097000000000051,19.101000000000141 42.089000000000034,19.101000000000141 42.088000000000058,19.099000000000075 42.086000000000034,19.096000000000117 42.085000000000058,19.092000000000127 42.088000000000058,19.08600000000007 42.087000000000074,19.081000000000188 42.084000000000081,19.082000000000079 42.064000000000071,19.11200000000008 42.058000000000071,19.128000000000185 42.048000000000037,19.142000000000081 42.039000000000044,19.152000000000129 42.002000000000081,19.153000000000162 42.00100000000004,19.153000000000162 41.981000000000094,19.150000000000205 41.974000000000053,19.147000000000105 41.969000000000037,19.151000000000096 41.961000000000084,19.165000000000134 41.956000000000067,19.169000000000125 41.953000000000067,19.170000000000158 41.952000000000091,19.157000000000153 41.95100000000005,19.15600000000012 41.937000000000033,19.177000000000106 41.906000000000077,19.243000000000166 41.910000000000053,19.2440000000002 41.89200000000006,19.313000000000073 41.86900000000005,19.349000000000132 41.85900000000008,19.364000000000203 41.85300000000008,19.372000000000185 41.850000000000087,19.377000000000209 41.849000000000039,19.389000000000181 41.850000000000087,19.391000000000105 41.852000000000039,19.397000000000162 41.86200000000008,19.412000000000091 41.86200000000008,19.432000000000187 41.852000000000039,19.48900000000009 41.843000000000046,19.52200000000019 41.833000000000069,19.547000000000168 41.819000000000059,19.571000000000112 41.813000000000059,19.582000000000193 41.810000000000066,19.592000000000098 41.815000000000083,19.595000000000198 41.814000000000043,19.601000000000113 41.80600000000009,19.608000000000203 41.792000000000073,19.610000000000127 41.766000000000069,19.602000000000146 41.765000000000086,19.597000000000122 41.767000000000046,19.58500000000015 41.767000000000046,19.584000000000117 41.766000000000069,19.579000000000093 41.757000000000076,19.576000000000136 41.750000000000036,19.576000000000136 41.747000000000035,19.577000000000169 41.742000000000083,19.580000000000126 41.728000000000065,19.590000000000174 41.717000000000056,19.593000000000131 41.706000000000039,19.593000000000131 41.696000000000069,19.590000000000174 41.687000000000069,19.58500000000015 41.680000000000035,19.576000000000136 41.659000000000042,19.569000000000187 41.657000000000089,19.570000000000078 41.653000000000048,19.572000000000145 41.649000000000072,19.577000000000169 41.644000000000048,19.593000000000131 41.646000000000072,19.603000000000179 41.643000000000072,19.610000000000127 41.638000000000055,19.614000000000118 41.617000000000068,19.617000000000075 41.612000000000052,19.615000000000151 41.605000000000075,19.608000000000203 41.625000000000085,19.602000000000146 41.624000000000045,19.598000000000155 41.621000000000045,19.597000000000122 41.612000000000052,19.599000000000188 41.603000000000051,19.596000000000089 41.602000000000075,19.588000000000108 41.594000000000058,19.580000000000126 41.588000000000065,19.576000000000136 41.581000000000088,19.566000000000088 41.577000000000048,19.554000000000116 41.575000000000088,19.543000000000177 41.574000000000048,19.517000000000166 41.575000000000088,19.516000000000133 41.581000000000088,19.490000000000123 41.585000000000065,19.478000000000151 41.588000000000065,19.464000000000112 41.587000000000081,19.460000000000122 41.560000000000038,19.469000000000136 41.557000000000038,19.472000000000094 41.548000000000044,19.497000000000071 41.547000000000068,19.506000000000085 41.545000000000044,19.512000000000143 41.542000000000044,19.5180000000002 41.534000000000091,19.52200000000019 41.527000000000058,19.524000000000115 41.507000000000048,19.524000000000115 41.480000000000061,19.512000000000143 41.464000000000091,19.500000000000171 41.459000000000074,19.495000000000147 41.446000000000041,19.470000000000169 41.444000000000081,19.453000000000173 41.441000000000081,19.451000000000107 41.428000000000047,19.462000000000188 41.427000000000071,19.463000000000079 41.424000000000071,19.463000000000079 41.410000000000061,19.457000000000164 41.409000000000077,19.456000000000131 41.40400000000006,19.450000000000074 41.400000000000084,19.443000000000126 41.399000000000044,19.433000000000078 41.40100000000006,19.422000000000139 41.403000000000084,19.417000000000115 41.409000000000077,19.414000000000158 41.415000000000077,19.40400000000011 41.413000000000054,19.401000000000153 41.406000000000084,19.40700000000021 41.397000000000084,19.415000000000191 41.391000000000091,19.42600000000013 41.382000000000033,19.431000000000154 41.36700000000004,19.427000000000163 41.332000000000036,19.429000000000087 41.31500000000009,19.442000000000093 41.309000000000026,19.459000000000088 41.316000000000066,19.461000000000155 41.31700000000005,19.464000000000112 41.31500000000009,19.490000000000123 41.304000000000073,19.505000000000194 41.29200000000008,19.516000000000133 41.273000000000053,19.527000000000072 41.263000000000076,19.529000000000138 41.252000000000059,19.529000000000138 41.22800000000008,19.517000000000166 41.201000000000093,19.492000000000189 41.186000000000035,19.48900000000009 41.161000000000072,19.481000000000108 41.152000000000079,19.473000000000127 41.149000000000079,19.468000000000103 41.150000000000055,19.461000000000155 41.150000000000055,19.454000000000207 41.146000000000079,19.449000000000183 41.106000000000058,19.468000000000103 41.105000000000082,19.469000000000136 41.101000000000042,19.469000000000136 41.083000000000055,19.470000000000169 41.031000000000041,19.458000000000197 41.017000000000088,19.4410000000002 41.011000000000095,19.443000000000126 41.003000000000078,19.466000000000179 41.002000000000095,19.47400000000016 41.001000000000055,19.475000000000193 40.992000000000061,19.4880000000002 40.980000000000068,19.490000000000123 40.954000000000065,19.484000000000208 40.941000000000088,19.477000000000118 40.929000000000094,19.471000000000203 40.910000000000068,19.463000000000079 40.916000000000061,19.472000000000094 40.943000000000048,19.4850000000001 40.952000000000041,19.491000000000156 40.981000000000044,19.505000000000194 40.982000000000085,19.509000000000185 40.977000000000068,19.523000000000081 40.975000000000051,19.527000000000072 40.951000000000064,19.532000000000096 40.948000000000064,19.536000000000087 40.932000000000095,19.538000000000153 40.913000000000061,19.536000000000087 40.908000000000044,19.532000000000096 40.901000000000067,19.514000000000209 40.898000000000074,19.500000000000171 40.888000000000034,19.495000000000147 40.886000000000081,19.483000000000175 40.892000000000074,19.481000000000108 40.891000000000034,19.475000000000193 40.889000000000074,19.465000000000146 40.880000000000081,19.460000000000122 40.878000000000064,19.456000000000131 40.877000000000081,19.446000000000083 40.87900000000004,19.443000000000126 40.882000000000041,19.4410000000002 40.89300000000005,19.442000000000093 40.904000000000067,19.447000000000116 40.908000000000044,19.456000000000131 40.911000000000044,19.458000000000197 40.923000000000037,19.458000000000197 40.925000000000054,19.455000000000098 40.927000000000078,19.453000000000173 40.926000000000037,19.4410000000002 40.930000000000078,19.436000000000178 40.933000000000071,19.436000000000178 40.938000000000095,19.439000000000135 40.941000000000088,19.459000000000088 40.945000000000064,19.463000000000079 40.946000000000041,19.461000000000155 40.944000000000088,19.445000000000192 40.941000000000088,19.437000000000211 40.936000000000071,19.430000000000121 40.917000000000037,19.423000000000172 40.915000000000084,19.413000000000125 40.915000000000084,19.402000000000186 40.914000000000044,19.398000000000195 40.911000000000044,19.395000000000095 40.89300000000005,19.394000000000204 40.896000000000051,19.402000000000186 40.891000000000034,19.417000000000115 40.883000000000081,19.424000000000206 40.872000000000064,19.429000000000087 40.864000000000047,19.431000000000154 40.863000000000071,19.425000000000097 40.863000000000071,19.418000000000148 40.861000000000047,19.417000000000115 40.84600000000006,19.416000000000082 40.84300000000006,19.416000000000082 40.83700000000006,19.419000000000182 40.82400000000009,19.420000000000073 40.819000000000074,19.418000000000148 40.814000000000057,19.4110000000002 40.80900000000004,19.398000000000195 40.80600000000004,19.389000000000181 40.802000000000064,19.38500000000019 40.78700000000007,19.383000000000123 40.779000000000053,19.383000000000123 40.756000000000043,19.38200000000009 40.744000000000057,19.38500000000019 40.71100000000007,19.379000000000133 40.698000000000036,19.372000000000185 40.683000000000042,19.362000000000137 40.674000000000049,19.351000000000198 40.670000000000073,19.334000000000202 40.666000000000032,19.328000000000145 40.656000000000063,19.322000000000088 40.649000000000086,19.331000000000103 40.623000000000076,19.352000000000089 40.621000000000059,19.355000000000189 40.595000000000056,19.368000000000194 40.571000000000069,19.388000000000147 40.556000000000076,19.397000000000162 40.548000000000059,19.399000000000086 40.549000000000035,19.403000000000077 40.569000000000045,19.40400000000011 40.582000000000079,19.406000000000176 40.584000000000039,19.4110000000002 40.579000000000086,19.442000000000093 40.566000000000045,19.469000000000136 40.547000000000082,19.465000000000146 40.534000000000049,19.472000000000094 40.516000000000055,19.46700000000007 40.503000000000085,19.463000000000079 40.499000000000045,19.457000000000164 40.509000000000079,19.443000000000126 40.518000000000072,19.432000000000187 40.529000000000089,19.425000000000097 40.529000000000089,19.421000000000106 40.516000000000055,19.420000000000073 40.515000000000079,19.418000000000148 40.519000000000055,19.4110000000002 40.525000000000048,19.406000000000176 40.532000000000089,19.405000000000143 40.543000000000042,19.402000000000186 40.545000000000059,19.400000000000119 40.543000000000042,19.395000000000095 40.539000000000065,19.392000000000138 40.522000000000048,19.401000000000153 40.507000000000062,19.414000000000158 40.502000000000038,19.419000000000182 40.503000000000085,19.439000000000135 40.484000000000052,19.45200000000014 40.473000000000035,19.464000000000112 40.452000000000048,19.504000000000161 40.446000000000055,19.507000000000119 40.439000000000078,19.504000000000161 40.420000000000044,19.491000000000156 40.402000000000058,19.490000000000123 40.393000000000058,19.492000000000189 40.357000000000085,19.495000000000147 40.353000000000044,19.49300000000008 40.340000000000067,19.476000000000084 40.328000000000074,19.450000000000074 40.327000000000034,19.435000000000144 40.330000000000034,19.429000000000087 40.348000000000084,19.420000000000073 40.371000000000095,19.420000000000073 40.384000000000064,19.414000000000158 40.388000000000041,19.412000000000091 40.411000000000051,19.391000000000105 40.425000000000061,19.375000000000142 40.437000000000054,19.353000000000122 40.444000000000095,19.335000000000093 40.444000000000095,19.332000000000136 40.439000000000078,19.320000000000164 40.429000000000038,19.303000000000168 40.426000000000045,19.3040000000002 40.424000000000085,19.306000000000125 40.412000000000091,19.321000000000197 40.387000000000064,19.350000000000165 40.355000000000061,19.376000000000175 40.331000000000074,19.383000000000123 40.328000000000074,19.384000000000157 40.319000000000081,19.383000000000123 40.316000000000081,19.38200000000009 40.303000000000047,19.391000000000105 40.293000000000077,19.409000000000134 40.285000000000061,19.417000000000115 40.277000000000044,19.422000000000139 40.24500000000004,19.450000000000074 40.237000000000087,19.460000000000122 40.207000000000036,19.509000000000185 40.202000000000083,19.5180000000002 40.17600000000008,19.589000000000141 40.149000000000093,19.639000000000095 40.145000000000053,19.653000000000134 40.135000000000076,19.658000000000158 40.132000000000083,19.663000000000181 40.130000000000059,19.669000000000096 40.132000000000083,19.680000000000177 40.131000000000043,19.6850000000002 40.126000000000083,19.703000000000088 40.12300000000009,19.710000000000178 40.11400000000009,19.730000000000132 40.112000000000073,19.735000000000156 40.107000000000056,19.752000000000152 40.10300000000008,19.760000000000133 40.098000000000056,19.7620000000002 40.094000000000079,19.761000000000166 40.086000000000062,19.758000000000209 40.084000000000046,19.7590000000001 40.085000000000086,19.772000000000105 40.084000000000046,19.775000000000205 40.069000000000052,19.780000000000086 40.064000000000036,19.784000000000077 40.076000000000093,19.787000000000177 40.071000000000076,19.803000000000139 40.064000000000036,19.806000000000097 40.058000000000035,19.805000000000206 40.054000000000059,19.802000000000106 40.050000000000082,19.80700000000013 40.050000000000082,19.809000000000196 40.050000000000082,19.820000000000135 40.056000000000083,19.82900000000015 40.057000000000059,19.835000000000207 40.055000000000042,19.842000000000155 40.053000000000083,19.85500000000016 40.041000000000089,19.873000000000189 40.016000000000062,19.89200000000011 40.007000000000069,19.895000000000209 40.000000000000092,19.894000000000176 40.000000000000092,19.893000000000143 39.996000000000052,19.8960000000001 39.980000000000082,19.905000000000115 39.966000000000072,19.917000000000087 39.946000000000062,19.933000000000192 39.929000000000045,19.933000000000192 39.928000000000068,19.930000000000092 39.930000000000092,19.924000000000177 39.925000000000068,19.919000000000153 39.925000000000068,19.91800000000012 39.914000000000058,19.907000000000181 39.912000000000035,19.906000000000148 39.904000000000082,19.917000000000087 39.902000000000065,19.927000000000135 39.902000000000065,19.9290000000002 39.895000000000088,19.954000000000178 39.888000000000048,19.957000000000136 39.876000000000055,19.979000000000156 39.872000000000078,19.992000000000161 39.872000000000078,19.999000000000109 39.873000000000062,20.000000000000142 39.875000000000078,20.004000000000133 39.875000000000078,20.008000000000123 39.867000000000061,20.013000000000147 39.850000000000051,20.017000000000138 39.839000000000034,20.008000000000123 39.827000000000041,20.013000000000147 39.821000000000048,20.011000000000081 39.807000000000095,20.002000000000209 39.806000000000054,20.000000000000142 39.802000000000078,19.994000000000085 39.796000000000078,19.991000000000128 39.794000000000061,19.992000000000161 39.789000000000044,20.000000000000142 39.789000000000044,20.001000000000175 39.783000000000044,20.001000000000175 39.782000000000068,20.000000000000142 39.770000000000074,19.989000000000203 39.771000000000051,19.979000000000156 39.769000000000034,19.978000000000122 39.752000000000088,19.974000000000132 39.748000000000047,19.976000000000198 39.744000000000071,19.980000000000189 39.744000000000071,19.984000000000179 39.747000000000071,19.987000000000137 39.753000000000064,19.993000000000194 39.75400000000004,19.995000000000118 39.752000000000088,19.997000000000185 39.734000000000094,19.992000000000161 39.732000000000077,19.992000000000161 39.710000000000043,19.979000000000156 39.6990000000001,19.98100000000008 39.690000000000033,19.984000000000179 39.689000000000057,19.992000000000161 39.692000000000057,20.000000000000142 39.694000000000074,20.004000000000133 39.693000000000033,20.008000000000123 39.691000000000074,20.009000000000157 39.68100000000004,20.016000000000105 39.677000000000064,20.024000000000086 39.68100000000004,20.034000000000134 39.68100000000004,20.035000000000167 39.68400000000004,20.044000000000182 39.68400000000004,20.046000000000106 39.683000000000064,20.060000000000144 39.680000000000064,20.0660000000002 39.670000000000087,20.083000000000197 39.663000000000054,20.088000000000079 39.659000000000077,20.090000000000146 39.657000000000053,20.09200000000007 39.650000000000077,20.102000000000118 39.65500000000003,20.102000000000118 39.656000000000077,20.102000000000118 39.660000000000053,20.106000000000108 39.660000000000053,20.1130000000002 39.654000000000053,20.12100000000018 39.646000000000036,20.131000000000085 39.639000000000067,20.145000000000124 39.639000000000067,20.155000000000172 39.63800000000009,20.16200000000012 39.634000000000043,20.172000000000168 39.624000000000073,20.181000000000182 39.610000000000056,20.187000000000097 39.60900000000008,20.187000000000097 39.601000000000063,20.183000000000106 39.591000000000093,20.1700000000001 39.58900000000007,20.168000000000177 39.588000000000093,20.166000000000111 39.581000000000053,20.1730000000002 39.569000000000059,20.1700000000001 39.55300000000009,20.16200000000012 39.552000000000049,20.158000000000129 39.55600000000009,20.150000000000148 39.528000000000063,20.136000000000109 39.527000000000086,20.142000000000166 39.528000000000063,20.158000000000129 39.524000000000086,20.159000000000162 39.514000000000053,20.172000000000168 39.513000000000076,20.176000000000158 39.519000000000069,20.185000000000173 39.518000000000093,20.202000000000169 39.513000000000076,20.217000000000098 39.515000000000093,20.224000000000188 39.520000000000046,20.230000000000103 39.520000000000046,20.234000000000094 39.517000000000053,20.246000000000208 39.511000000000053,20.262000000000171 39.507000000000076,20.264000000000095 39.499000000000059,20.265000000000128 39.483000000000089,20.257000000000147 39.491000000000042,20.233000000000203 39.492000000000083,20.231000000000137 39.491000000000042,20.212000000000074 39.486000000000089,20.216000000000207 39.483000000000089,20.223000000000155 39.482000000000049,20.227000000000146 39.477000000000089,20.23200000000017 39.470000000000056,20.236000000000161 39.467000000000056,20.242000000000075 39.460000000000079,20.25800000000018 39.455000000000062,20.27300000000011 39.452000000000062,20.2770000000001 39.444000000000045,20.27300000000011 39.444000000000045,20.264000000000095 39.447000000000045,20.259000000000071 39.447000000000045,20.2500000000002 39.446000000000069,20.213000000000108 39.430000000000035,20.226000000000113 39.413000000000082,20.230000000000103 39.402000000000072,20.230000000000103 39.397000000000055,20.253000000000156 39.396000000000072,20.263000000000204 39.390000000000079,20.270000000000152 39.388000000000062,20.27300000000011 39.387000000000079,20.27300000000011 39.383000000000038,20.278000000000134 39.379000000000062,20.281000000000091 39.373000000000069,20.279000000000167 39.366000000000092,20.275000000000176 39.349000000000082,20.282000000000124 39.333000000000048,20.285000000000082 39.326000000000072,20.288000000000181 39.319000000000095,20.296000000000163 39.316000000000031,20.301000000000187 39.307000000000038,20.316000000000116 39.294000000000068,20.335000000000178 39.290000000000092,20.33600000000007 39.285000000000075,20.339000000000169 39.284000000000034,20.341000000000093 39.283000000000058,20.351000000000141 39.282000000000075,20.364000000000146 39.281000000000034,20.383000000000209 39.283000000000058,20.3870000000002 39.285000000000075,20.394000000000148 39.283000000000058,20.404000000000195 39.280000000000058,20.411000000000143 39.276000000000082,20.422000000000082 39.274000000000058,20.433000000000163 39.280000000000058,20.433000000000163 39.282000000000075,20.440000000000111 39.277000000000058,20.4470000000002 39.274000000000058,20.451000000000192 39.271000000000058,20.457000000000107 39.270000000000081,20.463000000000164 39.273000000000081,20.464000000000198 39.277000000000058,20.463000000000164 39.278000000000034,20.464000000000198 39.280000000000058,20.467000000000155 39.279000000000082,20.471000000000146 39.275000000000034,20.478000000000094 39.272000000000041,20.478000000000094 39.263000000000048,20.470000000000113 39.256000000000071,20.472000000000179 39.248000000000054,20.477000000000203 39.233000000000061,20.474000000000103 39.218000000000067,20.475000000000136 39.211000000000027,20.483000000000118 39.20700000000005,20.488000000000142 39.204000000000057,20.501000000000147 39.197000000000081,20.520000000000209 39.175000000000054,20.548000000000144 39.1700000000001,20.553000000000168 39.156000000000084,20.56500000000014 39.13700000000005,20.582000000000136 39.115000000000087,20.605000000000189 39.108000000000047,20.622000000000185 39.096000000000053,20.636000000000081 39.095000000000077,20.647000000000162 39.08700000000006,20.662000000000091 39.063000000000073,20.692000000000093 39.043000000000063,20.708000000000197 39.030000000000094,20.714000000000112 39.013000000000076,20.715000000000146 39.002000000000066,20.711000000000155 39.00100000000009,20.709000000000088
Polygon
41.000000000000078,20.000000000000142 42.000000000000064,20.000000000000142 42.511000000000067,20.000000000000142 43.00000000000005,20.000000000000142 43.00000000000005,20.067000000000093 43.00000000000005,21.000000000000085 43.00000000000005,22.000000000000171 42.319000000000052,22.000000000000171 42.000000000000064,22.000000000000171 42.000000000000064,21.000000000000085 41.000000000000078,21.000000000000085 41.001000000000055,20.70200000000014 41.000000000000078,20.000000000000142
Polygon
45.000000000000078,22.000000000000171 46.000000000000064,22.000000000000171 47.00000000000005,22.000000000000171 47.00000000000005,23.000000000000114 47.00000000000005,24.0000000000002 46.000000000000064,24.0000000000002 45.000000000000078,24.0000000000002 45.000000000000078,23.000000000000114 45.000000000000078,22.000000000000171
Polygon
48.000000000000036,33.000000000000114 49.000000000000021,33.000000000000114 49.000000000000021,34.0000000000002 50.000000000000007,34.0000000000002 50.000000000000007,35 49.000000000000021,35 49.000000000000021,35.999999999999943 48.000000000000036,35.999999999999943 48.000000000000036,35 48.000000000000036,34.0000000000002 48.000000000000036,33.000000000000114
Polygon
49.000000000000021,28.000000000000114 50.000000000000007,28.000000000000114 50.999999999999986,28.000000000000114 50.999999999999986,29.0000000000002 50.000000000000007,29.0000000000002 50.000000000000007,30.000000000000142 50.000000000000007,31.000000000000085 50.000000000000007,32.000000000000171 49.000000000000021,32.000000000000171 49.000000000000021,31.000000000000085 49.000000000000021,30.000000000000142 49.000000000000021,29.0000000000002 49.000000000000021,28.000000000000114
Polygon
39.00100000000009,20.701000000000107 39.00100000000009,20.707000000000164 39.002000000000066,20.701000000000107 39.00100000000009,20.701000000000107